\begin{table}%t3
\caption{The spectral fits results in the chosen regions, with free abundances. Three EPIC cameras were used.} \label{Tregions}
%\centering
\par
\small
\begin{tabular}{l l}
\hline\hline\noalign{\smallskip}
Region & $T$(keV)/$\chi^{2}_{\rm red}$ \\
\hline\noalign{\smallskip}
 1 & $\rm 6.60^{+3.14}_{-1.50}$/0.77\\[1.5mm] 
 2 & $\rm 8.87^{+0.87}_{-0.69}$/0.95\\[1.5mm] 
 3 & $\rm 6.16^{+1.14}_{-0.87}$/0.69 \\[1.5mm] 
 4 & $\rm 10.28^{+1.64}_{-1.16}$/0.80\\[1.5mm] 
 5 & $\rm 9.63^{+2.47}_{-1.90}$/1.04\\[1.5mm]  
 6 & $\rm 11.12^{+1.11}_{-0.74}$/0.90\\[1.5mm] 
 7 & $\rm 13.77^{+3.99}_{-4.11}$/0.66\\[1.5mm]
 8 & $\rm 9.25^{+1.09}_{-1.31}$/1.01\\[1.5mm] 
 9 & $\rm 7.81^{+1.01}_{-0.93}$/0.77\\[1.5mm] 
10 & $\rm 12.01^{+1.45}_{-1.34}$/0.84\\ 
\hline
\end{tabular}
\end{table}