\begin{table}%tA.1
%%\centering
\par
\caption{\label{acis_extract.tab} Complete source list with parameters determined by \rm{\it acis\_extract} for the energy range of 0.5--8~keV, i.e., net (background-subtracted) counts, median photon energy, source significance, hardness ratios, as well as estimates of the observed flux. Also given are the ratio of the summed exposure map values at the source position relative to the maximum value, i.e., information on the effective exposure time, and the number of observations in which a source was detected ($N_{\rm obs}$). This number can be lower than eight in the outer parts of the map. The manually added source is marked by an asterisk. }
\begin{tabular}{lrrrrrrrrrr}
\hline\hline
Src ID & Net        & Med. $E$ & Source      & HR1 & HR2 & HR3 & FLUX1  & FLUX2 & Rel.exp.  \\
       & counts     & [keV]      & signif.     &     &     &	 & [cm$^{-2}$~ s$^{-1}$] &  [cm$^{-2}$~ s$^{-1}$] & ($N_{\rm obs}$)\\
\hline
190104.58-370129.6     & $46.2^{\rm +9.6}_{-8.5}$	    & 1.3 &  4.8 & $	    -0.98_{-	  0.02}^{\rm +	0.09}$ & $     -0.73_{-      0.10}^{\rm +	   0.13}$ & $	  -3.05_{-	6.51}^{\rm +      \rm -NaN}$ &   1.99E-06 &   1.94E-06   & 0.50 (7)  \\
190105.05-370340.2     & $23.3^{\rm +6.1}_{-5.0}$	    & 1.4 &  3.8 & $	    -0.64_{-	  0.17}^{\rm +	0.21}$ & $     -0.42_{-      0.23}^{\rm +	   0.24}$ & $	  -0.28_{-	0.39}^{\rm +      0.38}$ &   1.41E-05 &   1.80E-05   & 0.02 (1)  \\
190108.31-365634.7     & $99.2^{\rm +11.6}_{-10.6}$     & 2.8 &   8.5 & $	      0.27_{-	   0.10}^{\rm +	 0.10}$ & $	 0.45_{-      0.14}^{\rm +      0.14}$ & $      0.14_{-	 0.12}^{\rm +      0.11}$ &   2.49E-06 &   3.35E-06  & 0.68 (7)  \\
190108.60-365721.3     & $3005.2^{\rm +56.0}_{-55.0}$   & 1.8 &   53.7 & $        -0.17_{-      0.02}^{\rm +	  0.02}$ & $	 -0.22_{-      0.02}^{\rm +      0.02}$ & $     -0.03_{-	  0.02}^{\rm +	0.02}$ &   7.24E-05 &	9.55E-05 & 0.72 (8)  \\
190111.30-365551.9     & $36.5^{\rm +7.9}_{-6.8}$	    & 2.7 &  4.6 & $	     0.34_{-	  0.17}^{\rm +	0.18}$ & $	0.45_{-      0.23}^{\rm +	   0.24}$ & $	   0.07_{-	0.20}^{\rm +      0.20}$ &   8.96E-07 &   1.32E-06   & 0.63 (7)  \\
190114.54-370102.3     & $21.1^{\rm +6.5}_{-5.4}$	    & 2.9 &  3.3 & $	     0.37_{-	  0.23}^{\rm +	0.24}$ & $	0.31_{-      0.39}^{\rm +	   0.38}$ & $	   0.35_{-	0.25}^{\rm +      0.26}$ &   4.62E-07 &   8.20E-07   & 0.59 (7)  \\
190115.32-365237.2     & $51.1^{\rm +8.9}_{-7.8}$	    & 2.8 &  5.8 & $	     0.52_{-	  0.13}^{\rm +	0.14}$ & $	0.63_{-      0.16}^{\rm +	   0.20}$ & $	   0.09_{-	0.16}^{\rm +      0.16}$ &   2.05E-06 &   2.54E-06   & 0.47 (6)  \\
190115.86-370344.3     & $862.5^{\rm +30.6}_{-29.6}$    & 1.7 &  28.2 & $	     -0.21_{-	   0.03}^{\rm +	 0.03}$ & $	-0.29_{-      0.04}^{\rm +      0.04}$ & $     -0.04_{-	 0.05}^{\rm +      0.05}$ &   2.87E-05 &   3.47E-05  & 0.58 (7)  \\
190116.26-365628.4     & $59.9^{\rm +9.3}_{-8.2}$	    & 1.2 &  6.4 & $	    -0.85_{-	  0.07}^{\rm +	0.10}$ & $     -0.59_{-      0.11}^{\rm +	   0.12}$ & $	  -1.32_{-	0.15}^{\rm +      \rm -NaN}$ &   2.27E-06 &   1.76E-06   & 0.80 (8)  \\
