\begin{table}
%\centering
\par
\caption{Model fit of the three components A, B, and C to the 
uv-data. $S$ is the flux density, $d$ denotes the separation from 
the phase center. \label{model_tab}}
\begin{tabular}{p{0.14\linewidth}p{0.16\linewidth}p{0.16\linewidth}p{0.16\linewidth}cp{0.16\linewidth}}
   \hline \hline
Comp. & $S$ [mJy] & $d$ [mas] & Size [mas]& PA \\
    \hline
	A		&$  9.4\pm5 $& $2.41\pm0.6$& $0.69\pm0.20$ &  $72.5\pm3$  \\
	B		&$ 45.2\pm10$& 0.00        & $0.15\pm0.05$ &   0.0  \\
	C		&$ 14.7\pm7 $& $1.02\pm0.3$& $<$0.04  &--$117.1\pm5$  \\
\par
    \hline
 \end{tabular}
%\]
\end{table}