\begin{table}%t1
\caption{Iron lines considered in our analysis.}
\label{Felines}
%\centering
\small
\begin{tabular}{lcrl}
\hline\hline
&&& \\[-8pt]
Ion & $\lambda$ [\AA] & $\chi$ [eV] & $\log~gf$\\
\hline
Fe I & 5775.080 & 4.220& $-$1.30\\
Fe I & 5848.129 & 4.607 & $-$0.9\\
Fe I & 5902.473 & 4.593 & $-$1.75\\
Fe I & 5916.247 & 2.453 & $-$2.99\\
Fe I & 6027.050 & 4.076 & $-$1.3\\
Fe I & 6093.644 & 4.607 & $-$1.41\\
Fe I & 6096.665 & 3.984 & $-$1.81\\
Fe I & 6098.244 & 4.558 & $-$1.8\\
Fe I & 6120.249 & 0.915 & $-$5.95\\
Fe I & 6151.618 & 2.176 & $-$3.30\\
Fe I & 6187.990 & 3.943 & $-$1.65\\
Fe I & 6240.646 & 2.223 & $-$3.39\\
Fe I & 6498.939 & 0.958 & $-$4.70\\
Fe I & 6574.228 & 0.990 & $-$5.00\\
Fe I & 6703.567 & 2.759 & $-$3.15\\
Fe I & 6725.357 & 4.103 & $-$2.30\\
Fe I & 6726.666 & 4.607 & $-$1.17\\
Fe I & 7421.558 & 4.638 & $-$1.80\\
Fe I & 7547.896 & 5.099 & $-$1.10\\
Fe I & 7723.208 & 2.279 & $-$3.62\\
Fe II & 5264.812 & 3.230 & $-$3.13\\
Fe II & 5425.257 & 3.200 & $-$3.22\\
Fe II & 6247.557 & 3.892 & $-$2.30\\
Fe II & 6369.462 & 2.891 & $-$4.11\\
Fe II & 6432.680 & 2.891 & $-$3.57\\
Fe II & 6456.383 & 3.904 & $-$2.05\\
\hline
\end{tabular}
\end{table}