190116.65-365638.9     & $28.3^{\rm +7.1}_{-6.0}$	    & 3.5 &  4.0 & $	     0.75_{-	  0.13}^{\rm +	0.18}$ & $	0.99_{-      0.30}^{\rm +	   0.28}$ & $	   0.17_{-	0.21}^{\rm +      0.21}$ &   6.67E-07 &   8.26E-07   & 0.81 (8)  \\
190117.52-365831.9     & $40.3^{\rm +7.8}_{-6.8}$	    & 3.3 &  5.1 & $	      0.75_{-	   0.11}^{\rm +	 0.14}$ & $	 1.08_{-      0.03}^{\rm +      0.19}$ & $      0.26_{-	 0.17}^{\rm +      0.17}$ &   9.85E-07 &   1.26E-06  & 0.75 (8)  \\
190118.29-365906.7     & $51.8^{\rm +8.7}_{-7.6}$	    & 2.1 &  6.0 & $	      0.08_{-	   0.15}^{\rm +	 0.15}$ & $	 0.26_{-      0.18}^{\rm +      0.18}$ & $     -0.19_{-	 0.18}^{\rm +      0.17}$ &   1.24E-06 &   1.56E-06  & 0.79 (8)  \\
190118.90-365828.4     & $156.8^{\rm +13.8}_{-12.7}$    & 1.4 &  11.4 & $	      -0.53_{-      0.07}^{\rm +	  0.07}$ & $	 -0.49_{-      0.08}^{\rm +      0.08}$ & $     -0.30_{-	  0.14}^{\rm +	0.14}$ &   3.62E-06 &	4.43E-06 & 0.81 (8)  \\
190119.39-370142.0     & $85.5^{\rm +10.7}_{-9.6}$      & 1.8 &  8.0 & $	     -0.26_{-	   0.11}^{\rm +	 0.11}$ & $	-0.12_{-      0.13}^{\rm +      0.13}$ & $     -0.33_{-	 0.15}^{\rm +      0.16}$ &   2.01E-06 &   2.76E-06  & 0.72 (8)  \\
190120.07-370422.9     & $28.8^{\rm +7.4}_{-6.3}$	    & 3.0 &  3.9 & $	      0.44_{-	   0.18}^{\rm +	 0.20}$ & $	 0.32_{-      0.30}^{\rm +      0.30}$ & $      0.25_{-	 0.22}^{\rm +      0.22}$ &   1.10E-06 &   1.21E-06  & 0.57 (7)  \\
190120.86-370302.9     & $166.4^{\rm +14.2}_{-13.2}$    & 1.1 &  11.7 & $	      -0.86_{-      0.04}^{\rm +	  0.05}$ & $	 -0.77_{-      0.05}^{\rm +      0.06}$ & $     -0.73_{-	  0.15}^{\rm +	0.21}$ &   7.35E-06 &	6.24E-06 & 0.63 (7)  \\
190122.40-370055.4     & $30.4^{\rm +7.0}_{-5.9}$	    & 2.5 &  4.4 & $	      0.10_{-	   0.20}^{\rm +	 0.20}$ & $	-0.51_{-      0.23}^{\rm +      0.26}$ & $      0.52_{-	 0.23}^{\rm +      0.26}$ &   6.57E-07 &   1.11E-06  & 0.66 (8)  \\
%190122.84-365522.0$^*$ & $19.1^{\rm +6.0}_{-4.9}$	    & 3.4 &  3.2 & $	      0.64_{-	   0.19}^{\rm +	 0.24}$ & $	 0.70_{-      0.33}^{\rm +      0.54}$ & $      0.54_{-	 0.22}^{\rm +      0.25}$ &   4.81E-07 &   5.62E-07  & 0.79 (8)  \\
%190123.49-365641.3$^*$ & $13.2^{\rm +5.2}_{-4.1}$	    & 1.9 &  2.5 & $	     -0.51_{-	   0.27}^{\rm +	 0.30}$ & $	 0.02_{-      0.34}^{\rm +      0.32}$ & $     -0.80_{-	 0.21}^{\rm +      0.43}$ &   2.04E-07 &   3.83E-07  & 0.83 (8)  \\
190123.95-365721.5     & $14.9^{\rm +5.3}_{-4.2}$	    & 3.3 &  2.8 & $	      0.72_{-	   0.19}^{\rm +	 0.27}$ & $	 0.32_{-      0.63}^{\rm +      0.59}$ & $      0.64_{-	 0.23}^{\rm +      0.29}$ &   2.70E-07 &   4.40E-07  & 0.81 (8)  \\
190125.61-370453.9     & $250.9^{\rm +17.2}_{-16.2}$    & 1.1 &  14.6 & $	      -0.91_{-      0.03}^{\rm +	  0.03}$ & $	 -0.70_{-      0.05}^{\rm +      0.05}$ & $     -0.94_{-	  0.05}^{\rm +	0.11}$ &   1.09E-05 &	9.58E-06 & 0.60 (7)  \\
190125.75-365919.3     & $2094.1^{\rm +46.8}_{-45.8}$   & 1.6 &   44.7 & $     -0.38_{-  0.02}^{\rm +	   0.02}$ & $	  -0.28_{-	0.02}^{\rm +      0.02}$ & $     -0.31_{-	   0.03}^{\rm +	 0.03}$ &   4.40E-05 &   6.13E-05        & 0.81 (8)  \\
