\begin{table}%T1
   %\centering
 \caption{\label{sample} OH/IR star sample and 1612~MHz OH maser properties.}
\begin{tabular}{lccrrrrl}
\hline\hline
Object & \multicolumn{2}{c}{Coordinates (2000)} & $v_b$ & SI$_b$ & $v_r$ & SI$_r$ & Comments \\
       &          &         &  [\kms] & [Jy*\kms] & [\kms] & [Jy*\kms] \\
\hline
OH~10.5+4.5$^a$  & 17 51 48.8  & $-$17 42 30 &  $-$72.2 &    3.3 &  $-$42.5 &    2.8 & \\ 
OH~10.9+1.5      & 18 03 38.9  & $-$18 41 10 &  111.2 &    1.7 &  145.2 &    0.7 & \\ 
OH~11.5+0.1      & 18 10 38.7  & $-$18 52 57 &   10.1 &   23.1 &   75.1 &  130.9 & \\ 
OH~12.3$-$0.2      & 18 13 08.8  & $-$18 27 49 &   21.4 &    9.7 &   51.4 &   11.8 & \\ 
OH~12.8$-$0.9      & 18 16 49.3  & $-$18 15 02 &  $-$68.9 &    4.5 &  $-$43.1 &    5.5 & \\ 
OH~12.8+0.9      & 18 10 06.1  & $-$17 26 34 &   15.1 &    3.6 &   37.1 &    0.8 & \\ 
OH~12.8$-$1.9      & 18 20 37.0  & $-$18 47 11 &  $-$12.8 &   33.4 &   35.1 &   15.6 & \\ 
OH~13.1+5.0      & 17 55 45.1  & $-$15 03 42 &  $-$85.3 &   13.8 &  $-$47.3 &    6.0 & \\ 
OH~13.4+0.8      & 18 12 03.4  & $-$16 55 31 &  $-$22.5 &    1.2 &   15.4 &    3.4 & \\ 
OH~15.4$-$0.1      & 18 18 54.0  & $-$15 34 39 &  $-$44.6 &    3.1 &  $-$12.4 &    4.2 & \\ 
OH~15.4+1.9      & 18 11 34.0  & $-$14 39 54 &   $-$3.4 &    5.3 &   27.2 &    3.6 & \\ 
OH~15.7+0.8      & 18 16 25.7  & $-$14 55 15 &  $-$16.7 &   44.0 &   15.1 &   33.7 & \\ 
OH~16.1$-$0.3      & 18 21 06.9  & $-$15 03 22 &   $-$3.1 &   45.1 &   44.4 &   41.9 & \\ 
OH~16.1+1.4      & 18 14 51.5  & $-$14 16 19 &   28.3 &    1.0 &   66.5 &    0.7 & \\ 
OH~17.0$-$0.1      & 18 21 49.9  & $-$14 10 35 &   32.2 &    6.6 &   68.1 &    4.9 & \\ 
OH~17.1$-$1.2      & 18 26 15.7  & $-$14 42 26 &   $-$9.8 &    3.9 &   17.6 &    4.1 & \\ 
OH~17.2$-$1.1      & 18 26 10.4  & $-$14 28 19 &  157.2 &    1.3 &  184.2 &    1.7 & \\ 
OH~17.4$-$0.3      & 18 23 35.0  & $-$13 55 50 &   10.5 &   12.0 &   47.2 &    6.9 & \\ 
OH~17.7$-$2.0      & 18 30 30.7  & $-$14 28 58 &   46.4 &   52.2 &   75.1 &  131.0 & \\ 
OH~18.2+0.5      & 18 21 56.2  & $-$12 55 22 &  111.9 &    1.8 &  138.4 &    2.4 & \\ 
OH~18.3+0.1$^a$  & 18 23 50.8  & $-$12 50 38 &    9.8 &     -- &    --  &    --  & interstellar\\
