\begin{table}%t1
 \caption{Summary of  the \naco\ $J,H,K$-band observations of  the PSR~J1119-6127
field with the number of exposure sequences, the total number of exposures per filter, the DIT and NDIT, the average seeing and airmass.}\label{nacodatasummary}
%\centering
\small
\begin{tabular}{lccccccc} 
\hline \hline
yyyy.mm.dd     & Filter & $N$ & $N_{\rm exp}$ & DIT (s) & NDIT & Seeing ($''$) & Airmass	\\ 
\hline
2006.01.25     & $K_{\rm s}$  & 1 & 8  & 20      & 16     &0.76 & 1.26  \\
2006.02.23     & $K_{\rm s}$  & 2 & 30 & 55      & 3      &0.66 & 1.30  \\
2006.02.24     & $H$    & 2 & 30 & 55      & 3      &0.61 & 1.29  \\
               & $J$    & 2 & 30 & 55      & 3      &0.88 & 1.27  \\
2006.02.28     & $J$    & 1 & 15 & 55      & 3      &0.59 & 1.32  \\
\hline
\end{tabular}
\end{table}