\begin{table}%f8
\caption{The same as Table~\ref{t:results_sim_total}, but for the case of
 the only $CFHT$ data as explained in Sect.~\ref{s:expectedtr}.}
\label{t:results_sim_cfh}
%\centering
\par
\begin{tabular}{c c c c c c c}
\hline\hline\\[-3mm]
  [Fe/H]  & $N_{\rm geom}$ & $N_{1+}$ &  $N_{1}$ & $R^{1}$ &  $R^{2}$ & $R^{3}$ \\
\hline
  +0.17   &  5.39  &  2.49  &   1.98  &  {$ 0.2~\pm~0.5$} &  {$ 0.4~\pm~0.7$}  &  {$ 0.6~\pm~0.8$} \\
  +0.39   & 15.13  &  7.01  &   5.39  &  {$ 1.6~\pm~1.3$} &  {$ 2.3~\pm~1.6$}  &  {$ 2.6~\pm~1.7$} \\
  +0.47   & 21.92  & 10.12  &   7.94  &  {$ 2.5~\pm~1.7$} &  {$ 3.4~\pm~2.0$}  &  {$ 4.0~\pm~2.1$} \\
\hline
\end{tabular}
\end{table}