OH~18.3+0.4      & 18 22 43.1  & $-$12 47 42 &   31.3 &    8.5 &   64.3 &   10.3 & \\ 
OH~18.5+1.4      & 18 19 35.5  & $-$12 08 09 &  164.6 &   10.4 &  187.8 &    9.4 & \\ 
OH~18.7+1.6      & 18 19 40.6  & $-$11 53 00 &  $-$18.1 &    2.9 &   16.2 &    1.8 & \\ 
OH~18.8+0.4      & 18 24 05.3  & $-$12 26 14 &   $-$3.5 &   38.9 &   28.4 &   22.9 & \\ 
OH~19.2$-$1.0      & 18 29 28.6  & $-$12 37 55 &   29.9 &    8.4 &   68.3 &   12.7 & \\ 
OH~19.5+4.0      & 18 12 22.7  & $-$10 02 50 &   28.5 &    3.3 &   62.6 &    4.6 & \\ 
OH~20.2$-$0.1      & 18 28 13.9  & $-$11 16 10 &    8.5 &   10.2 &   44.3 &    8.8 & \\ 
OH~20.3$-$1.5      & 18 33 34.2  & $-$11 56 45 &  $-$25.1 &    1.7 &    2.2 &    3.1 & \\ 
OH~20.4$-$0.3      & 18 29 35.5  & $-$11 15 54 &      -- &     -- &   60.3 &     -- & \\ 
OH~20.4+1.4      & 18 23 28.7  & $-$10 27 21 &   19.4 &    0.8 &   57.0 &    0.7 & \\ 
OH~20.6+0.3      & 18 27 56.3  & $-$10 46 54 &   69.5 &    2.6 &  112.2 &    2.7 & \\ 
OH~20.7+0.1      & 18 28 30.8  & $-$10 50 52 &  116.9 &   20.3 &  155.7 &   14.2 & \\ 
OH~20.8$-$0.8      & 18 31 23.0  & $-$11 09 54 &   30.3 &    0.9 &   64.9 &    2.6 & \\ 
OH~20.8+3.1      & 18 17 58.5  & $-$09 18 31 &   11.2 &    3.7 &   41.5 &    4.4 & \\ 
OH~21.5+0.5      & 18 28 30.9  & $-$09 58 15 &   95.2 &   24.6 &  135.6 &   18.0 & \\ 
OH~21.9+0.4      & 18 29 30.7  & $-$09 39 50 &   65.8 &    4.8 &  105.9 &    3.6 & \\ 
OH~22.1$-$0.6      & 18 33 34.5  & $-$09 57 36 &  102.4 &    6.9 &  131.1 &    3.1 & \\ 
OH~22.3$-$2.5      & 18 40 38.5  & $-$10 42 35 &   97.5 &    1.2 &  126.9 &    1.4 & \\ 
OH~23.1$-$0.3      & 18 34 11.3  & $-$08 58 02 &   18.7 &   12.8 &   50.6 &   11.7 & \\ 
OH~23.7+1.2      & 18 30 06.9  & $-$07 36 50 &  $-$15.6 &    8.4 &   15.9 &    6.3 & \\ 
OH~23.8+0.2      & 18 33 49.6  & $-$08 04 01 &   93.3 &    3.5 &  118.0 &    9.0 & \\ 
OH~23.8$-$1.1      & 18 38 39.8  & $-$08 41 12 &   32.4 &    2.9 &   66.8 &    7.8 & \\ 
OH~24.3+0.7      & 18 33 09.8  & $-$07 27 58 &   39.3 &    1.8 &   75.8 &    2.4 & \\ 
OH~24.5+0.3      & 18 35 19.0  & $-$07 19 23 &  $-$87.3 &    6.8 &  $-$58.1 &    6.6 & \\ 
