\begin{table}%t3
\caption{Equivalent width and abundance results for the sample stars, line by line.
The symbol "$<$'' indicates an upper limit. The stars signaled with "*'' were
considered normal rather than barium stars by \citet{rod07}.}
 {\scriptsize \label{eqwid}
   
\begin{tabular}{llrrrrrcllrrrrr}
\hline\hline
\noalign{\smallskip}
\multicolumn{2}{c}{Identifiers} & El. & $\lambda$ (\rm \AA) & {\it EW} & $\log\epsilon$(X) & [X/Fe] &&
\multicolumn{2}{c}{Identifiers} & El. & $\lambda$ (\rm \AA) & {\it EW} & $\log\epsilon$(X) & [X/Fe] \\
%&&& (m\rm \AA) &&& &&&& (m\rm \AA) && \\
&&&&(m\rm \AA) &&&&&&&& (m\rm \AA) && \\
\noalign{\smallskip}
\hline
HD 749      &         & Ru I  & 4080.574 &  64 &     2.48 &    0.70 && HD 106191   &         & Hf II & 4080.437 & ... &     ...  &     ... \\
HD 749      &         & Ru I  & 4757.856 &  52 &     2.43 &    0.65 && HD 106191   &         & Hf II & 4093.155 & ... &  $<$1.09 & $<$0.50 \\
HD 749      &         & Hf II & 4080.437 &  56 &     2.27 &    1.45 && HD 107574   &         & Ru I  & 4080.574 & ... &      ... &     ... \\
HD 749      &         & Hf II & 4093.155 & 107 &     2.27 &    1.45 && HD 107574   &         & Ru I  & 4757.856 &  11 &     3.29 &    2.00 \\
HD 2454     & HR 107  & Ru I  & 4080.574 & ... &  $<$2.48 & $<$1.00 && HD 107574   &         & Hf II & 4080.437 & ... & ...      &    ...  \\
HD 2454     & HR 107  & Ru I  & 4757.856 &   3 &     2.88 &    1.40 && HD 107574   &         & Hf II & 4093.155 &  13 &     1.33 &    1.00 \\
HD 2454     & HR 107  & Hf II & 4080.437 & ... &  $<$0.92 & $<$0.40 && HD 113226*  & HR 4932 & Ru I  & 4080.574 &  31 &     1.86 &   --0.10 \\
HD 2454     & HR 107  & Hf II & 4093.155 & ... &  $<$0.52 & $<$0.00 && HD 113226*  & HR 4932 & Ru I  & 4757.856 &  12 &     1.96 &    0.00 \\
HD 5424     &         & Ru I  & 4080.574 &  71 &     2.19 &    0.90 && HD 113226*  & HR 4932 & Hf II & 4080.437 &   9 &     0.80 &   --0.20 \\
HD 5424     &         & Ru I  & 4757.856 &  77 &     2.49 &    1.20 && HD 113226*  & HR 4932 & Hf II & 4093.155 &  50 &     0.80 &   --0.20 \\
HD 5424     &         & Hf II & 4080.437 &  92 &     2.08 &    1.75 && HD 116713   & HR 5058 & Ru I  & 4080.574 & 105 &     2.42 &    0.70 \\
HD 5424     &         & Hf II & 4093.155 & ... &      ... &     ... && HD 116713   & HR 5058 & Ru I  & 4757.856 &  77 &     2.62 &    0.90 \\
HD 8270     & HR 391  & Ru I  & 4080.574 &   8 &     2.37 &    0.95 && HD 116713   & HR 5058 & Hf II & 4080.437 &  75 &     1.76 &    1.00 \\
HD 8270     & HR 391  & Ru I  & 4757.856 &   6 &     2.42 &    1.00 && HD 116713   & HR 5058 & Hf II & 4093.155 & 117 &     1.76 &    1.00 \\
HD 8270     & HR 391  & Hf II & 4080.437 &   9 &     1.16 &    0.70 && HD 116869   &         & Ru I  & 4080.574 &  59 &     2.02 &    0.50 \\
HD 8270     & HR 391  & Hf II & 4093.155 &  11 &     1.36 &    0.90 && HD 116869   &         & Ru I  & 4757.856 &  46 &     2.22 &    0.70 \\