190126.10-365501.9     & $90.2^{\rm +10.8}_{-9.7}$      & 2.4 &  8.4 & $	      0.21_{-	   0.11}^{\rm +	 0.11}$ & $	 0.20_{-      0.15}^{\rm +      0.15}$ & $      0.10_{-	 0.13}^{\rm +      0.13}$ &   2.57E-06 &   2.48E-06  & 0.85 (8)  \\
190127.15-365908.6     & $883.3^{\rm +30.8}_{-29.8}$    & 1.0 &  28.7 & $	      -0.85_{-      0.02}^{\rm +	  0.02}$ & $	 -0.80_{-      0.02}^{\rm +      0.02}$ & $     -0.49_{-	  0.09}^{\rm +	0.09}$ &   3.33E-05 &	2.61E-05 & 0.82 (8)  \\
190128.72-365931.9     & $3700.5^{\rm +61.9}_{-60.8}$   & 1.5 &   59.8 & $     -0.50_{-  0.01}^{\rm +	   0.01}$ & $	  -0.42_{-	0.02}^{\rm +      0.02}$ & $     -0.32_{-	   0.03}^{\rm +	 0.03}$ &   7.52E-05 &   1.02E-04        & 0.87 (8)  \\
190129.01-370148.8     & $969.4^{\rm +32.2}_{-31.2}$    & 1.1 &  30.1 & $	      -0.81_{-      0.02}^{\rm +	  0.02}$ & $	 -0.75_{-      0.02}^{\rm +      0.02}$ & $     -0.45_{-	  0.07}^{\rm +	0.08}$ &   3.19E-05 &	2.69E-05 & 0.85 (8)  \\
%190131.25-365931.1$^*$ & $13.0^{\rm +5.0}_{-3.8}$	    & 3.0 &  2.6 & $	      0.66_{-	   0.22}^{\rm +	 0.30}$ & $	 0.87_{-      0.16}^{\rm +      0.55}$ & $      0.27_{-	 0.32}^{\rm +      0.32}$ &   2.76E-07 &   3.40E-07  & 0.94 (8)  \\
190131.28-365931.0     & $13.0^{\rm +5.0}_{-3.8}$	    & 3.0 &  2.6 & $	      0.66_{-	   0.22}^{\rm +	 0.30}$ & $	 0.87_{-      0.16}^{\rm +      0.55}$ & $      0.27_{-	 0.32}^{\rm +      0.32}$ &   2.79E-07 &   3.43E-07  & 0.94 (8)  \\
190131.73-365445.4     & $6.2^{\rm +4.1}_{-2.9}$	    & 1.0 & 1.5 & $ -0.98_{-	  0.18}^{\rm +	0.46}$ & $     -0.82_{-      0.20}^{\rm +	   0.49}$ & $	  -0.14_{-	1.35}^{\rm +      0.99}$ &   3.36E-07 &   2.01E-07           & 0.75 (8)  \\
190132.01-365121.7     & $26.4^{\rm +7.3}_{-6.2}$	    & 3.2 &  3.6 & $	      0.62_{-	   0.17}^{\rm +	 0.20}$ & $	 0.34_{-      0.33}^{\rm +      0.33}$ & $      0.31_{-	 0.23}^{\rm +      0.23}$ &   7.21E-07 &   7.84E-07  & 0.72 (8)  \\
190132.34-365803.1     & $22.8^{\rm +6.0}_{-4.9}$	    & 1.6 &  3.8 & $	     -0.81_{-	   0.12}^{\rm +	 0.20}$ & $	-0.37_{-      0.23}^{\rm +      0.23}$ & $     -0.68_{-	 0.28}^{\rm +      0.40}$ &   3.69E-07 &   6.28E-07  & 0.89 (8)  \\
190133.61-370606.2     & $29.0^{\rm +7.5}_{-6.4}$	    & 2.0 &  3.9 & $	     -0.08_{-	   0.21}^{\rm +	 0.20}$ & $	-0.23_{-      0.24}^{\rm +      0.24}$ & $     -0.05_{-	 0.30}^{\rm +      0.28}$ &   4.78E-07 &   1.16E-06  & 0.57 (7)  \\
190133.84-365745.0     & $841.9^{\rm +30.0}_{-29.0}$    & 2.1 &  28.0 & $	       0.08_{-      0.04}^{\rm +	  0.04}$ & $	  0.13_{-      0.04}^{\rm +      0.04}$ & $     -0.07_{-	  0.04}^{\rm +	0.04}$ &   1.61E-05 &	2.21E-05 & 0.94 (8)  \\
190134.65-365438.4     & $8.3^{\rm +4.4}_{-3.3}$	    & 2.6 &  1.9 & $	      0.24_{-	   0.41}^{\rm +	 0.40}$ & $	-0.37_{-      0.53}^{\rm +      0.53}$ & $      0.39_{-	 0.51}^{\rm +      0.52}$ &   3.08E-07 &   2.25E-07  & 0.89 (8)  \\
190134.84-370056.7     & $25457.3^{\rm +160.6}_{-159.6}$& 1.3 &   158.5 & $     -0.56_{-	      0.01}^{\rm +      0.01}$ & $     -0.56_{-	 0.01}^{\rm +      0.01}$ & $     -0.24_{-      0.01}^{\rm +	  0.01}$ &   6.03E-04 &6.89E-04  & 0.89 (8)  \\
