\begin{table}%t1
\caption{New and remeasured laboratory oscillator strengths for
\ion{Mn}{i}, the complete table is available online.}\label{labosc}
 %\centerline
{\begin{tabular}{lrrrrrrrrr}%10
 \hline\hline
 \noalign{\smallskip}
 Upper level & Lower level & Wavenumber & $\lambda_{\rm air}$ & $BF$ &\multicolumn{2}{c}{This Work} &  \multicolumn{2}{c}{Previous~~Work}& Calc.$^{a}$ \\
&  & (cm$^{-1}$) & ($\AA$) &  & Log~($gf$) & {\it Unc}. (dex) & Log~($g$$f$) &Ref.$^{b}$ & Log~($gf$) \\
 \noalign{\smallskip}
 \hline
 \noalign{\smallskip}
$e~^{6}$S$_{2.5}$ &  $z~^{8}$P$_{3.5}$ & 22~872.341 &4370.8646 & 0.0003 & --3.59 & 0.08& & & --3.03\\
$E = 41~403.93$~cm$^{-1}$&  $z~^{6}$P$_{1.5}$ & 16~624.678 &6013.4885 & 0.2134 & --0.43 & 0.05 & --0.25 & 3 & --0.25\\
$\tau = 18.5 \pm 1.8$~ns$^{c}$ &  $z~^{6}$P$_{2.5}$ &16~615.976&6016.6380&0.3211 & --0.25 & 0.05 & & &--0.22\\
&$z~^{6}$P$_{3.5}$ & 16~601.751 & 6021.7932 & 0.4280 & --0.12 & 0.05 &  0.03 & 3 &  0.03\\
&$y~^{6}$P$_{1.5}$ &  5714.003 &17~496.0867 & 0.0089 & --0.88 & 0.05 &  &   & --0.93\\
&  $y~^{6}$P$_{2.5}$ &  5678.129 & 17~606.6275 & 0.0123 & --0.73 & 0.05 &  &   & --0.77\\
&  $y~^{6}$P$_{3.5}$ &  5634.016 &17~744.4833 & 0.0156 & --0.62 & 0.05 & &   & --0.67\\
Residual   &   &  & & 0.0005 &       &      &       &   &      \\
\hline
\end{tabular}}
\smallskip
$^{a}$ The semi-empirical calculations are taken from Kurucz \& Bell (1995).\\
$^{b}$ The previous laboratory values are taken from (1) Greenlee \& Whaling (1979); (2) Blackwell \& Collins (1972); and (3) Booth et~al. (1984a).\\
$^{c}$ Lifetime for the level e~$^{6}$S$_{2.5}$ is taken from Marek (1975).
\end{table}