\begin{table}%t2
\caption{The CO and CS observed line integrated intensities in
${T}_{\rm mb}\>\Delta {v}$ [K~km~s$^{-1}$] and the CO~(1--0) linewidth in
[km~s$^{-1}$]. Errors quoted in the brackets are noise contribution determined
by Gaussian fits. All intensities refer to the CO~(1--0) or CS~(2--1)~beam sizes.}
\label{table:2} 
%\small%\centerline{
%\begin{center}
{
\begin{tabular}{l c c c c c c c c c c }     
\hline\hline                  
%&&&&&&&&&& \\[-8pt]
 & \multicolumn{3}{c}{CO} & &  \multicolumn{2}{c}{$^{13} {\rm CO}$} & &
   \multicolumn{2}{c}{CS} & \\
\cline{2-4} \cline{6-7} \cline{9-10}          
Cloud & $J=1\rightarrow0$ & $J=2\rightarrow1$ & $J=3\rightarrow2$ & &
$J=1\rightarrow0$ & $J=2\rightarrow1$ & & $J=2\rightarrow1$ & $J=3\rightarrow2$
& $\Delta {v}$\\
\hline
N~66 c1$^a$  &1.1~(0.2)
               & 1.1~(0.3)& 2.3~(0.2)& &0.02~(0.01) &0.13~(0.04) &
            & $<$0.01&$<$0.01 & 2.4(0.4)\\
\hspace{7mm}c2 &3.6~(0.3) &4.8~(0.4) &4.4~(0.3) &&0.28~(0.03) &0.73~(0.07)
& &0.11~(0.01) &0.09~(0.01) &4.6(0.4)\\
N~88 &1.93~(0.09) &2.61~(0.05) &3.7~(0.2) & & 0.29~(0.02)&0.44~(0.06) &
&0.09~(0.01) & 0.05~(0.01) & 3.0(0.2)\\
Lirs~36 &8.8~(0.3) &10.5~(0.1) &9.1~(0.1) & &0.74~(0.04) & 1.10~(0.08)&
&0.18~(0.01) &0.10~(0.01) & 3.4(0.2) \\
Lirs~49 c1~$^b$ &11.3~(0.3) &13.9~(0.1) &12.2~(0.3) & &0.76~(0.05)
&1.44~(0.07) & &0.25~(0.01) & 0.12~(0.01) & 6.2(0.3)\\
\hspace{9.5mm}c2 &1.4~(0.2) &1.34~(0.05) &1.3~(0.2) & &0.20~(0.03) & 0.21~(0.04)&
&0.08~(0.01) & 0.03~(0.01) & 5.9(0.3)\\
Hodge~15 & 4.4~(0.1) & 4.81~(0.05)&3.4~(0.2) & &0.52~(0.05) &0.56~(0.07) & & --
&0.04~(0.02) & 4.6(0.2)\\
SMC-B1\#1  &4.0~(0.1) &3.10~(0.08) &2.2~(0.1) & & 0.37~(0.04)&0.29~(0.06) &
&0.08~(0.01) &0.04~(0.02) & 2.7(0.2)\\
\hline                                   
\end{tabular}}
\medskip
$^a$ N~66 c1: ${v}_{\rm LSR}=163.2$~km~s$^{-1}$, c2:
${v}_{\rm LSR}=159.4$~km~s$^{-1}$. $^b$ Lirs~49 c1:
${v}_{\rm LSR}=114.3$~km~s$^{-1}$, c2:
${v}_{\rm LSR}=127.4$~km~s$^{-1}$.
\end{table}