190135.42-370340.9     & $41.3^{\rm +7.9}_{-6.8}$	    & 1.8 &  5.2 & $	     -0.26_{-	   0.17}^{\rm +	 0.17}$ & $	-0.24_{-      0.20}^{\rm +      0.20}$ & $      0.03_{-	 0.24}^{\rm +      0.23}$ &   7.58E-07 &   1.18E-06  & 0.84 (8)  \\
190137.07-365601.9     & $114.0^{\rm +11.8}_{-10.7}$    & 3.8 &   9.7 & $	       0.83_{-      0.05}^{\rm +	  0.07}$ & $	  0.58_{-      0.19}^{\rm +      0.22}$ & $      0.67_{-	  0.07}^{\rm +	0.08}$ &   3.54E-06 &	3.37E-06 & 0.79 (8)  \\
190139.15-365329.6     & $7715.4^{\rm +88.9}_{-87.9}$   & 1.1 &   86.8 & $     -0.79_{-  0.01}^{\rm +	   0.01}$ & $	  -0.73_{-	0.01}^{\rm +      0.01}$ & $     -0.44_{-	   0.02}^{\rm +	 0.02}$ &   2.19E-04 &   2.17E-04        & 0.85 (8)  \\
190139.34-370207.8     & $710.8^{\rm +27.7}_{-26.7}$    & 1.0 &  25.6 & $	      -0.89_{-      0.02}^{\rm +	  0.02}$ & $	 -0.84_{-      0.02}^{\rm +      0.02}$ & $     -0.63_{-	  0.10}^{\rm +	0.11}$ &   2.37E-05 &	1.96E-05 & 0.90 (8)  \\
190140.40-365142.4     & $586.8^{\rm +25.5}_{-24.4}$    & 2.6 &  23.1 & $	       0.41_{-      0.04}^{\rm +	  0.04}$ & $	  0.39_{-      0.05}^{\rm +      0.05}$ & $      0.03_{-	  0.05}^{\rm +	0.05}$ &   1.33E-05 &	1.70E-05 & 0.80 (8)  \\
190140.63-365758.9     & $2.4^{\rm +2.9}_{-1.6}$	    & 0.7 &    0.8 & $     -1.35_{-  0.65}^{\rm +		0.94}$ & $     -1.08_{-      0.11}^{\rm +	   0.82}$ & $	   0.52_{-	0.00}^{\rm +      2.14}$ &   3.35E-07 &   1.03E-07   & 0.68 (8)  \\
190140.67-365923.9     & $13.3^{\rm +4.8}_{-3.7}$	    & 3.5 &  2.7 & $	      0.58_{-	   0.25}^{\rm +	 0.30}$ & $	-1.09_{-      0.12}^{\rm +      0.84}$ & $      1.02_{-	 0.01}^{\rm +      0.30}$ &   2.42E-07 &   3.61E-07  & 0.90 (8)  \\
190140.70-370052.9     & $70.8^{\rm +9.5}_{-8.5}$	    & 2.8 &  7.4 & $	      0.19_{-	   0.13}^{\rm +	 0.13}$ & $	-0.11_{-      0.19}^{\rm +      0.18}$ & $      0.38_{-	 0.14}^{\rm +      0.15}$ &   1.39E-06 &   1.84E-06  & 0.95 (8)  \\
190140.81-365234.0     & $21015.9^{\rm +146.0}_{-145.0}$& 1.4 &   143.9 & $     -0.57_{-	      0.01}^{\rm +      0.01}$ & $     -0.52_{-	 0.01}^{\rm +      0.01}$ & $     -0.31_{-      0.01}^{\rm +	  0.01}$ &   4.87E-04 & 6.18E-04 & 0.80 (8)  \\
190141.35-370419.3     & $29.2^{\rm +7.1}_{-6.0}$	    & 1.9 &  4.1 & $	     -0.21_{-	   0.20}^{\rm +	 0.20}$ & $	-0.52_{-      0.21}^{\rm +      0.24}$ & $      0.32_{-	 0.30}^{\rm +      0.30}$ &   5.29E-07 &   8.10E-07  & 0.85 (8)  \\
190141.49-370441.7     & $32.0^{\rm +7.4}_{-6.3}$	    & 2.1 &  4.3 & $	      0.05_{-	   0.20}^{\rm +	 0.19}$ & $	-0.31_{-      0.23}^{\rm +      0.23}$ & $      0.11_{-	 0.28}^{\rm +      0.27}$ &   4.64E-07 &   9.07E-07  & 0.81 (8)  \\
190141.55-365831.6     & $3037.4^{\rm +56.1}_{-55.1}$   & 2.7 &   54.1 & $      0.40_{-  0.02}^{\rm +	   0.02}$ & $	   0.38_{-	0.02}^{\rm +      0.02}$ & $      0.16_{-	   0.02}^{\rm +	 0.02}$ &   9.61E-05 &   1.14E-04        & 0.65 (8)  \\
190141.62-365953.1     & $1038.2^{\rm +33.2}_{-32.2}$   & 1.3 &   31.2 & $     -0.61_{-  0.02}^{\rm +	   0.03}$ & $	  -0.60_{-	0.03}^{\rm +      0.03}$ & $     -0.25_{-	   0.06}^{\rm +	 0.06}$ &   2.28E-05 &   2.87E-05        & 0.89 (8)  \\