OH~24.7$-$0.1      & 18 36 45.9  & $-$07 18 17 &   60.3 &    5.3 &  110.8 &    7.7 & \\ 
OH~24.7+0.1      & 18 35 57.4  & $-$07 18 57 &   39.3 &    5.1 &   73.3 &    4.8 & \\ 
OH~24.7+0.3      & 18 35 29.2  & $-$07 13 11 &   19.8 &   12.8 &   65.0 &   14.8 & \\ 
OH~24.7$-$1.7      & 18 42 22.0  & $-$08 05 00 &   77.0 &    3.1 &  106.3 &    3.1 & \\ 
OH~25.1$-$0.3      & 18 38 15.4  & $-$07 09 54 &  128.7 &    4.8 &  156.2 &    4.1 & \\ 
OH~25.5$-$0.3      & 18 38 50.5  & $-$06 44 50 &    8.4 &    8.3 &   77.0 &   14.7 & \\ 
OH~25.5+0.4      & 18 36 44.0  & $-$06 27 24 &   21.4 &    4.7 &   56.2 &    3.1 & \\ 
OH~26.2$-$0.6      & 18 41 14.4  & $-$06 15 01 &   48.4 &   23.9 &   95.3 &   20.3 & \\ 
OH~26.3+0.1      & 18 38 38.8  & $-$05 49 10 &  $-$41.7 &    1.4 &  $-$11.2 &    1.8 & \\ 
OH~26.4$-$1.9      & 18 46 26.8  & $-$06 40 33 &   13.9 &    9.6 &   44.9 &   17.3 & \\ 
OH~26.4$-$2.8      & 18 49 16.8  & $-$07 13 47 &  $-$79.7 &    3.4 &  $-$53.3 &    3.6 & \\ 
OH~26.5+0.6      & 18 37 32.5  & $-$05 23 59 &   10.5 &  139.4 &   43.5 &  237.9 & \\ 
OH~27.0$-$0.4      & 18 42 01.9  & $-$05 21 07 &   86.0 &    5.2 &  117.7 &    7.0 & \\ 
\hline
OH~27.2+0.2      & 18 40 16.4  & $-$05 02 39 &   71.6 &    1.5 &  113.4 &    2.0 & \\ 
OH~27.3+0.2      & 18 40 21.9  & $-$04 57 11 &   36.3 &   38.8 &   64.5 &   19.7 & \\ 
OH~27.5$-$0.9      & 18 44 41.6  & $-$05 09 18 &   92.1 &    7.1 &  121.2 &    9.1 & \\ 
OH~27.8$-$1.5      & 18 47 37.8  & $-$05 11 08 &   67.8 &    2.6 &  102.2 &    2.8 & \\ 
OH~28.5$-$0.0      & 18 43 25.8  & $-$03 55 55 &   92.9 &   13.8 &  122.0 &   13.8 & \\ 
OH~28.7$-$0.6      & 18 45 48.3  & $-$04 00 46 &   27.6 &    8.5 &   65.1 &    4.8 & \\ 
OH~29.4$-$0.8      & 18 47 49.9  & $-$03 29 31 &  106.1 &   17.0 &  140.1 &   16.3 & \\ 
OH~30.1$-$0.2      & 18 47 09.8  & $-$02 35 36 &   31.4 &   16.8 &   69.5 &   16.4 & \\ 
OH~30.1$-$0.7      & 18 48 42.0  & $-$02 50 29 &   76.8 &   65.8 &  121.2 &   79.9 & \\ 
OH~30.7+0.4      & 18 45 52.4  & $-$01 46 43 &   47.8 &   10.0 &   85.2 &    7.6 & \\ 
OH~31.0+0.0      & 18 47 41.2  & $-$01 45 11 &   26.7 &    0.2 &   41.7 &   12.9 & \\ 
OH~31.0$-$0.2      & 18 48 43.1  & $-$01 48 30 &  110.0 &   45.8 &  140.0 &    3.9 & \\ 
