\begin{table}%t5
%\centering
\par
\caption{\object{Crab} flux loss for two DPH stacked as a function of the DPH pointing offset. Different positions of the \object{Crab} in the FOV have been considered.
\label{table_offset}}
\footnotesize {
\begin{tabular}{cc}
\hline\hline
Offset (arcmin)& Flux loss \\
\hline
\multicolumn{2}{c}{{Pcode = 1}} \\
\hline
1   & 0.1\% \\
2   & 0.3\% \\
3   & 1.9\% \\
5   & 5.7\%  \\
7   & 11.1\% \\
\hline
\multicolumn{2}{c}{{Pcode = 0.5}} \\
\hline
1   & 1.2\% \\
2   & 3.6\% \\
2.7 & 5.2\%  \\
4   & 19.4\% \\
\hline
\multicolumn{2}{c}{{Pcode = 0.1}} \\
\hline
2   & 7.7\% \\
\hline
\end{tabular}}
\end{table}