HD 9362*    & HR 440  & Ru I  & 4080.574 &  25 &     1.55 &    0.05 && HD 116869   &         & Hf II & 4080.437 &  68 &     1.51 &    0.95 \\
HD 9362*    & HR 440  & Ru I  & 4757.856 &  15 &     1.75 &    0.25 && HD 116869   &         & Hf II & 4093.155 &  63 &     1.26 &    0.70 \\
HD 9362*    & HR 440  & Hf II & 4080.437 &  16 &     0.69 &    0.15 && HD 123396   &         & Ru I  & 4080.574 &  58 &     1.45 &    0.80 \\
HD 9362*    & HR 440  & Hf II & 4093.155 &  35 &     0.54 &    0.00 && HD 123396   &         & Ru I  & 4757.856 &  48 &     1.65 &    1.00 \\
HD 12392    &         & Ru I  & 4080.574 &  76 &     3.22 &    1.50 && HD 123396   &         & Hf II & 4080.437 &  72 &     1.39 &    1.70 \\
HD 12392    &         & Ru I  & 4757.856 &  61 &     3.02 &    1.30 && HD 123396   &         & Hf II & 4093.155 &  87 &     1.59 &    1.90 \\
HD 12392    &         & Hf II & 4080.437 &  63 &     2.42 &    1.66 && HD 139195   & HR 5802 & Ru I  & 4080.574 &  39 &     2.07 &    0.25 \\
HD 12392    &         & Hf II & 4093.155 &  95 &     2.42 &    1.66 && HD 139195   & HR 5802 & Ru I  & 4757.856 &  20 &     2.07 &    0.25 \\
HD 13551    &         & Ru I  & 4080.574 &   8 &     2.40 &    1.00 && HD 139195   & HR 5802 & Hf II & 4080.437 &  22 &     1.06 &    0.20 \\
HD 13551    &         & Ru I  & 4757.856 &   8 &     2.70 &    1.30 && HD 139195   & HR 5802 & Hf II & 4093.155 &  49 &     1.16 &    0.30 \\
HD 13551    &         & Hf II & 4080.437 &  21 &     1.39 &    0.95 && HD 147609   &         & Ru I  & 4080.574 & ... &  $<$2.69 & $<$1.30 \\
HD 13551    &         & Hf II & 4093.155 &  23 &     1.54 &    1.10 && HD 147609   &         & Ru I  & 4757.856 &  15 &     3.09 &    1.70 \\
HD 13611*   & HR 649  & Ru I  & 4080.574 &  23 &     1.95 &    0.25 && HD 147609   &         & Hf II & 4080.437 & ... &  $<$2.03 & $<$1.60 \\
HD 13611*   & HR 649  & Ru I  & 4757.856 &  19 &     2.25 &    0.55 && HD 147609   &         & Hf II & 4093.155 & ... &      ... &     ... \\
HD 13611*   & HR 649  & Hf II & 4080.437 &  33 &     0.99 &    0.25 && HD 150862   &         & Ru I  & 4080.574 & ... &      ... &     ... \\
HD 13611*   & HR 649  & Hf II & 4093.155 &  67 &     0.94 &    0.20 && HD 150862   &         & Ru I  & 4757.856 &   1 &     2.99 &    1.25 \\
HD 20894*   & HR 1016 & Ru I  & 4080.574 &  17 &     1.88 &    0.15 && HD 150862   &         & Hf II & 4080.437 & ... &      ... &     ... \\
HD 20894*   & HR 1016 & Ru I  & 4757.856 &  13 &     2.08 &    0.35 && HD 150862   &         & Hf II & 4093.155 &  12 &     1.48 &    0.70 \\
HD 20894*   & HR 1016 & Hf II & 4080.437 &  18 &     0.92 &    0.15 && HD 181053   & HR 5802 & Ru I  & 4080.574 &  47 &     1.80 &    0.15 \\
HD 20894*   & HR 1016 & Hf II & 4093.155 &  68 &     1.28 &    0.51 && HD 181053   & HR 5802 & Ru I  & 4757.856 &  27 &     1.90 &    0.25 \\
HD 22589    &         & Ru I  & 4080.574 &  12 &     2.12 &    0.55 && HD 181053   & HR 5802 & Hf II & 4080.437 &  30 &     0.94 &    0.25 \\
