\begin{table}%t2
\caption{Near-infrared line detections obtained with SOFI.}\label{tabletwo}
%\centering
\small
\begin{tabular}{lrrr}
\hline\hline
  Line &  Wavelength & Flux $F$ & $N(v'J')$ \\
                        &  (\ang)     & $(10^{-19}$~W~m$^{-2})$
                                      & $(10^{14} $ cm$^{-2})$\\
\hline
grism GB order 1 \\
 (6, 3)S(8)  & 0.953  &    4.7(1.0) &  0.3 (0.1)\\ 
(6, 3)S(4)  & 0.959  &    1.7(1.0) &  0.1 (0.0)\\
 (6, 3)S(3)  & 0.966  &    4.1(1.0) &  0.4 (0.1)\\ 
(7, 4)S(3)*  & 1.028  &    4.8(1.0) &  0.3 (0.1)\\ 
(7, 4)S(5)*  & 1.029  &    4.8(1.0) &  0.3 (0.1)\\ 
(5, 2)O(4)*  & 1.039  &    5.0(1.0) &  6.0 (1.2) \\ 
(6, 3)Q(3)*  & 1.039  &    5.0(1.0) &  1.4 (0.3) \\ 
(6, 3)S(15)*  & 1.040  &    5.0(1.0) &  1.3 (0.3)\\
 (2, 0)S(9)  & 1.054  &   75.8(7.6) & 18.1 (3.6)\\ 
(2, 0)S(8)  & 1.058  &   23.0(2.3) &  5.2 (1.0)\\ 
(2, 0)S(13)  & 1.061  &    7.6(1.0) &  3.2 (0.6)\\ 
(2, 0)S(7)  & 1.064  &   78.4(7.8) & 17.3 (3.5)\\ 
(2, 0)S(6)  & 1.073  &   30.1(3.0) &  6.7 (1.3)\\ 
(2, 0)S(15)  & 1.078  &    $\le$1.2 &  $\le$0.9 \\ 
(2, 0)S(5)  & 1.085  &  106.9(10.7) & 24.8 (5.0)\\ 
(2, 0)S(4)  & 1.100  &   31.0(3.1) &  7.8 (1.6)\\ 
(2, 0)S(3)  & 1.117  &   60.4(6.0) & 17.1 (3.4)\\ 
(3, 1)S(9)*  & 1.120  &   29.7(3.0) &  3.6 (0.7)\\ 
(3, 1)S(11)*  & 1.121  &   29.7(3.0) &  4.7 (0.9)\\ 
(3, 1)S(8)  & 1.124  &   13.2(1.3) &  1.5 (0.3)\\ 
(3, 1)S(7)  & 1.130  &   36.5(3.7) &  3.9 (0.8)\\ 
(3, 1)S(13)  & 1.132  &    4.1(1.0) &  1.0 (0.2)\\ 
(2, 0)S(2)  & 1.138  &   34.2(3.4) & 11.4 (2.3)\\ 
(3, 1)S(6)  & 1.140  &   17.5(1.7) &  1.8 (0.4)\\ 
(3, 1)S(5)  & 1.152  &   46.3(4.6) &  5.0 (1.0)\\ 
(2, 0)S(1)  & 1.162  &   63.6(6.4) & 27.2 (5.4)\\ 
(3, 1)S(4)  & 1.167  &   17.8(1.8) &  2.0 (0.4)\\ 
(3, 1)S(3)  & 1.186  &   51.2(5.1) &  6.4 (1.3)\\ 
(2, 0)S(0)  & 1.190  &   14.3(1.4) &  9.3 (1.9)\\ 
(4, 2)S(9)*  & 1.196  &   5.6(1.0) &  0.6 (0.1)\\ 
(4, 2)S(10)*  & 1.196  &   5.6(1.0) &  0.7 (0.2)\\ 
(4, 2)S(8)*  & 1.199  &    3.7(1.0) &  0.3 (0.1)\\ 
(4, 2)S(11)*  & 1.199  &    3.7(1.0) &  0.5 (0.1)\\ 
(4, 2)S(7)  & 1.205  &   15.6(1.6) &  1.2 (0.2)\\ 
