\begin{table}%t10
\caption{\label{tab:pulscon}Derived pulsation constants for the frequencies of the adopted solution and possibly corresponding mode identification.}
\small%\centering
\par
\begin{tabular}{crrc}
\hline
\hline
 Freq. & \mcol{1}{c}{Q}  & \mcol{1}{c}{$\sigma_{Q}$} & Mode \\
 Id. & \mcol{1}{c}{(days)} & \mcol{1}{c}{(days)} &  Id. \\
\hline
 F1& 0.016(3)  &  0.001(1) & poss. 3H \\
 F2& 0.026(6)  &  0.001(8) & poss. 1H\\
 F3& 0.033(4)  &  0.002(2) & poss. F \\
 F4& 0.022(5)  &  0.001(5) & poss. 2H\\
 F5& 0.036(1)  &  0.002(4) & non-radial? \\
 F7& 0.037(0)  &  0.002(4) & non-radial? \\
 F8& 0.039(7)  &  0.002(6) & non-radial?  \\
\hline
\end{tabular}
\end{table}