\begin{table}%t1
\caption{A sample of results from the automatic analyses. 
We list the names, HD numbers and spectral types from the manual spectral typing.
We give the \teff, \logg\ and [Fe/H] and estimated uncertainties determined by VASP and VWA.
\vsini\ values are calculated with VWA and have uncertainties of 10--20\%.
The first four targets are not VSOP targets, but high S/N HARPS spectra taken from \citet{dall+2006}, which we have used
to calibrate our tools. Full detailed results for all VSOP stars can be found online (see text).\label{tab:vasp}}
%\centering
\par
\begin{tabular}{lrlr|lcc|lcc}\hline\hline
Star         &         &Spectral&\multicolumn{1}{c|}{\vsini}&\multicolumn{3}{c|}{VASP} & \multicolumn{3}{c}{VWA} \\ 
             &  HD     & type   &[\kms]&\teff\ [K]&\logg &[Fe/H]& \teff\ [K]&\logg    & [Fe/H]     \\ \hline
$\alpha$ Hor &  26967  & K1III  &  2 & 4675(143)  & 2.8(4)   &  $+0.22(13)$  & 4550(80)  & 2.2(2)  & $-0.02(5)$ \\ 
$\tau$ Cet   &  10700  & G8V    &  3 & 5292(157)  & 4.6(4)   &  $-0.45(15)$  & 5320(50)  & 4.5(1)  & $-0.47(5)$ \\
Sun          &    $-$  & G2V    &  2 & 5842(168)  & 4.5(4)   &  $-0.16(16)$  & 5810(40)  & 4.5(1)  & $-0.07(3)$ \\
$\gamma$ Ser & 142860  & F6IV   & 11 & 6322(191)  & 4.1(7)   &  $-0.18(20)$  & 6250(80)  & 4.1(1)  & $-0.24(5)$ \\ \hline
ZZ Pyx       &    $-$  & K3V    &  5 & 4228(223)  & 1.4(1)   &  $-0.31(13)$  & 3900(150) & 1.4(3)  & $-1.3(2)$  \\ %%% Bruntt: VWA: edge of grid.
V349 Vel     &  91021  & F2+?   & 16 & 7314(241)  & 5.2(9)   &  $-0.89(54)$  & 7200(150) & 4.0(2)  & $-0.43(5)$ \\
LP Vir       & 115466  & F1IV   & 40 & 7031(194)  & 3.4(8)   &  $-0.32(29)$  & 7030(80)  & 3.7(1)  & $-0.13(5)$ \\
V976 Cen     & 118551  & F0III  & 40 & 7048(203)  & 2.0(7)   &  $-0.16(23)$  & 8400(100) & 2.4(2)  & $-0.78(5)$ \\
PP Hya       &  87130  & A5V    & 80 & 7924(219)  & 4.0(8)   &  $-1.35(73)$  & $-$       & $-$     & $-$        \\
\hline
\end{tabular}
\end{table}