\begin{table}%t2
%\centering
\small
\caption{Estimates of the physical parameters of the Be star V2104~Cyg, after correction for the contribution of the circumstellar disk. The effective temperature is given in K; the mass and radius are expressed in solar units; $v\sin i$ is given in \kms.}
\label{phys}
\begin{tabular}{cccccc} \hline \hline
$T_{\rm eff}$ & $\log g$ & Mass & Radius & $L/L_{\odot}$ &$v\sin i$ \\ \hline
$13~500\pm1~350$ & $3.94\pm0.39$ & $\sim$4 & $2.5\pm0.5$ & $\sim$127 & $290\pm 10$\\ \hline
\end{tabular}
\end{table}