\begin{table}%t2
%\centering
\par
\caption {Fit results. $I_0^{\rm disk}$ and $I_0^{\rm bulge}$ are in 
mag arcsec$^{-2}$, the $V$-band $h_{\rm s}$ is in kpc, the $K'$-band 
$h_{\rm s}$, and all values for $z_{\rm s}$, $R_{\rm e}$, 
$h_{\rm d}$, and $z_{\rm d}$ are in units of the $V$-band $h_{\rm s}$. 
The Sersic index $n$ is not fitted. The bulge-to-total light ratio B/T 
is computed from the stellar disk and bulge fit. The values for 
$h_{\rm d}$, $z_{\rm d}$, and $\theta$ are derived from the $V$-band 
fit and kept fixed in the $K'$-band fit.
\label{fit_table}}
\begin{tabular}{rcccccccccccc}
\hline\hline
& \multicolumn{3}{c}{stellar disk} 
& \multicolumn{5}{c}{bulge} 
& \multicolumn{3}{c}{dust disk} & \\
& $I_0^{\rm disk}$ & $h_{\rm s}$ & $z_{\rm s}$ &
  $I_0^{\rm bulge}$ & $R_{\rm e}$ & $b/a$ & B/T & $n$ &
  $h_{\rm d}$ & $z_{\rm d}$ & $\tau_0$ & $\theta$ 
%\input{figs/tabfit.tex}
\\ \hline% &&&&&&&&&&&& \\
NGC 4013 $V$ &21.7& 2.89&0.13&12.1&0.66&0.37&0.68&4&0.72&0.05&1.46&89.89
\\
         $K'$ &16.9& 0.75&0.09& 9.1&0.49&0.55&0.27&4&&&0.15&
\\% &&&&&&&&&&&& \\
NGC 4217 $V$ &20.7& 3.31&0.06&13.0&1.31&0.29&0.59&4&1.75&0.10&1.26&88.01
\\
        $ K'$ &17.5& 0.89&0.06&11.0&1.91&0.47&0.55&4&&&0.17&
\\ %&&&&&&&&&&&& \\
NGC 4302 $V$ &22.3& 6.02&0.17&17.8&0.17&0.68&0.07&2&1.52&0.03&0.11&89.63
\\
         $K'$ &17.4& 0.56&0.08&10.1&0.01&0.54&0.02&2&&&0.01&
\\ %&&&&&&&&&&&& \\
NGC 5529 $V$ &21.2& 7.26&0.08&17.4&0.47&0.49&0.21&2&1.36&0.03&0.68&86.94
\\
         $K'$ &18.2& 0.89&0.08&13.0&0.15&0.71&0.11&2&&&0.02&
\\ %&&&&&&&&&&&& \\
NGC 5746 $V$ &20.4& 7.21&0.12&14.4&0.23&0.71&0.34&2&2.54&0.07&0.52&86.80
\\
         $K'$ &17.7& 0.99&0.13&11.7&0.18&0.65&0.24&2&&&0.05&
\\ %&&&&&&&&&&&& \\
NGC 5965 $V$ &21.6& 9.69&0.10&15.2&0.21&0.72&0.39&2&1.82&0.02&0.62&84.43
\\
         $K'$ &17.3& 0.56&0.14&11.6&0.11&0.52&0.21&2&&&0.02&
\\ %&&&&&&&&&&&& \\
UGC 4277 $V$ &23.4&12.27&0.09&18.2&0.38&0.41&0.41&2&1.02&0.02&0.49&88.89
\\
         $K'$ &18.4& 0.61&0.07&12.8&0.11&0.71&0.19&2&&&0.02&
\\
\hline
\end{tabular}
\end{table}