\begin{table}%t2
%\centering
\par
\caption{Distribution of the \object{Crab} location in the FOV for the
processed sample of DPH rows. The source position is given in
degrees from the center of the BAT~FOV. \label{Table_histog_deg}}
\footnotesize {
\begin{tabular}{ll} \hline\hline
Deg off-axis & Processed rows \\
\hline
0--5 & 306 \\
5--10 & 0 \\
10--15 & 0 \\
15--20 & 108 \\
20--25 & 33 \\
25--30 & 299 \\
30--35 & 908 \\
35--40 & 253 \\
40--45 & 816 \\
45--50 & 295 \\
50--55 & 323 \\
55--60 & 207 \\
60--... & 0 \\
\hline \\
\end{tabular}}
\end{table}