\begin{table}%t1
\caption{List of selected \ion{Fe}{i} lines.}
%\centerline
{
\begin{tabular}{cccccl}
\hline\hline
 Mult.$^a$ & Wavelength & $\chi_{\rm exc}$ & 
$\chi_{\rm ion} - \chi_{\rm exc}$ &
$FWHM$ & $EW$ \\
&  (\AA)      & (eV)     & (eV)     &(\kms)& (m\AA)\\
\hline
536 & 6065.4822 & 2.608 & 5.294 & 0.129 & 13.1 \\
536 & 6137.6920 & 2.588 & 5.314 & 0.136 & 17.5 \\
465 & 6252.5554 & 2.404 & 5.498 & 0.135 & 14.7 \\
464 & 6393.6013 & 2.433 & 5,469 & 0.140 & 17.0 \\
464 & 6494.9805 & 2.404 & 5.498 & 0.142 & 30.4$^b$ \\
\hline
\end{tabular}}
\medskip
\par
$^a$~Nave et~al. (1994).
$^b$~Although stronger than the other lines this scales linearly and provides a higher S/N ratio.
\end{table}