\begin{table}%t5
\caption{The results of CL0016+16 mass analysis using different temperature profiles and cluster parameters.} \label{mass}
%\centering
\par
\small
\begin{tabular}{l l l}
\hline\hline
parameter &$M(<R_{200})$& $M(<R_{500})$ \\
      &$(\times10^{14}~M_{\odot})$ & $(\times10^{14}~M_{\odot})$ \\
\hline
    $M_{\rm gas}$& $2.24 \pm 0.06$ & 1.41 $ \pm $ 0.04\\
\hline
&\\
    $M_{\rm tot}$, $T=8.81$ keV& 14.0 $ \pm $ 0.6& 8.4 $ \pm $ 0.3\\
    $M_{\rm tot}$, $T(r)$& 11.9 $ \pm 2.0$ &8.0 $ \pm$ 1.0\\
\hline
&\\
    $M_{\rm tot}$, $T(r)  NW$ hot& 11.2 $ \pm $ 2.6&8.0 $ \pm $ 2.1\\
    $M_{\rm tot}$, $T(r)  NE$ cold& 11.1 $ \pm $ 2.4&8.1 $ \pm $ 1.9\\
    $M_{\rm tot}$, $T(r)  SE$ hot& 14.0 $ \pm $ 2.8&8.5 $ \pm $ 1.8\\
    $M_{\rm tot}$, $T(r)  SW$ cold& 12.0 $ \pm $ 2.5&9.0 $ \pm $ 2.0\\
\hline
$VT$&&\\
    $M_{\rm tot}$, $T = 8.85$ keV& 14.42& \\
\hline
&\\
    $n_{\rm e0}(\times10^{-3}$ cm$^{-3}$)& 7.85 $ \pm $ 0.01& \\
    $f_{\rm gas}$& 0.16 $ \pm  $ 0.01&\\
    $L_{\rm X}$($\times10^{45}$ erg/s) & 5.1 $ \pm $ 0.1 & \\
\hline
\end{tabular}
\end{table}