OH~31.5$-$0.1      & 18 49 05.0  & $-$01 17 02 &   19.4 &    3.3 &   50.9 &    2.8 & \\ 
OH~31.7$-$0.8      & 18 52 01.4  & $-$01 26 47 &   64.8 &    1.3 &   92.8 &    2.1 & \\ 
OH~32.0$-$0.5      & 18 51 26.2  & $-$01 03 52 &   54.0 &   24.5 &   98.2 &   13.8 & \\ 
OH~32.1+0.9      & 18 46 38.7  & $-$00 17 14 &  123.8 &    1.6 &  150.8 &    2.8 & \\ 
OH~32.8$-$0.3      & 18 52 22.2  & $-$00 14 11 &   42.9 &   55.8 &   78.5 &   26.8 & \\ 
OH~33.4$-$0.0      & 18 52 27.9  & +00 27 30 &   43.2 &    4.3 &   78.3 &    6.2 & \\ 
OH~34.7+0.9      & 18 51 15.9  & +01 56 19 &   10.2 &    4.2 &   44.6 &    5.1 & \\ 
OH~34.9+0.8      & 18 52 15.3  & +02 03 48 &   52.8 &    2.1 &   84.9 &    1.4 & \\ 
OH~35.2$-$2.6      & 19 05 02.0  & +00 48 51 &   21.3 &   21.8 &   73.8 &   15.8 & \\ 
OH~35.6$-$0.3      & 18 57 27.4  & +02 12 18 &   63.0 &   30.2 &   93.0 &   21.1 & \\ 
OH~36.4+0.3      & 18 56 36.4  & +03 06 53 &   82.2 &    3.3 &  122.4 &    2.9 & \\ 
OH~36.9+1.3      & 18 54 16.0  & +04 02 32 &  $-$20.8 &    3.4 &   $-$3.7 &    3.2 & \\ 
OH~37.1$-$0.8      & 19 02 06.3  & +03 20 16 &   73.0 &   10.7 &  103.9 &    9.1 & \\ 
OH~37.7$-$1.4      & 19 05 09.7  & +03 40 58 &   99.2 &    1.3 &  123.9 &    0.6 & \\ 
OH~39.6+0.9A     & 19 00 55.5  & +06 21 05 &  \multicolumn{4}{c}{no detection} &IRAS~18584+0616 \\
OH~39.6+0.9B$^b$ & 19 00 24.6  & +06 16 31 &  \multicolumn{4}{c}{no detection} &IRAS~18579+0612 \\ 
OH~39.7+1.5      & 18 58 30.1  & +06 42 55 &    2.1 &   75.6 &   38.0 &  129.7 & \\ 
OH~39.9$-$0.0      & 19 04 09.6  & +06 13 16 &  132.9 &   10.6 &  165.0 &   11.3 & \\ 
OH~40.1+2.4      & 18 55 56.9  & +07 30 28 &   26.0 &    1.1 &   67.8 &    1.5 & \\ 
OH~42.3$-$0.1      & 19 09 08.2  & +08 16 34 &   41.4 &   22.7 &   77.6 &   41.8 & \\ 
OH~42.6+0.0      & 19 08 58.4  & +08 37 49 &   34.1 &    5.6 &   71.8 &    4.8 & \\ 
OH~42.8$-$1.0$^d$  & 19 13 36.4  & +08 22 39 &  $-$29.5 &    2.2 &   $-$1.8 &    1.0 & Pos. error: $\approx$2\arcmin\\ 
OH~43.6$-$0.5      & 19 12 46.9  & +09 18 24 &   58.8 &    1.6 &   86.3 &    1.4 & \\ 
OH~43.8+0.5      & 19 09 31.8  & +09 51 50 &   $-$4.3 &    5.8 &   22.5 &    4.4 & \\ 