\hline
190143.12-365020.9     & $45.2^{\rm +8.8}_{-7.7}$	    & 3.2 &  5.1 & $	      0.71_{-	   0.11}^{\rm +	 0.14}$ & $	 0.81_{-      0.15}^{\rm +      0.26}$ & $      0.39_{-	 0.15}^{\rm +      0.16}$ &   9.41E-07 &   1.44E-06  & 0.71 (8)  \\
190143.80-370614.0     & $155.5^{\rm +14.1}_{-13.0}$    & 2.2 &  11.0 & $	       0.07_{-      0.08}^{\rm +	  0.08}$ & $	 -0.04_{-      0.11}^{\rm +      0.10}$ & $      0.02_{-	  0.11}^{\rm +	0.11}$ &   3.81E-06 &	4.75E-06 & 0.77 (8)  \\
190144.22-365853.6     & $72.5^{\rm +9.6}_{-8.5}$	    & 2.8 &  7.6 & $	      0.34_{-	   0.12}^{\rm +	 0.12}$ & $	 0.46_{-      0.16}^{\rm +      0.17}$ & $      0.14_{-	 0.14}^{\rm +      0.14}$ &   2.08E-06 &   2.56E-06  & 0.69 (8)  \\
190145.91-364929.3     & $119.6^{\rm +12.8}_{-11.7}$    & 3.5 &   9.4 & $	       0.76_{-      0.06}^{\rm +	  0.07}$ & $	  0.64_{-      0.15}^{\rm +      0.18}$ & $      0.57_{-	  0.08}^{\rm +	0.09}$ &   3.82E-06 &	4.45E-06 & 0.58 (7)  \\
190146.18-370241.8     & $20.7^{\rm +5.9}_{-4.8}$	    & 3.0 &  3.5 & $	      0.59_{-	   0.20}^{\rm +	 0.23}$ & $	 0.71_{-      0.23}^{\rm +      0.35}$ & $      0.11_{-	 0.26}^{\rm +      0.25}$ &   5.74E-07 &   5.83E-07  & 0.83 (8)  \\
190147.01-365326.9     & $22.9^{\rm +6.2}_{-5.1}$	    & 3.7 &  3.7 & $	  0.74_{-      0.15}^{\rm +      0.20}$ & $      0.04_{-	  0.61}^{\rm +	0.53}$ & $	0.77_{-      0.15}^{\rm +	   0.21}$ &   4.84E-07 &   6.83E-07      & 0.79 (8)  \\
190148.02-365722.4     & $3604.2^{\rm +61.0}_{-60.0}$   & 3.3 &   59.0 & $      0.72_{-	 0.01}^{\rm +      0.01}$ & $      0.63_{-      0.02}^{\rm +	  0.02}$ & $	  0.40_{-      0.02}^{\rm +      0.02}$ &	8.42E-05 &   9.26E-05    & 0.97 (8)  \\
190148.46-365714.5     & $21.2^{\rm +5.8}_{-4.7}$	    & 4.1 &  3.7 & $	  1.02_{-      0.01}^{\rm +      0.15}$ & $      1.18_{-	  0.48}^{\rm +	1.12}$ & $	0.83_{-      0.12}^{\rm +	   0.20}$ &   4.77E-07 &   5.43E-07      & 0.97 (8)  \\
190148.53-370611.2     & $50.6^{\rm +9.1}_{-8.0}$	    & 4.1 &  5.6 & $	  0.70_{-      0.10}^{\rm +      0.13}$ & $      0.54_{-	  0.26}^{\rm +	0.30}$ & $	0.58_{-      0.13}^{\rm +	   0.14}$ &   2.44E-06 &   1.56E-06      & 0.72 (8)  \\
190148.97-370151.7     & $8.0^{\rm +4.1}_{-2.9}$	    & 2.8 & 1.9 & $	 0.82_{-      0.18}^{\rm +      0.40}$ & $      0.56_{-	 0.51}^{\rm +      0.63}$ & $      0.22_{-      0.45}^{\rm +	  0.42}$ &   2.75E-07 &   2.85E-07       & 0.68 (8)  \\
190149.35-370028.6     & $110.3^{\rm +11.6}_{-10.5}$    & 0.9 &   9.5 & $	  -0.94_{-	0.03}^{\rm +      0.05}$ & $     -0.87_{-	   0.05}^{\rm +	 0.06}$ & $	-0.86_{-      0.16}^{\rm +      0.42}$ &   5.04E-06 &   3.11E-06     & 0.89 (8)  \\
190150.38-365935.3     & $10.4^{\rm +4.4}_{-3.3}$	    & 4.1 &  2.4 & $	  0.84_{-      0.15}^{\rm +      0.33}$ & $      1.10_{-	  0.13}^{\rm +	0.82}$ & $	0.45_{-      0.32}^{\rm +	   0.35}$ &   2.80E-07 &   2.96E-07      & 0.89 (8)  \\
190150.45-365638.1     & $259.2^{\rm +17.1}_{-16.1}$    & 2.1 &  15.1 & $	   0.04_{-	0.06}^{\rm +      0.06}$ & $     -0.03_{-	   0.08}^{\rm +	 0.08}$ & $	 0.05_{-      0.08}^{\rm +      0.08}$ &   5.18E-06 &   6.83E-06     & 0.95 (8)  \\
