\begin{table}%t7
%\centering
\par
\caption{Colours of the single SSP fit compared to the colours of the BL Lac sample. 
1 represents the best and 3 the worst fit.
\label{colour_fit}}
\begin{tabular}{llllll}
\hline\hline
\noalign{\smallskip}
Name & 0.1 & 0.7 & 2.0 & 6.0 & 14.0 \\
& Gyr & Gyr & Gyr & Gyr & Gyr \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
1ES 0229+200   &     &    & 3   & 1   & 2    \\
PKS 0521-365   & 3    & 1   & 2   &    &     \\
PKS 0548-322   & 2    & 1   & 3   &    &    \\
1H 0706+591    &     & 2   & 1   & 3   &     \\
MRK 421        &     &    & 2   & 1   & 3    \\
MRK 180        & 3    & 1   & 2   &    &     \\
1ES 1212+078   &     &    & 1   & 2   & 3    \\
MS 1229.2+6430 & 2    & 1   & 3   &    &     \\
1ES 1255+244   & 2    & 1   & 3   &    &     \\
PG 1418+546    &     & 2   & 1   & 3   &     \\
1ES 1426+428   & 3    & 2   & 1   &    &     \\
1ES 1440+122   &     &    & 1   & 2   & 3    \\
AP LIBRAE      & 3    & 1   & 2   &    &     \\
MS 1552.1+2020 & 1    & 2   & 3   &   &     \\
MRK 501        &     & 2   & 1   & 3   &     \\
I Zw 187       &     & 2   & 1   & 3   &     \\
3c371          &     & 2   & 1   & 3   &     \\
BL LACERTAE    & 3    & 1   & 2   &    &     \\
\hline
\end{tabular}
\end{table}