\begin{table}%t3
\small
\caption{OGLE yields with fixed red noise level.}
\label{table:ogle_results}
%\centering
\par
%\small{
\begin{tabular}{cccccccc}
\hline\hline
\multicolumn2{c}{Field}  & Mean red & RV follow-up & \multicolumn4{c}{Number of planets}\\
\multicolumn2{c}{of view} & noise level & to Vmag &detected& \multicolumn3{c}{simulated with}\\
& & & & & 0 & 1.5 & 3\\
& & & & & \multicolumn3{c}{VHJ added ($P < 2$~days)}\\\hline
\multicolumn2{c}{Bulge} & 3.6 & 17.5 & 2 & 0.4 & 0.6 & 0.9\\
\hline
Carina & original & 3.1 & 17.5 & 3 & 3.4 & 4.1 & 4.8\\
& updated & 2.1 & 17.5 & +(0--1) & $+1.1$ & $+1.1$ & $+1.1$\\
\hline
\multicolumn2{c}{Centaurus}  & 3.1 & {\modif 17.0} & 0 & 1.4 & 1.8 & 2.2\\
\hline
\multicolumn2{c}{Total}  & & & 6 & 6.3 & 7.6 & 9.0\\
\hline 
\end{tabular}
%}
\end{table}