HD 22589    &         & Ru I  & 4757.856 &   5 &     2.27 &    0.70 && HD 181053   & HR 5802 & Hf II & 4093.155 &  71 &     0.99 &    0.30 \\
HD 22589    &         & Hf II & 4080.437 &  18 &     1.06 &    0.45 && HD 188985   &         & Ru I  & 4080.574 & ... &      ... &     ... \\
HD 22589    &         & Hf II & 4093.155 &  49 &     1.31 &    0.70 && HD 188985   &         & Ru I  & 4757.856 &  13 &     3.09 &    1.55 \\
HD 26967*   & HR 1326 & Ru I  & 4080.574 & 145 &     1.84 &    0.00 && HD 188985   &         & Hf II & 4080.437 & ... &      ... &     ... \\
HD 26967*   & HR 1326 & Ru I  & 4757.856 &  87 &     1.84 &    0.00 && HD 188985   &         & Hf II & 4093.155 &  34 &     1.68 &    1.10 \\
HD 26967*   & HR 1326 & Hf II & 4080.437 &  92 &     0.78 &   -0.10 && HD 202109   & HR 8115 & Ru I  & 4080.574 &  42 &     1.90 &    0.10 \\
HD 26967*   & HR 1326 & Hf II & 4093.155 &  90 &     0.78 &   -0.10 && HD 202109   & HR 8115 & Ru I  & 4757.856 &  26 &     2.05 &    0.25 \\
HD 27271    &         & Ru I  & 4080.574 &  58 &     2.20 &    0.45 && HD 202109   & HR 8115 & Hf II & 4080.437 &  27 &     0.99 &    0.15 \\
HD 27271    &         & Ru I  & 4757.856 &  29 &     2.05 &    0.30 && HD 202109   & HR 8115 & Hf II & 4093.155 &  93 &     1.09 &    0.25 \\
HD 27271    &         & Hf II & 4080.437 &  73 &     1.49 &    0.70 && HD 204075   & HR 8204 & Ru I  & 4080.574 & ... &      ... &     ... \\
HD 27271    &         & Hf II & 4093.155 &  67 &     1.49 &    0.70 && HD 204075   & HR 8204 & Ru I  & 4757.856 &  60 &     3.50 &    1.75 \\
HD 46407    & HR 2392 & Ru I  & 4080.574 &  87 &     2.70 &    0.95 && HD 204075   & HR 8204 & Hf II & 4080.437 & ... &      ... &     ... \\
HD 46407    & HR 2392 & Ru I  & 4757.856 &  74 &     2.90 &    1.15 && HD 204075   & HR 8204 & Hf II & 4093.155 & 118 &     1.79 &    1.00 \\
HD 46407    & HR 2392 & Hf II & 4080.437 &  86 &     1.94 &    1.15 && HD 205011   &         & Ru I  & 4080.574 &  66 &     2.05 &    0.35 \\
HD 46407    & HR 2392 & Hf II & 4093.155 &  92 &     1.94 &    1.15 && HD 205011   &         & Ru I  & 4757.856 &  40 &     2.15 &    0.45 \\
HD 48565    &         & Ru I  & 4080.574 &  12 &     2.52 &    1.30 && HD 205011   &         & Hf II & 4080.437 &  46 &     1.29 &    0.55 \\
HD 48565    &         & Ru I  & 4757.856 &  15 &     2.97 &    1.75 && HD 205011   &         & Hf II & 4093.155 &  92 &     1.34 &    0.60 \\
HD 48565    &         & Hf II & 4080.437 &  34 &     1.66 &    1.40 && HD 210709   &         & Ru I  & 4080.574 &  67 &     2.00 &    0.20 \\
HD 48565    &         & Hf II & 4093.155 &  25 &     1.66 &    1.40 && HD 210709   &         & Ru I  & 4757.856 &  40 &     2.30 &    0.50 \\
HD 76225    &         & Ru I  & 4080.574 &   3 &     2.83 &    1.30 && HD 210709   &         & Hf II & 4080.437 &  36 &     1.34 &    0.50 \\
HD 76225    &         & Ru I  & 4757.856 &  10 &     3.23 &    1.70 && HD 210709   &         & Hf II & 4093.155 &  64 &     1.04 &    0.20 \\