190150.66-365809.9     & $2622.5^{\rm +52.2}_{-51.2}$   & 3.1 &   50.2 & $      0.57_{-	 0.02}^{\rm +      0.02}$ & $      0.49_{-      0.03}^{\rm +	  0.03}$ & $	  0.29_{-      0.02}^{\rm +      0.02}$ &	8.70E-05 &   9.74E-05    & 0.68 (8)  \\
190151.11-365412.5     & $59.0^{\rm +8.9}_{-7.8}$	    & 1.9 &  6.7 & $	 -0.10_{-      0.14}^{\rm +      0.14}$ & $      0.05_{-	  0.16}^{\rm +	0.16}$ & $     -0.27_{-      0.18}^{\rm +	   0.18}$ &   1.04E-06 &   1.63E-06      & 0.90 (8)  \\
190152.10-370542.4     & $68.3^{\rm +10.0}_{-8.9}$      & 3.4 &  6.8 & $	  0.69_{-      0.09}^{\rm +      0.11}$ & $      0.40_{-	  0.23}^{\rm +	0.24}$ & $	0.55_{-      0.11}^{\rm +	   0.12}$ &   1.20E-06 &   1.99E-06      & 0.79 (8)  \\
190152.20-365809.0     & $15.4^{\rm +5.1}_{-4.0}$	    & 5.1 &  3.0 & $	  1.02_{-      0.01}^{\rm +      0.21}$ & $     -0.08_{-	  0.00}^{\rm +	1.60}$ & $	1.01_{-      0.00}^{\rm +	   0.21}$ &   5.60E-07 &   4.86E-07      & 0.81 (8)  \\
190152.63-365700.2     & $247.1^{\rm +16.8}_{-15.7}$    & 2.2 &  14.7 & $	   0.13_{-	0.07}^{\rm +      0.07}$ & $      0.29_{-	   0.08}^{\rm +	 0.08}$ & $	-0.16_{-      0.08}^{\rm +      0.08}$ &   4.99E-06 &   6.45E-06     & 0.97 (8)  \\
190153.67-365708.3     & $980.1^{\rm +32.3}_{-31.3}$    & 3.3 &  30.3 & $	   0.50_{-	0.03}^{\rm +      0.03}$ & $      0.18_{-	   0.05}^{\rm +	 0.05}$ & $	 0.43_{-      0.03}^{\rm +      0.03}$ &   2.34E-05 &   2.59E-05     & 0.95 (8)  \\
190153.92-365228.8     & $23.1^{\rm +6.5}_{-5.4}$	    & 3.5 &  3.6 & $	  0.73_{-      0.15}^{\rm +      0.20}$ & $      0.84_{-	  0.18}^{\rm +	0.46}$ & $	0.48_{-      0.21}^{\rm +	   0.22}$ &   6.05E-07 &   7.05E-07      & 0.76 (8)  \\
190155.31-365722.0     & $253.1^{\rm +17.0}_{-15.9}$    & 5.2 &  14.9 & $	   0.97_{-	0.01}^{\rm +      0.02}$ & $      0.78_{-	   0.22}^{\rm +	 0.41}$ & $	 0.95_{-      0.02}^{\rm +      0.03}$ &   1.00E-05 &   7.54E-06     & 0.85 (8)  \\
190155.61-365651.1     & $40.1^{\rm +7.5}_{-6.4}$	    & 4.5 &  5.4 & $	  0.96_{-      0.03}^{\rm +      0.10}$ & $      0.65_{-	  0.38}^{\rm +	0.56}$ & $	0.81_{-      0.10}^{\rm +	   0.14}$ &   1.56E-06 &   1.24E-06      & 0.80 (8)  \\
190155.76-365727.7     & $19.3^{\rm +5.6}_{-4.4}$	    & 4.4 &  3.5 & $	  1.02_{-      0.00}^{\rm +      0.17}$ & $      1.06_{-	  0.06}^{\rm +	0.67}$ & $	0.60_{-      0.20}^{\rm +	   0.24}$ &   7.67E-07 &   7.15E-07      & 0.68 (8)  \\
190155.85-365204.3     & $371.7^{\rm +20.5}_{-19.5}$    & 3.7 &  18.1 & $	   0.78_{-	0.03}^{\rm +      0.04}$ & $      0.53_{-	   0.09}^{\rm +	 0.10}$ & $	 0.61_{-      0.04}^{\rm +      0.05}$ &   1.14E-05 &   1.12E-05     & 0.80 (8)  \\
190156.39-365728.4     & $106.4^{\rm +11.4}_{-10.3}$    & 4.7 &   9.4 & $	   0.98_{-	0.01}^{\rm +      0.04}$ & $      0.36_{-	   0.73}^{\rm +	 0.69}$ & $	 0.96_{-      0.02}^{\rm +      0.05}$ &   6.32E-06 &   5.01E-06     & 0.55 (8)  \\
