\begin{table}%t5
\caption{Spectral resolutions, residual errors, and offsets needed
to transform line-strength indices to the Lick/IDS system.}
\label{indres} 
%PG%
%\centerline
$$
{\begin{tabular}{l@{\hspace{7mm}}cp{0.3cm}llllp{0.3cm}
r@{.}lr@{.}lr@{.}lr@{.}l@{\hspace{1.2cm}}ll} \hline\hline
%\begin{tabular}{l@{\hspace{1cm}}cp{0.5cm}llllp{0.5cm}
%r@{.}lr@{.}lr@{.}lr@{.}l@{\hspace{1.5cm}}ll} \hline\hline
%
Index & $\sigma_{\rm L}^{a}$ & & \multicolumn{4}{c}{Residual errors} & &
\multicolumn{8}{c}{Offsets} & \multicolumn{2}{c}{$\sigma^{b}$} \\
& km~s$^{-1}$ & & run 1 & run 2 & run 3 & runs $4,5$ & & \multicolumn{2}{c}{run
1} & \multicolumn{2}{c}{run 2} & \multicolumn{2}{c}{run 3} &
\multicolumn{2}{l}{runs $4,5$} & \multicolumn{1}{c}{rms} &
\multicolumn{1}{c}{exp} \\ \hline
H$\delta_{\rm A}$ & 325  &  & 0.00  & 0.00  & 0.00  & 0.20     & & $-$0&34  &
$-$0&34  &    0&00  & $-$1&09  & 0.66 & 0.37\\
H$\delta_{\rm F}$ & 325  &  & 0.00  & 0.00  & 0.00  & 0.00     & & $-$0&12  &
$-$0&09  &    0&00  & $-$0&81  & 0.35 & 0.24\\
CN$_1$            & 325  &  & 0.005 & 0.005 & 0.005 & 0.008    & & $+$0&003 &
$+$0&003 & $-$0&009 &    0&000 & 0.020 & 0.015\\
CN$_2$            & 325  &  & 0.004 & 0.004 & 0.004 & 0.011    & & $+$0&008 &
$+$0&008 & $-$0&015 & $-$0&011 & 0.021 & 0.016\\
Ca4227            & 300  &  & 0.04  & 0.04  & 0.04  & 0.00     & &    0&00  &
0&00  & $-$0&08  &    0&00 & 0.23 & 0.17\\
G4300             & 300  &  & 0.13  & 0.13  & 0.13  & 0.00     & & $-$0&08  &
$-$0&08  &    0&00  &    0&00 & 0.38 & 0.32\\
H$\gamma_{\rm A}$ & 275  &  & 0.19  & 0.19  & 0.21  & 0.00     & & $+$0&41  &
$+$0&41  & $+$0&41  & $+$0&34 & 0.48 & 0.40\\
H$\gamma_{\rm F}$ & 275  &  & 0.04  & 0.00  & 0.00  & 0.00     & & $+$0&17  &
$+$0&17  &    0&00  & $+$0&10 & 0.22 & 0.19\\
Fe4383            & 250  &  & 0.22  & 0.21  & 0.21  & 0.09     & & $+$0&08  &
$+$0&08  &    0&00  & $-$0&36 & 0.53 & 0.45\\
Ca4455            & 250  &  & 0.04  & 0.04  & 0.04  & 0.00     & & $+$0&32  &
$+$0&32  &    0&00  & $+$0&28 & 0.20 & 0.20\\
Fe4531            & 250  &  & 0.10  & 0.10  & 0.10  & 0.18     & & $+$0&15  &
$+$0&15  & $-$0&32  &    0&00 & 0.35 & 0.31\\
Fe4668            & 250  &  & 0.15  & 0.19  & 0.15  & 0.57     & &    0&00  &
0&00  & $-$1&03  &    0&00 & 0.57 & 0.59\\
${\rm H}\beta$    & 225  &  & 0.10  & 0.10  & 0.10  & 0.04     & & $-$0&07  &
$-$0&07  &    0&00  & $-$0&14 & 0.22 & 0.20\\
Fe5015            & 200  &  & 0.15  & 0.19  & 0.15  & 0.21     & & $+$0&26  &
$+$0&26  & $-$0&11  &    0&00 & 0.64 & 0.40\\
Mg$_1$            & 200  &  & 0.004 & 0.004 & 0.004 & 0.007    & & $+$0&011 &
$+$0&003 & $+$0&016 & $+$0&009 & 0.011 & 0.010\\
Mg$_2$            & 200  &  & 0.006 & 0.005 & 0.003 & 0.005    & & $+$0&025 &
$+$0&020 & $+$0&021 & $+$0&016 & 0.012 & 0.010\\
Mgb               & 200  &  & 0.04  & 0.03  & 0.02  & 0.07     & &    0&00  &
0&00  & $-$0&08  &    0&00 & 0.31 & 0.17\\
Fe5270            & 200  &  & 0.00  & 0.00  & 0.00  & 0.11     & &    0&00  &
$+$0&03  &    0&00  &    0&00 & 0.23 & 0.16\\
Fe5335            & 200  &  & 0.02  & 0.02  & 0.02  & 0.16     & & $-$0&06  &
$-$0&06  &    0&00  & $+$0&18 & 0.26 & 0.16\\
Fe5406            & 200  &  & 0.04  & 0.04  & 0.04  & 0.03     & & $-$0&04  &
$-$0&04  & $-$0&19  &    0&00 & 0.23 & 0.14\\
Fe5709            & 200  &  &       &       &       & 0.00     & &
\multicolumn{6}{c}{}     & $-$0&08 & 0.14 & 0.14\\
Fe5782            & 200  &  &       &       &       & 0.00     & &
\multicolumn{6}{c}{}     & $+$0&14 & 0.10 & 0.13\\
Na5895            & 200  &  &       &       &       & 0.24     & &
\multicolumn{6}{c}{}     &    0&00 & 0.26 & 0.40\\
TiO$_1$           & 200  &  &       &       &       & 0.003    & &
\multicolumn{6}{c}{}    & $+$0&013 & 0.008 & 0.007\\
TiO$_2$           & 200  &  &       &       &       & 0.000    & &
\multicolumn{6}{c}{}    & $-$0&015 & 0.005 & 0.004\\
\hline
\end{tabular}}
$$
\medskip
\par
$^{a}$ Spectral resolutions at which line-strength indices should be
measured to roughly match the original Lick/IDS system.
$^{b}$ Measured (rms) and expected (exp) standard deviations for the
comparison of indices with the original values of the Lick/IDS system.
\end{table}