\begin{table}%t2
\caption{Photometry of known type sources (the flag "$-$99.0'' is used when the photometric centre is farther than 3\farcs6 from the nominal position).}\label{tab:Obs}
%\centering
\small
 
\begin{tabular}{c c c c | c c | c c | c c | c c | c c | c c}
\hline \hline
Type& Num. & RA (J2000) & Dec (J2000) &    &3.6~\micron      & 
& 4.5~\micron     & & 5.8~\micron     & & 8.0~\micron     & 
& 24~\micron      & & H$\alpha$\\
    &      &   (\degr)  &    (\degr)  & $F_\nu$ (mJy)&$\delta r$& 
$F_\nu$ (mJy)&$\delta r$& $F_\nu$ (mJy)&$\delta r$& $F_\nu$ (mJy)
&$\delta r$& $F_\nu$ (mJy)&$\delta r$& $F$ (10$^{-14}$ erg s$^{-1}$)
&$\delta r$ \\
\hline
ISO&  1&     01:33:59.3&   30:35:49.2&      2.779&   2.38&  2.248&   2.06&  24.410&   1.86&  21.504&   1.77&   86.133&   1.33& 161.110&   1.01\\
ISO&  2&     01:33:09.8&   30:27:25  &      4.570&   1.60&  3.640&   1.47&  13.660&   1.63&  46.120&   0.57&  106.790&   1.73&  59.330&   0.60\\
ISO&  3&     01:33:44.5&   30:44:38  &      3.350&   1.14&  1.507&   1.39&   9.098&   1.16&  24.896&   0.95&  204.660&   0.41&  89.796&   0.86\\
ISO&  4&     01:33:45.5&   30:36:51.1&      2.000&   1.97&  3.220&   1.51&  11.200&   2.11&  30.649&   1.93&   57.035&   1.94&  62.180&   1.39\\
ISO&  5&     01:33:35.5&   30:39:30.5&      1.598&   1.30&  1.566&   1.20&  10.291&   1.53&  27.896&   1.43&   95.377&   0.88&  18.056&   0.76\\
ISO&  6&     01:33:35.5&   30:39:30  &      4.060&   1.23&  1.566&   0.79&  10.291&   1.12&  27.896&   1.02&   95.377&   0.49&  18.056&   0.60\\
ISO&  7&     01:33:28.8&   30:40:24.7&      4.303&   1.31&  4.589&   1.28&  21.656&   1.81&  65.556&   1.17&  331.663&   0.61&  84.178&   1.47\\
ISO&  8&     01:33:33.9&   30:41:28.3&      6.338&   1.89&  6.683&   1.57& 125.460&   2.38&  71.506&   2.21& 1434.670&   0.87& 394.332&   2.17\\
ISO&  9&     01:33:55.3&   30:45:22  &      1.226&   1.72&  1.184&   1.68&   6.228&   1.57&  18.322&   1.91&   64.093&   1.16&  88.720&   0.76\\
ISO& 10&     01:34:00.2&   30:40:48.6&      4.552&   0.85&  5.278&   0.89&  26.941&   0.97&  78.783&   0.88&  493.010&   0.83&  19.379&   0.32\\
ISO& 14&     01:34:10.9&   30:36:18.1&      4.740&   1.22&  0.921&   1.67&   5.236&   1.63&  13.459&   1.71&   48.906&   0.92&  72.270&   2.10\\
ISO& 16&     01:33:36.6&   30:20:13.4&      3.220&   0.84&  2.480&   0.53&  10.200&   0.65&  11.916&   0.53&   79.540&   0.82& 115.650&   0.09\\
ISO& 19&     01:33:16.5&   30:52:49.1&      4.883&   0.80& 10.097&   0.82&  27.897&   0.85&  70.689&   0.71&  942.423&   0.97& 102.805&   0.59\\
ISO& 21&     01:33:16.3&   30:56:43.8&      0.402&   2.50&  0.488&   2.48&   1.315&   2.14&   3.164&   1.91&   --99.0& --99.0&  82.221&   2.19\\
ISO& 23&     01:34:33.5&   30:46:50.5&     14.115&   2.50& 12.607&   1.96&  25.052&   0.93& 183.911&   1.06&   --99.0& --99.0&  --99.0& --99.0\\