OH~43.9$-$1.0      & 19 15 16.4  & +09 15 45 &   37.8 &    0.8 &   65.5 &    1.1 & \\ 
OH~43.9+1.2      & 19 06 42.8  & +10 14 33 &   32.4 &    2.0 &   67.4 &    1.5 & \\ 
OH~44.8$-$2.3      & 19 21 36.6  & +09 27 57 &  $-$88.9 &   10.1 &  $-$53.8 &   14.4 & \\ 
OH~45.5+0.1      & 19 14 19.6  & +11 10 35 &   16.5 &   14.9 &   53.7 &   14.2 & \\ 
OH~51.8$-$0.2      & 19 27 42.1  & +16 37 25 &  $-$18.5 &    7.3 &   23.1 &    5.4 & \\ 
OH~52.4+1.8      & 19 21 31.5  & +18 10 09 &   $-$0.3 &    2.7 &   31.3 &    4.5 & \\ 
OH~53.6$-$0.2      & 19 31 25.3  & +18 13 10 &   $-$4.0 &    9.8 &   25.5 &   23.9 & \\ 
OH~55.0+0.7      & 19 30 29.4  & +19 50 41 &   12.5 &   14.8 &   44.2 &    9.3 & \\ 
OH~57.5+1.8A     & 19 31 38.9  & +22 35 17 &  $-$88.0 &    1.9 &  $-$59.2 &    1.6 & \\ 
OH~57.5+1.8B     & 19 31 45.5  & +22 33 42 &   30.1 &    2.2 &   46.3 &    4.8 & \\ 
OH~63.9$-$0.2      & 19 52 57.9  & +27 07 45 &  $-$11.3 &    1.7 &   22.3 &    1.8 & \\ 
OH~65.5+1.3      & 19 51 21.2  & +29 13 01 &  $-$41.1 &    6.9 &   $-$2.7 &    6.6 & \\ 
OH~65.7$-$0.8      & 19 59 39.4  & +28 23 10 &  $-$70.2 &    2.4 &  $-$46.1 &    4.0 & \\ 
OH~66.8$-$1.3      & 20 04 20.8  & +29 04 07 &  $-$79.1 &    2.6 &  $-$50.2 &    2.7 & \\ 
OH~75.3$-$1.8      & 20 29 08.5  & +35 45 42 &  $-$16.4 &    3.7 &   10.0 &    3.7 & \\ 
OH~77.9+0.2      & 20 28 30.7  & +39 07 00 &  $-$50.9 &    8.5 &  $-$26.0 &    5.6 & \\ 
OH~80.8$-$1.9      & 20 46 25.5  & +40 06 58 &  $-$28.7 & 1151.4 &   25.6 &  215.5 & \\ 
OH~83.4$-$0.9      & 20 50 58.6  & +42 48 12 &  $-$58.1 &   11.6 &  $-$18.1 &    5.2 & \\ 
OH~85.4+0.1      & 20 53 38.0  & +44 58 07 &  $-$36.8 &    3.0 &   $-$7.9 &    2.8 & \\ 
OH~104.9+2.4     & 22 19 27.2  & +59 51 20 &  $-$41.3 &   36.3 &   $-$8.5 &   26.5 & \\ 
OH~127.8+0.0     & 01 33 51.2  & +62 26 53 &  $-$66.5 &   67.3 &  $-$41.8 &   40.9 & \\ 
OH~138.0+7.2$^c$ & 03 25 08.4  & +65 32 07 &  $-$47.7 &   18.5 &  $-$26.5 &    8.9 & \\ 
OH~141.7+3.5$^c$ & 03 33 30.5  & +60 20 09 &  $-$70.2 &    4.9 &  $-$43.7 &    1.7 & \\ 
\hline
\end{tabular}

\par
Coordinates: a) Bowers \& de Jong (\cite{Bowers83a}); b) IRAS;
                      c) Bowers et~al. (\cite{Bowers81}); d) this paper; otherwise MSX6C.
\end{table}