(3, 1)S(2)  & 1.208  &   13.4(1.3) &  2.0 (0.4)\\ 
(4, 2)S(6)  & 1.214  &    8.0(1.0) &  0.6 (0.1)\\ 
(4, 2)S(5)  & 1.226  &   19.5(1.9) &  1.5 (0.3)\\ 
(3, 1)S(1)  & 1.233  &   30.8(3.1) &  5.7 (1.1)\\ 
(2, 0)Q(1)  & 1.238  &   39.7(4.0) & 17.8 (3.6)\\ 
(2, 0)Q(2)*  & 1.242  &   21.2(2.1) & 13.4 (2.7)\\ 
(4, 2)S(4)*  & 1.242  &   21.2(2.1) &  1.7 (0.3)\\ 
(2, 0)Q(3)  & 1.247  &   41.8(4.2) & 28.3 (5.7)\\ 
(2, 0)Q(4)  & 1.255  &   14.4(1.4) & 10.1 (2.0)\\ 
(4, 2)S(3)  & 1.262  &   19.9(2.0) &  1.7 (0.3)\\ 
(2, 0)Q(5)  & 1.264  &   38.6(3.9) & 27.8 (5.6)\\ 
(2, 0)Q(6)  & 1.274  &    9.6(1.0) &  7.1 (1.4)\\ 
(5, 3)S(9)  & 1.282  &    3.9(1.0) &  0.4 (0.1)\\ 
(4, 2)S(2)*  & 1.285  &    7.7(1.0) &  0.8 (0.2)\\ 
(5, 3)S(10)*  & 1.284  &    7.7(1.0) &  0.9 (0.2)\\ 
(2, 0)Q(7)*  & 1.287  &   29.5(3.0) & 22.3 (4.5)\\ 
(5, 3)S(7)*  & 1.289  &   29.5(3.0) &  2.2 (0.4)\\ 
(2, 0)O(2)  & 1.293  &    7.3(1.0) &  1.9 (0.4)\\ 
(5, 3)S(6)  & 1.298  &    2.9(1.0) &  0.2 (0.0)\\ 
(2, 0)Q(8)  & 1.302  &    6.5(1.0) &  5.1 (1.0)\\ 
(4, 2)S(1)  & 1.312  &   19.8(2.0) &  2.4 (0.5)\\ 
(3, 1)Q(1)  & 1.314  &   15.1(1.5) &  2.8 (0.6)\\ 
(5, 3)S(5)  & 1.311  &   4.0(1.0) &  0.3 (0.1)\\ 
(3, 1)Q(2)*  & 1.318  &   15.9(1.6) &  4.1 (0.8)\\ 
(2, 0)Q(9)*  & 1.319  &   15.9(1.6) & 12.6 (2.5)\\ 
(3, 1)Q(3)  & 1.324  &   15.1(1.5) &  4.2 (0.8)\\ 
(5, 3)S(4)  & 1.327  &    2.9(1.0) &  0.2 (0.0)\\ 
(3, 1)Q(4)  & 1.332  &    6.0(1.0) &  1.7 (0.3)\\ 
\hline
 (2, 0)O(3)  & 1.335  &   32.2(3.2) & 18.7 (3.7)\\ 
(2, 0)Q(10)  & 1.338  &    4.2(1.0) &  3.5 (0.7)\\ 
(3, 1)Q(5)  & 1.342  &   24.3(2.4) &  7.3 (1.5)\\ 
 (5, 3)S(3)  & 1.347  &    8.1(1.0) &  0.6 (0.1)\\ 
(2, 0)Q(12)*  & 1.381  &    7.6(1.0) &  6.7 (1.3)\\ 
(2, 0)O(4)*  & 1.382  &    7.6(1.0) &  7.1 (1.4)\\ 
(6, 4)S(8)*  & 1.384  &    2.2(1.0) &  0.2 (0.1)\\ 
(6, 4)S(9)*  & 1.384  &    2.2(1.0) &  0.3 (0.1)\\ 
(6, 4)S(10)*  & 1.389  &    2.2(1.0) &  0.4 (0.1)\\ 
(6, 4)S(7)*  & 1.388  &    2.2(1.0) &  0.2 (0.0)\\ 
(3, 1)Q(9)  & 1.403  &    9.7(1.0) &  3.3 (0.7)\\ 
(6, 4)S(5)  & 1.408  &    4.1(1.0) &  0.3 (0.1)\\ 
(3, 1)O(3)*  & 1.418  &    6.8(1.0) &  1.6 (0.3)\\ 
(4, 2)Q(4)*  & 1.418  &    6.8(1.0) &  1.3 (0.3)\\ 
