\begin{table}%T5
\caption{Time of maximum light for both modes detected in HD~168050.}
\label{168050tmax}
\small%\centering
\par
\begin{tabular}{cc}
\hline\hline
$T_{\rm max,1}$ &$T_{\rm max,2}$\\
\multicolumn{2}{c}{[HJD~2450000.0+]}\\
\hline
2047.1099(20) & 2047.0437(33)\\
2142.0830(33) & 2142.0758(40)\\
2434.5649(21) & 2434.5908(33)\\
2819.8627(12) & 2819.8428(18)\\
2874.6522(18) & 2874.5004(32)\\
3135.9806(26) & 3135.9672(59)\\
3190.9553(18) & 3191.0019(19)\\
3520.4374(29) & 3520.4664(39)\\
3613.9949(28) & 3613.9773(51)\\
\hline
\end{tabular}
\end{table}