ISO& 24&     01:34:32.1&   30:46:59.9&      9.463&   0.30&  5.080&   0.97&  55.272&   0.89& 167.831&   0.82&  264.127&   1.59& 313.513&   0.69\\
ISO& 25&     01:34:16.4&   30:51:55.1&      3.162&   1.11&  3.228&   1.14&  35.200&   1.19&  19.684&   1.36&  224.650&   0.63&  98.304&   0.47\\
\hline
Hra&  5&     01:33:16.00&  +30:56:45.9&      4.570&   2.62&  3.640&   2.47&  13.660&   1.26&  46.120&   1.15& 106.790&   0.92&  59.330&   1.13\\
Hra&  7&     01:33:33.62&  +30:32:08.1&      4.938&   1.04& 10.096&   1.06&  48.730&   1.17&  71.289&   0.99& 996.074&   0.43& 100.845&   0.84\\
Hra& 10&     01:33:36.53&  +30:20:14.4&      1.598&   0.70&  1.542&   0.75&   9.788&   0.91&  27.048&   0.66&  94.753&   0.30&  18.056&   0.85\\
Hra& 11&     01:33:39.18&  +30:38:06.9&      3.220&   1.50&  2.480&   1.21&  10.200&   0.84&  14.362&   0.85&  79.540&   0.64& 115.650&   0.74\\
Hra& 12&     01:33:42.96&  +30:44:40.6&      0.106&   0.59&  0.177&   0.61&   0.227&   0.65&   0.258&   0.88&   0.704&   1.59&  --99.0& --99.0\\
Hra& 13&     01:33:43.64&  +30:39:07.1&      0.074&   1.79&  0.262&   1.77&   1.519&   1.68&   3.996&   1.89&  33.199&   2.24& 121.820&   0.83\\
Hra& 14&     01:33:44.49&  +30:44:38.4&      1.424&   1.50&  1.130&   1.10&   7.748&   2.09&  23.673&   2.44&  22.730&   0.56&  38.496&   0.07\\
Hra& 16&     01:33:47.86&  +30:43:52.6&      1.650&   1.67&  1.482&   1.75&   9.381&   1.54&  25.793&   1.30&  66.974&   1.25&  89.796&   0.84\\
Hra& 17&     01:33:50.16&  +30:33:46.8&      0.768&   1.47&  0.684&   1.55&   5.613&   1.96&  15.975&   1.78&  16.387&   0.60& 124.330&   0.38\\
Hra& 19&     01:33:51.34&  +30:43:52.8&      0.169&   1.91&  0.254&   2.22&   2.035&   1.73&   6.063&   1.83&   7.250&   1.80&  46.670&   0.29\\
Hra& 20&     01:33:52.57&  +30:39:18.4&      2.219&   1.63&  2.290&   2.32&  11.435&   1.57&  31.355&   1.33&  48.001&   0.61&  39.910&   2.83\\
Hra& 22&     01:33:57.47&  +30:42:16.2&      8.613&   1.35& 94.480&   1.20& 115.710&   1.24& 102.012&   1.49&  64.674&   1.11&  52.961&   1.22\\
Hra& 27&     01:34:01.01&  +30:43:55.4&      2.779&   2.78&  2.248&   2.45&   8.453&   2.23&  21.504&   1.96&  86.133&   1.37& 161.110&   1.11\\
Hra& 28&     01:34:02.21&  +30:38:40.7&      4.470&   0.53&  5.188&   0.54&  26.941&   0.59&  78.783&   0.26& 493.010&   0.05&  19.379&   0.33\\
Hra& 29&     01:34:06.38&  +30:41:45.6&      1.266&   0.70&  1.155&   0.61&   6.595&   0.91&  50.250&   1.07&  23.085&   0.72&  23.758&   0.70\\
Hra& 33&     01:34:13.73&  +30:34:51.4&      1.000&   1.55&  0.924&   1.28&   5.719&   1.33& 129.290&   1.42&  55.358&   0.29&  72.270&   0.47\\
Hra& 37&     01:34:33.13&  +30:46:57.3&      7.970&   0.58&  0.848&   0.68&   5.545&   0.77&  15.175&   0.70& 101.800&   0.18& 122.040&   1.47\\