(3, 1)Q(10)*  & 1.424  &    6.3(1.0) &  2.2 (0.4)\\ 
(6, 4)S(4)*  & 1.425  &    6.3(1.0) &  0.4 (0.1)\\ 
(4, 2)Q(5)  & 1.430  &    7.1(1.0) &  1.4 (0.3)\\ 
(2, 0)O(5)  & 1.432  &   14.0(1.4) & 20.1 (4.0)\\ 
(4, 2)Q(6)  & 1.443  &    3.1(1.0) &  0.6 (0.2)\\ 
(3, 1)Q(11)  & 1.448  &    9.2(1.0) &  3.3 (0.7)\\ 
(4, 2)Q(7)  & 1.459  &    7.3(1.0) &  1.5 (0.3)\\ 
(2, 0)Q(15)  & 1.465  &    1.7(1.0) &  1.8 (1.0)\\ 
(3, 1)O(4)  & 1.468  &    2.5(1.0) &  0.9 (0.4)\\ 
(3, 1)Q(12)  & 1.474  &    1.7(1.0) &  0.7 (0.4)\\ 
(2, 0)O(6)  & 1.487  &    3.2(1.0) &  7.1 (2.4)\\ 
(5, 3)Q(1)  & 1.493  &    1.9(1.0) &  0.2 (0.1)\\ 
(4, 2)Q(9)  & 1.499  &    6.1(1.0) &  1.3 (0.3)\\ 
(3, 1)Q(13)  & 1.502  &    6.7(1.0) &  2.7 (0.5)\\ 
(5, 3)Q(3)*  & 1.506  &    3.8(1.0) &  0.5 (0.1)\\ 
(7, 5)S(7)*  & 1.506  &    3.8(1.0) &  0.4 (0.1)\\ 
(4, 2)O(3)  & 1.510  &    5.4(1.0) &  0.7 (0.2)\\ 
(5, 3)Q(4)  & 1.516  &    2.0(1.0) &  0.3 (0.2)\\ 
(3, 1)O(5)  & 1.522  &   13.4(1.3) &  7.2 (1.4)\\ 
(3, 1)Q(14)  & 1.533  &   4.0(1.0) &  1.7 (0.2)\\ 
(5, 3)Q(5)  & 1.529  &    4.9(1.0) &  0.7 (0.1)\\ 
(2, 0)O(7)  & 1.546  &    8.6(1.0) & 29.6 (5.9)\\ 
(4, 2)Q(11)  & 1.549  &    3.6(1.0) &  0.9 (0.2)\\ 
(7, 5)S(3)  & 1.562  &    4.5(1.0) &  0.4 (0.1)\\ 
(4, 2)O(4)  & 1.564  &    2.9(1.0) &  0.6 (0.1)\\ 
(3, 1)Q(15)  & 1.569  &    2.0(1.0) &  0.9 (0.2)\\ 
(5, 3)Q(8)  & 1.584  &    2.3(1.0) &  0.4 (0.1)\\ 
(6, 4)Q(1)  & 1.602  &    $\le$1.0 &  $\le$0.1 \\ 
(5, 3)Q(9)  & 1.608  &    3.2(1.0) &  0.6 (0.2)\\ 
(2, 0)O(8)*  & 1.610  &    4.0(1.0) & 22.1 (5.0)\\ 
(4, 2)Q(13)*  & 1.612  &    4.0(1.0) & 1.1 (0.2)\\ 
(6, 4)Q(3)  & 1.616  &    2.2(1.0) &  0.3 (0.1)\\ 
(4, 2)O(5)  & 1.622  &    4.7(1.0) &  1.4 (0.3)\\ 
%\\
grism HR order 2\\
(3, 1)O(5)  & 1.522  &    8.4(0.8) &  4.5 (0.9)\\ 
(2, 0)O(7)  & 1.546  &    4.7(0.5) & 16.3 (3.3)\\ 
(4, 2)Q(11)  & 1.549  &    2.4(0.5) &  0.6 (0.1)\\ 
(5, 3)O(2)*  & 1.561  &    1.8(0.5) &  0.1 (0.0)\\ 
(7, 5)S(3)*  & 1.562  &    1.8(0.5) &  0.1 (0.0)\\ 
(5, 3)Q(7)  & 1.563  &    2.5(0.5) &  0.4 (0.1)\\ 
(5, 3)Q(9)  & 1.608  &    1.5(0.5) &  0.3 (0.1)\\ 