HD 76225    &         & Hf II & 4080.437 &  33 &     1.67 &    1.10 && HD 210910   &         & Ru I  & 4080.574 & ... &  $<$1.47 & $<$0.00 \\
HD 76225    &         & Hf II & 4093.155 &  20 &     1.47 &    0.90 && HD 210910   &         & Ru I  & 4757.856 & ... &     1.47 &    0.00 \\
HD 87080    &         & Ru I  & 4080.574 &  28 &     2.80 &    1.40 && HD 210910   &         & Hf II & 4080.437 & ... &  $<$0.81 & $<$0.30 \\
HD 87080    &         & Ru I  & 4757.856 &  29 &     3.00 &    1.60 && HD 210910   &         & Hf II & 4093.155 & ... &  $<$0.51 & $<$0.00 \\
HD 87080    &         & Hf II & 4080.437 &  51 &     2.24 &    1.80 && HD 220009*  & HR 8878 & Ru I  & 4080.574 &  53 &     1.27 &    0.10 \\
HD 87080    &         & Hf II & 4093.155 &  34 &     2.04 &    1.60 && HD 220009*  & HR 8878 & Ru I  & 4757.856 &  27 &     1.22 &    0.05 \\
HD 89948    &         & Ru I  & 4080.574 &   5 &     2.54 &    1.00 && HD 220009*  & HR 8878 & Hf II & 4080.437 &  21 &     0.21 &    0.00 \\
HD 89948    &         & Ru I  & 4757.856 &   8 &     2.79 &    1.25 && HD 220009*  & HR 8878 & Hf II & 4093.155 &  50 &     0.21 &    0.00 \\
HD 89948    &         & Hf II & 4080.437 &  17 &     1.48 &    0.90 && HD 222349   &         & Ru I  & 4080.574 &  16 &     2.71 &    1.50 \\
HD 89948    &         & Hf II & 4093.155 &  19 &     1.38 &    0.80 && HD 222349   &         & Ru I  & 4757.856 &   5 &     3.01 &    1.80 \\
HD 92545    &         & Ru I  & 4080.574 & ... &      ... &     ... && HD 222349   &         & Hf II & 4080.437 &  17 &     1.55 &    1.30 \\
HD 92545    &         & Ru I  & 4757.856 &   5 &     3.02 &    1.30 && HD 222349   &         & Hf II & 4093.155 &  21 &     1.55 &    1.30 \\
HD 92545    &         & Hf II & 4080.437 & ... &      ... &     ... && BD+18 5215  &         & Ru I  & 4080.574 &   3 &     2.81 &    1.50 \\
HD 92545    &         & Hf II & 4093.155 &  11 &     1.26 &    0.50 && BD+18 5215  &         & Ru I  & 4757.856 & ... &      ... &     ... \\
HD 104979   & HR 4608 & Ru I  & 4080.574 &  47 &     2.04 &    0.55 && BD+18 5215  &         & Hf II & 4080.437 &  20 &     1.55 &    1.20 \\
HD 104979   & HR 4608 & Ru I  & 4757.856 &  33 &     2.24 &    0.75 && BD+18 5215  &         & Hf II & 4093.155 &  15 &     1.55 &    1.20 \\
HD 104979   & HR 4608 & Hf II & 4080.437 &  54 &     1.18 &    0.65 && HD 223938   &         & Ru I  & 4080.574 &  38 &     1.99 &    0.50 \\
HD 104979   & HR 4608 & Hf II & 4093.155 &  77 &     1.08 &    0.55 && HD 223938   &         & Ru I  & 4757.856 &  23 &     2.24 &    0.75 \\
HD 106191   &         & Ru I  & 4080.574 & ... &      ... &     ... && HD 223938   &         & Hf II & 4080.437 &  36 &     1.58 &    1.05 \\
HD 106191   &         & Ru I  & 4757.856 &   8 &     3.25 &    1.70 && HD 223938   &         & Hf II & 4093.155 &  58 &     1.58 &    1.05 \\
\hline
\end{tabular}
}
$\log\epsilon$({\rm X})~=~($\log{n_{\rm X}/n_{\rm H}}$)~+~12 and [X/Fe]~=~$\log\epsilon 
{\rm (X)}_\ast-\log\epsilon ({\rm X})_\odot\rm -[Fe/H]$.
\end{table}