\begin{table}%T6
\caption{Details of the catalogues, K-corrections values and the
Schechter function parameters $\phi^*$, $\alpha$ and $M^*$ for the
three WFI filters. $F$ is the fraction of light which is missing due
to the limiting magnitudes $M_{\rm lim\it}$ of the catalogue given
in Table~\ref{tab:data}. For the $R$ band we used the limiting
magnitude for region A (see Table~\ref{tab:data}). See text for
more details. The Luminosity distance is 1.5~Gpc (distance modulus
$m-M=40.88$ at $z=0.2906$). \label{tab:k-correction}}
\small%\centering
\par
\begin{tabular}{c|c|c|c|c}
\hline\hline
& $B$ & $V$ & $R$ & units\\
\hline
E/S0 K-correction       & 1.41 & 0.85 & 0.32 & [mag]\\
Sbc K-correction        & 0.84 & 0.33 & 0.14  & [mag]\\
fitting range $M_{\rm fit}$ & $<$-19 & $<$-19 & $<$-19 & [mag]\\ 
$\phi^*$                & $1.814^{+2.24}_{-2.24}\times10^3$ & $0.8^{+2.81}_{-2.81}\times10^3$  & $0.907^{+1.121}_{-1.121}\times10^3$  & [\# galaxies deg$^{-2}$]\\ 
$\alpha$                & $\rm -1.136^{+0.53}_{-0.53}$ & $\rm -1.38^{+1.30}_{-1.30}$ & $\rm -1.24^{+0.33}_{-0.33}$  \\ 
$M^*$                   & $\rm -20.6^{+1.3}_{-1.3}$ & $\rm -21.74^{+3.01}_{-3.01}$ & $\rm -22.53^{+1.55}_{-1.55}$   & [mag]\\ 
$\chi^2$                & 0.972 & 0.952 & 0.973 \\ 
$L_{\rm tot}$               & $1.12\times10^{14}$ & $0.98\times10^{14}$ & $1.38\times10^{14}$  & $L_\odot$\\
$F$                     & $<$1\% & $<$1\% & $<$1\% & \\
\hline
\end{tabular}
\end{table}