\begin{table}%t5
\caption{Measured values of RJD$_{B}^{\rm max}$, {\it M}$_{B}^{\rm max}$, \dmft, \rsi, \vten, \vdot\
for \cf. Errors are indicated in parenthesis.}\label{values}
%\small%\centerline{
%\begin{center}
{
\begin{tabular}{ll}
\hline
\hline
RJD$_{B}^{\rm max}$&53~534.0$^*$\\
{\it M}$_{B}^{\rm max}$&--19.39 (0.33)$^*$\\
\dmft&1.12 (0.03)$^*$\\
\rsi &0.27 (0.03)\\
\vten&9939 (300)\\
\vdot&35 (5)\\
\hline
\end{tabular}}
\medskip
$^*$ As measured in \citet{pastorello}.
\end{table}