(4, 2)Q(13)  & 1.612  &    1.6(0.5) &  0.4 (0.1)\\ 
(6, 4)Q(3)*  & 1.616  &    1.0(0.5) &  0.1 (0.0)\\ 
(2, 0)Q(19)*  & 1.616  &    1.0(0.5) &  1.4 (0.3)\\ 
(7, 5)S(1)  & 1.620  &    1.0(0.5) &  0.1 (0.0)\\ 
(6, 4)Q(5)  & 1.643  &    1.3(0.5) &  0.2(0.0) \\ 
(3, 1)O(7)  & 1.645  &    3.8(0.5) &  4.6 (0.9)\\ 
(3, 1)Q(17)  & 1.648  &    1.4(0.5) &  0.7 (0.2)\\ 
\hline
(4, 2)Q(14)  & 1.649  &    1.7(0.5) &  0.5 (0.1)\\ 
(1, 0)S(11)  & 1.650  &    4.3(0.5) &  9.2 (1.8)\\ 
(1, 0)S(18)  & 1.659  &    $\le$0.5 &  $\le$0.2 \\ 
(6, 4)Q(6)  & 1.661  &    $\le$0.5 &  $\le$0.1 \\ 
(1, 0)S(10)  & 1.666  &    6.4(0.6) &  7.1 (1.4)\\ 
(1, 0)S(19)  & 1.675  &    1.5(0.5) &  0.4 (0.1)\\ 
(6, 4)Q(7)  & 1.683  &    2.5(0.5) &  0.4 (0.1)\\ 
(1, 0)S(9)  & 1.688  &   44.9(4.5) & 31.6 (6.3)\\ 
(1, 0)S(8)  & 1.715  &   28.2(2.8) & 14.4 (2.9)\\ 
(2, 1)S(9)  & 1.790  &   12.5(1.3) & 10.4 (2.1)\\ 
(6, 4)O(3)  & 1.733  &    1.2(0.5) &  0.1 (0.0)\\ 
(5, 3)O(5)  & 1.736  &    2.0(0.5) &  0.4 (0.1)\\ 
(6, 4)Q(9)  & 1.737  &    2.0(0.5) &  0.3 (0.1)\\ 
(2, 1)S(15)  & 1.739  &    5.1(0.5) &  3.4 (0.7)\\ 
(5, 3)Q(13)  & 1.741  &    2.0(0.5) &  0.4 (0.1)\\ 
(1, 0)S(7)  & 1.748  &  162.4(16.2) & 66.6 (13.3)\\ 
(2, 1)S(11)  & 1.753  &    2.0(0.5) & 11.9 (2.4)\\ 
(4, 2)O(7)  & 1.756  &    4.0(0.5) &  2.6 (0.5)\\ 
(2, 1)S(17)  & 1.759  &    4.0(0.5) &  0.9 (0.2)\\ 
(1, 0)S(6)  & 1.788  &   95.9(9.6) & 33.9 (6.8)\\ 
(2, 1)S(9)  & 1.790  &   10.0(1.0) &  8.3 (1.7)\\ 
\\
grism HR order 1\\
(2, 1)S(4)  & 2.004  &   19.4(1.9) &  4.9 (2.4)\\ 
(1, 0)S(2)  & 2.034  &  272.4(27.2) & 97.4 (48.7)\\ 
(3, 2)S(5)  & 2.066  &   14.9(1.5) &  4.8 (2.4)\\
(2, 1)S(3)  & 2.074  &  103.1(10.3) & 25.9 (13.0)\\ 
(1, 0)S(1)  & 2.122  &  647.9(64.8) &277.3 (55.5)\\ 
(3, 2)S(4)  & 2.128  &  4.0(1.0) & 1.1(0.3)\\ 
(2, 1)S(2)  & 2.154  &   36.4(3.6) &  9.8 (2.0)\\ 
(3, 2)S(3)  & 2.201  &   21.9(2.2) &  6.0 (1.2)\\ 
(1, 0)S(0)  & 2.223  &  130.5(13.0) & 80.4 (16.1)\\ 
(2, 1)S(1)  & 2.248  &   90.6(9.1) & 28.7 (5.7)\\ 
(4, 3)S(4)  & 2.267  &  4.0 (1.0)   & 8 1.6 (0.3)\\ 
(3, 2)S(2)  & 2.287  &    4.5(1.0) &  1.3 (0.3)\\ 
\hline 
$*$ Unresolved line blend.
\end{tabular}
\end{table}