\begin{table}%t7
%\centering
\par
\caption{Log of the high-resolution observations. For
\object{IRAS~08281-4850}, a spectral gap occurs between 493~nm and 500~nm.
For \object{IRAS~14325-6428}, spectral gaps occur between 577~nm and 583~nm
and between 854.4~nm and 864.5~nm due to the spatial gap between the two
UVES CCDs.}\label{tab:observations}
\begin{tabular}{ccccc}
\hline\hline
 date & UT    & exp.time & wavelength & $S/N$ \\
      & start &  (s)   & interval (nm) &     \\
\hline
\multicolumn{5}{c}{\object{IRAS~08281-4850} (NTT~+~EMMI)}\\
\hline
 2003-02-04 & 01:11 & 9000 & 395$-$795 & 75 \\ %Ech9Grsm3
\hline
\multicolumn{5}{c}{\object{IRAS~14325-6428} (VLT-UT2~+~UVES)}\\
\hline
 2004-05-13 & 07:13 & 1800 & 374.5--498 & 130 \\ %DI2 BLU437
 2004-05-13 & 07:13 & 1800 & 670.5--1055 & 170 \\ %DI2 RED860
 2004-05-13 & 06:39 & 1800 & 477.5--681 & 190 \\ %RED580
\hline
\end{tabular}
\end{table}