Hra& 40&     01:34:41.04&  +30:43:29.5&      0.364&   0.96&  0.442&   0.88&   2.860&   1.08&   5.227&   0.98&  59.380&   0.80&  18.960&   0.35\\
\hline
HII&  1&     1:32:29.5& 30:36:07.9&      0.119&   1.95& 0.181&   1.92& 0.330&   1.27&  0.915&   1.47&  --99.0& --99.0&   8.850&   0.46\\
HII&  9&     1:32:45.9& 30:41:35.5&      0.168&   1.00& 0.080&   0.92& 0.130&   0.58&  1.009&   0.52&   1.050&   0.28&   4.400&   0.12\\
HII& 17&     1:33:10.8& 30:18:08.5&      0.080&   0.96& 0.050&   0.55& 0.090&   0.98&  0.700&   0.78&  --99.0& --99.0&   4.080&   0.25\\
HII& 19&     1:33:11.2& 30:45:16.4&      2.916&   0.66& 2.941&   0.44&10.046&   1.22& 25.664&   1.29& 177.960&   0.63& 117.495&   0.24\\
HII& 26&     1:33:19.0& 30:58:14.3&      0.199&   0.68& 0.088&   0.39& 0.448&   0.25&  1.800&   1.06&   0.242&   1.01&   4.171&   0.22\\
HII& 29&     1:33:28.1& 31:00:17.2&      0.150&   1.87& 0.136&   1.82& 0.421&   2.28&  1.272&   2.03&   1.060&   1.84&  13.270&   1.15\\
HII& 30&     1:33:29.0& 30:40:24.8&      4.137&   1.62& 4.457&   1.34&21.040&   1.72& 63.637&   1.78& 633.390&   1.69&  82.292&   0.24\\
HII& 37&     1:33:44.8& 31:02:22.0&      0.077&   2.52& 0.066&   2.02& 0.217&   1.55&  0.416&   1.77&   1.378&   2.68&  13.316&   1.37\\
HII& 39&     1:33:46.3& 30:52:15.0&      0.204&   0.56& 0.195&   0.63& 1.063&   0.69&  2.775&   0.63&   6.940&   0.64&   5.044&   0.31\\
HII& 40&     1:33:47.0& 30:27:22.8&      0.620&   0.41& 0.410&   0.76& 1.650&   0.27&  7.860&   0.83&   6.190&   0.55&  21.650&   0.18\\
HII& 47&     1:33:59.9& 30:32:44.3&      0.903&   0.36& 0.950&   0.10& 3.600&   0.20& 13.374&   0.35&  24.020&   1.21&  40.020&   0.30\\
HII& 49&     1:34:01.7& 30:23:00.6&      0.240&   2.58& 0.120&   2.31& 0.196&   2.43&  0.358&   1.55&   0.634&   2.02&   2.910&   0.67\\
HII& 51&     1:34:04.3& 31:02:17.9&      0.044&   1.43& 0.031&   1.43& 0.166&   2.35&  0.442&   1.82&   0.610&   2.05&   4.421&   0.38\\
HII& 52&     1:34:06.7& 30:48:56.4&      0.326&   0.75& 0.302&   0.54& 1.757&   1.24&  5.450&   1.48&   8.930&   1.92&  24.962&   0.43\\
HII& 53&     1:34:09.4& 30:34:17.0&      0.820&   1.61& 0.597&   1.66& 2.728&   2.19&  7.538&   2.41&  --99.0& --99.0&  23.980&   0.31\\
HII& 55&     1:34:14.4& 30:27:40.3&      0.120&   1.62& 0.041&   2.39& 0.185&   0.66&  1.186&   2.13&  --99.0& --99.0&   0.248&   0.32\\
HII& 62&     1:34:36.1& 30:45:59.6&      0.168&   1.50& 0.110&   1.20& 0.488&   1.20&  1.137&   1.15&   1.609&   2.38&   4.619&   2.12\\
HII& 64&     1:34:37.4& 30:34:54.3&      0.369&   0.93& 0.445&   0.84& 1.935&   0.84&  5.193&   1.08&  59.380&   1.43&  18.960&   0.16\\
HII& 65&     1:34:38.5& 30:32:52.3&      0.034&   0.35& 0.027&   0.12& 0.149&   0.61&  0.240&   0.53&   0.710&   1.01&   1.080&   0.34\\
HII& 67&     1:34:39.3& 31:02:25.0&      0.051&   1.93& 0.041&   1.84& 0.294&   1.96&  0.854&   2.05&  --99.0& --99.0&   6.169&   0.64\\
