\begin{table}%t2
\caption{\label{tab2}Error analysis for the GCs of MW and LMC.}
\small%\centering
\par
\begin{tabular}{ccccc}
\hline\hline
Name&Errors in Age& & &$E(B-V)$ \\
\hline
 &positive error& & & \\
LMC GCs&Mean&0.16& &0.13\\
 &SD&0.09& &0.16 \\
 &AD&1.36& &0.23 \\
 &Remark&Good fit& &Very Good fit \\
\hline \\
 &negative error& & & \\
 \hline
 &Mean&--0.15& &  \\
 &SD&0.08& & \\
 &AD&1.27& & \\
 &Remark&Good fit& & \\
 \hline
MW GCs&Mean&1.59& &1.95 \\
 &SD&0.44& &0.62\\
 &AD&0.45& &0.11\\
 &Remark& Good fit& &Very good fit\\
 \hline \end{tabular}
\end{table}