\begin{table}%t6
      \caption{Line parameters of NGC~2623 and NGC~7469. The third column 
      indicate the Gaussian components (G.C.) used to fit the spectral lines.}
         \label{tab:2623-7469-intensities}
	\small			%\centering
\par
         \begin{tabular}{llcccc}
            \hline\hline
            \noalign{\smallskip}
            Source & Transition & G.C. & $V$ & $T_{\rm A}^{*}$ & $\Delta V$ \\
                   &            &      & [\kms] & [mK] & [\kms] \\
            \noalign{\smallskip}
            \hline
            \noalign{\smallskip}
	N2623 & HNC 3--2 & 1 & 5465~$\pm$~34 & ~~~~3.4~$\pm$~0.7 & 337~$\pm$~88\\
\par
		\noalign{\smallskip}		
\par
		N7469 & CO~2--1 & 1 & 4773~$\pm$~0 & ~~~~0.15~$\pm$~0 & 126~$\pm$~0\\
		         &        & 2 & 4927~$\pm$~0 & ~~~~0.16~$\pm$~0 & 123~$\pm$~0\\		
            \hline
         \end{tabular}
   \end{table}