HII& 68&     1:34:39.5& 30:31:14.2&      0.128&   0.83& 0.116&   0.76& 0.684&   0.66&  1.972&   0.31&  21.350&   1.02&   1.090&   0.33\\
HII& 69&     1:34:42.2& 30:24:00.5&      0.043&   0.38& 0.046&   0.29& 0.161&   0.32&  0.310&   0.31&   0.210&   0.39&   1.620&   0.28\\
HII& 70&     1:34:42.5& 30:55:44.5&      0.410&   0.59& 0.440&   0.89& 1.410&   0.15&  3.199&   0.72&  --99.0& --99.0&   1.999&   0.12\\
HII& 71&     1:34:45.5& 30:42:24.4&      0.200&   0.41& 0.159&   0.18& 0.551&   0.24&  1.590&   0.21&   1.630&   0.75&   4.046&   0.49\\
HII& 72&     1:34:49.2& 30:37:27.5&      0.052&   0.85& 0.041&   0.81& 0.278&   0.74&  0.831&   1.08&   2.370&   1.40&   0.430&   0.63\\
HII& 75&     1:35:01.6& 30:40:02.3&      0.069&   0.38& 0.053&   0.35& 0.180&   0.64&  0.940&   0.42&  --99.0& --99.0&   1.456&   0.49\\
HII& 76&     1:35:02.4& 31:00:43.4&      0.067&   1.17& 0.044&   1.00& 0.153&   1.03&  0.141&   1.16&  --99.0& --99.0&   2.687&   0.70\\
\hline
SNo& 25&     1:33:23.8& 30:26:11.6&      0.550&   1.40& 0.380&   0.96& 0.890&   0.81&  1.325&   1.87&  1.947&   1.55&  3.310&   0.95\\
SNo& 43&     1:33:41.7& 30:21:01.8&      3.590&   2.56& 2.090&   2.21& 4.060&   2.09& 18.670&   0.61& 11.060&   0.54& 14.907&   1.82\\
SNo& 53&     1:33:54.5& 30:33:47.7&      0.134&   2.67& 0.070&   2.84& 0.300&   2.71&  0.733&   2.85& --99.0& --99.0& --99.0& --99.0\\
\hline
SNR& 13&     1:33:23.78&   30:26:11.60&      0.550&   1.42& 0.380&   0.99& 0.890&   1.00&  1.319&   1.92& 1.947&   1.68& 3.310&   0.97\\
\hline
PNe&  4&     01:32:39.80& +30:37:41.0&      0.017&   0.23& 0.018&   0.79& 0.023&   1.16& 0.066&   0.69& 0.000&   6.74& 0.164&   0.18\\
PNe& 60&     01:33:44.38& +30:20:23.7&      0.050&   2.64& 0.035&   2.41& 0.058&   2.73& 0.039&   2.45& 0.361&   0.81& 0.220&   0.19\\
PNe& 79&     01:33:54.93& +30:47:13.4&      0.156&   1.61& 0.084&   1.46& 0.107&   1.86& 0.099&   1.01& 0.000&   7.18&--99.0& --99.0\\
PNe& 85&     01:33:58.38& +30:55:05.2&      0.050&   2.34& 0.041&   1.71& 0.217&   1.61& 0.698&   1.75& 0.389&   1.29& 0.676&   0.87\\
PNe&106&     01:34:12.15& +30:28:57.1&      0.160&   2.65& 0.090&   2.85& 0.130&   2.56& 0.074&   2.90& 0.379&   3.43& 0.181&   1.37\\
PNe&112&     01:34:15.15& +30:44:57.4&      0.189&   2.04& 0.224&   2.10& 0.251&   2.15& 0.152&   2.34& 0.000&   7.62& 0.185&   0.06\\
PNe&128&     01:34:25.55& +30:40:10.9&      0.248&   0.71& 0.157&   0.65& 0.153&   0.39& 0.207&   0.28& 0.394&   0.42& 0.275&   0.37\\
PNe&133&     01:34:31.49& +31:05:24.0&      0.023&   0.54& 0.012&   0.69& 0.067&   0.48& 0.152&   0.07& 0.000&   6.63& 0.148&   0.17\\
PNe&139&     01:34:37.89& +30:27:00.7&      0.140&   2.20& 0.060&   2.20& 0.114&   1.73& 0.160&   0.88& 0.113&   0.60& 0.210&   0.20\\
\hline
\end{tabular}
\end{table}