190157.46-370311.9     & $24.2^{\rm +6.4}_{-5.3}$	    & 1.4 &  3.8 & $	 -0.47_{-      0.20}^{\rm +      0.22}$ & $     -0.48_{-	  0.22}^{\rm +	0.24}$ & $     -0.15_{-      0.40}^{\rm +	   0.38}$ &   4.04E-07 &   6.64E-07      & 0.85 (8)  \\
190158.32-370027.5     & $23.1^{\rm +6.0}_{-4.9}$	    & 1.8 &  3.9 & $	 -0.19_{-      0.23}^{\rm +      0.23}$ & $     -0.22_{-	  0.27}^{\rm +	0.26}$ & $     -0.11_{-      0.34}^{\rm +	   0.32}$ &   4.48E-07 &   6.49E-07      & 0.89 (8)  \\
190158.79-365750.1     & $13.3^{\rm +4.8}_{-3.7}$	    & 1.3 &  2.7 & $	 -0.78_{-      0.17}^{\rm +      0.29}$ & $     -0.58_{-	  0.24}^{\rm +	0.29}$ & $     -1.37_{-      0.71}^{\rm +	   0.95}$ &   3.11E-07 &   5.39E-07      & 0.63 (7)  \\
190200.11-370222.3     & $524.4^{\rm +24.0}_{-22.9}$    & 1.0 &  21.9 & $	  -0.92_{-	0.02}^{\rm +      0.02}$ & $     -0.86_{-	   0.02}^{\rm +	 0.03}$ & $	-0.55_{-      0.13}^{\rm +      0.15}$ &   2.05E-05 &   1.47E-05     & 0.87 (8)  \\
190200.49-365507.2     & $25.1^{\rm +6.3}_{-5.2}$	    & 3.4 &  4.0 & $	  0.96_{-      0.04}^{\rm +      0.15}$ & $      0.79_{-	  0.25}^{\rm +	0.53}$ & $	0.62_{-      0.17}^{\rm +	   0.21}$ &   7.74E-07 &   6.92E-07      & 0.88 (8)  \\
190201.92-370743.0     & $5893.5^{\rm +77.8}_{-76.8}$   & 1.1 &   75.7 & $     -0.78_{-	 0.01}^{\rm +      0.01}$ & $     -0.74_{-      0.01}^{\rm +	  0.01}$ & $	 -0.39_{-      0.03}^{\rm +      0.03}$ &	5.79E-04 &   4.93E-04    & 0.20 (2)  \\
190201.94-365400.1     & $42.6^{\rm +7.8}_{-6.8}$	    & 3.4 &  5.4 & $	      0.76_{-	   0.10}^{\rm +	 0.13}$ & $	 0.56_{-      0.24}^{\rm +      0.28}$ & $      0.42_{-	 0.16}^{\rm +      0.17}$ &   1.08E-06 &   1.18E-06  & 0.88 (8)  \\
190202.16-365919.1     & $11.9^{\rm +4.7}_{-3.6}$	    & 4.6 &  2.5 & $	      0.88_{-	   0.11}^{\rm +	 0.30}$ & $	 1.97_{-      4.13}^{\rm +      2.37}$ & $      0.87_{-	 0.13}^{\rm +      0.29}$ &   3.65E-07 &   3.18E-07  & 0.93 (8)  \\
190203.82-365851.0     & $39.8^{\rm +7.5}_{-6.4}$	    & 4.1 &  5.3 & $	      0.92_{-	   0.06}^{\rm +	 0.12}$ & $	 0.55_{-      0.35}^{\rm +      0.42}$ & $      0.70_{-	 0.12}^{\rm +      0.15}$ &   1.22E-06 &   1.08E-06  & 0.92 (8)  \\
190204.22-370420.9     & $175.6^{\rm +14.6}_{-13.5}$    & 2.3 &  12.1 & $	       0.16_{-      0.08}^{\rm +	  0.08}$ & $	  0.01_{-      0.10}^{\rm +      0.10}$ & $      0.13_{-	  0.09}^{\rm +	0.09}$ &   4.10E-06 &	5.40E-06 & 0.75 (8)  \\
%190204.34-365859.0$^*$ & $12.7^{\rm +4.8}_{-3.7}$	    & 4.2 &  2.6 & $	      0.90_{-	   0.10}^{\rm +	 0.28}$ & $	 1.25_{-      0.43}^{\rm +      0.91}$ & $      0.57_{-	 0.25}^{\rm +      0.30}$ &   3.73E-07 &   3.48E-07  & 0.91 (8)  \\
%190205.84-365444.2$^*$ & $17.2^{\rm +5.7}_{-4.5}$	    & 2.9 &  3.0 & $	      0.65_{-	   0.20}^{\rm +	 0.25}$ & $	 0.64_{-      0.33}^{\rm +      0.46}$ & $      0.33_{-	 0.27}^{\rm +      0.28}$ &   4.21E-07 &   4.76E-07  & 0.83 (8)  \\
%190206.33-370244.8$^*$ & $20.4^{\rm +6.1}_{-5.0}$	    & 2.8 &  3.4 & $	      0.15_{-	   0.25}^{\rm +	 0.25}$ & $	-0.19_{-      0.38}^{\rm +      0.36}$ & $      0.44_{-	 0.27}^{\rm +      0.29}$ &   9.57E-07 &   5.69E-07  & 0.86 (8)  \\
