\begin{table}%t2
\caption{Fraction of simulated outflows detected in each mass bin, compared to observed detection fraction.}
\label{tbl:outflowstats}
%\centering
\small
\begin{tabular}{l |l l l l l l}
\hline \hline
$\log_{10}~(M/\msun)$            & $-$0.2 &0.2 &0.6 &1.0 &1.4 &1.8 \\
\hline
Simulated maps              &14 &14  &14  &14  &11  &1\\
Sim. detections          &0 &1   &4  &13  &11  &1\\ 
Sim. rate          &0\%  &7\% &29\% &93\% &100\% &100\%\\
Obs. rate          &50\%  &18\% &50\% &64\% &100\% &100\%\\
\hline
\end{tabular}
\end{table}