190210.72-370559.2     & $42.7^{\rm +8.3}_{-7.2}$	    & 2.6 &  5.2 & $	      0.10_{-	   0.17}^{\rm +	 0.17}$ & $	-0.47_{-      0.20}^{\rm +      0.22}$ & $      0.53_{-	 0.18}^{\rm +      0.21}$ &   2.67E-06 &   2.50E-06  & 0.38 (3)  \\
190211.99-370309.4     & $77.1^{\rm +10.3}_{-9.2}$      & 1.2 &  7.5 & $	     -0.76_{-	   0.08}^{\rm +	 0.09}$ & $	-0.79_{-      0.07}^{\rm +      0.10}$ & $     -0.07_{-	 0.32}^{\rm +      0.30}$ &   2.87E-06 &   2.30E-06  & 0.76 (8)  \\
%190214.60-370032.0$^*$ & $18.5^{\rm +5.9}_{-4.8}$	    & 3.0 &  3.2 & $	      0.39_{-	   0.24}^{\rm +	 0.25}$ & $	-0.19_{-      0.43}^{\rm +      0.40}$ & $      0.52_{-	 0.26}^{\rm +      0.30}$ &   3.13E-07 &   5.41E-07  & 0.77 (8)  \\
190215.00-365232.2     & $30.4^{\rm +7.3}_{-6.2}$	    & 1.8 &  4.2 & $	     -0.29_{-	   0.19}^{\rm +	 0.20}$ & $	-0.75_{-      0.16}^{\rm +      0.23}$ & $      0.63_{-	 0.23}^{\rm +      0.30}$ &   1.19E-06 &   1.48E-06  & 0.48 (7)  \\
190216.54-365637.8     & $27.1^{\rm +6.9}_{-5.8}$	    & 3.7 &  3.9 & $	      0.84_{-	   0.10}^{\rm +	 0.17}$ & $	 0.43_{-      0.48}^{\rm +      0.51}$ & $      0.71_{-	 0.15}^{\rm +      0.19}$ &   6.36E-07 &   7.70E-07  & 0.84 (8)  \\
190219.19-370346.3     & $53.5^{\rm +9.2}_{-8.2}$	    & 3.4 &  5.8 & $	      0.77_{-	   0.09}^{\rm +	 0.12}$ & $	 0.72_{-      0.19}^{\rm +      0.28}$ & $      0.51_{-	 0.13}^{\rm +      0.14}$ &   1.31E-06 &   1.91E-06  & 0.66 (8)  \\
190221.22-365013.5     & $52.0^{\rm +9.0}_{-7.9}$	    & 2.7 &  5.8 & $	      0.24_{-	   0.15}^{\rm +	 0.15}$ & $	-0.11_{-      0.21}^{\rm +      0.20}$ & $      0.26_{-	 0.18}^{\rm +      0.18}$ &   4.18E-06 &   4.32E-06  & 0.26 (2)  \\
190221.79-365604.2     & $59.5^{\rm +9.6}_{-8.5}$	    & 4.4 &  6.2 & $	      0.85_{-	   0.07}^{\rm +	 0.10}$ & $	 0.03_{-      0.37}^{\rm +      0.34}$ & $      0.79_{-	 0.09}^{\rm +      0.11}$ &   1.94E-06 &   1.78E-06  & 0.80 (8)  \\
190222.12-365313.2     & $20.0^{\rm +6.4}_{-5.3}$	    & 1.9 &  3.1 & $	     -0.24_{-	   0.25}^{\rm +	 0.25}$ & $	-0.02_{-      0.28}^{\rm +      0.27}$ & $     -0.55_{-	 0.28}^{\rm +      0.33}$ &   7.58E-07 &   1.22E-06  & 0.39 (3)  \\
190222.13-365541.0     & $5458.3^{\rm +75.0}_{-73.9}$   & 1.3 &   72.8 & $     -0.63_{-  0.01}^{\rm +	   0.01}$ & $	  -0.55_{-	0.01}^{\rm +      0.01}$ & $     -0.38_{-	   0.02}^{\rm +	 0.02}$ &   1.89E-04 &   2.25E-04        & 0.59 (8)  \\
190222.71-365308.5     & $21.5^{\rm +6.4}_{-5.3}$	    & 2.5 &  3.4 & $	      0.17_{-	   0.24}^{\rm +	 0.24}$ & $	 0.11_{-      0.34}^{\rm +      0.32}$ & $      0.16_{-	 0.29}^{\rm +      0.28}$ &   1.26E-06 &   1.46E-06  & 0.35 (3)  \\
190227.05-365813.2     & $359.7^{\rm +20.4}_{-19.4}$    & 1.6 &  17.6 & $	      -0.43_{-      0.05}^{\rm +	  0.05}$ & $	 -0.37_{-      0.06}^{\rm +      0.06}$ & $     -0.20_{-	  0.08}^{\rm +	0.08}$ &   8.68E-06 &	1.15E-05 & 0.71 (8)  \\
190233.07-365821.1$^*$ & $104.6^{\rm +11.5}_{-10.4}$    & 2.2 &   9.1 & $	       0.01_{-      0.10}^{\rm +	  0.10}$ & $	 -0.48_{-      0.12}^{\rm +      0.13}$ & $      0.50_{-	  0.12}^{\rm +	0.13}$ &   8.05E-06 &	8.62E-06 & 0.28 (2)  \\
\hline  						\end{tabular}
\end{table}