\begin{table}%t2
\caption{Results of the spectral analysis for the MOS detectors (0.5--12.0~keV). Notation of the
  models is according to {\tt XSPEC}. Frozen parameters are between exclamation
  marks. Energies and equivalent width are given in the quasar frame. 
\label{mosresults}}
%\centering
\par
\begin{tabular}{c c c c c c c c}
\hline\hline
\noalign{\smallskip}
Model & $\Gamma$ & $E_{\rm{Fe,~rest}}$& $EW_{\rm{rest}}$&  $R_{\rm{IN}}$ & $R_{\rm{OUT}}$ & $i$ & $\chi^2$/d.o.f.\\ 
  &  & keV & keV & $r_{\rm {Schwarzschild}}$ & $r_{\rm {Schwarzschild}}$ & deg & \\
\hline
   wabs(power) & 1.90~$\pm$~0.02  & -- & -- & -- & -- & -- &
   314/280\\
   wabs(power1 + power2) & 1.25~$\pm$~0.83 \& 2.14~$\pm$~0.32 &-- & -- & --
   & -- & -- &301/278\\
   wabs(power + gauss) & 1.96~$\pm$~0.02& 6.32~$\pm$~0.23 & $\rm 1.00^{+0.30}_{-0.27}$  & -- &   -- & -- & 286/277\\
   wabs(power + diskline)
   &1.93~$\pm$~0.02&7.42~$\pm$~0.12&$\rm 0.59^{+0.25}_{-0.25}$&6~$\pm$~571&!400!&!30!&302/277\\
   wabs(power + laor) &1.96~$\pm$~0.02&7.49~$\pm$~0.15&$\rm 1.28^{+0.42}_{-0.39}$
   &2.4~$\pm$~1.6&!400!&!30!&291/277\\
   wabs(po1 + po2 + laor) &!1.25! \& 2.04~$\pm$~0.07&6.85~$\pm$~0.15&$\rm 0.96^{+0.39}_{-0.39}$
   &!2.4!&!400!&!30!&287/277\\
   wabs(kdblur(power + reflion)) & $1.72\pm0.16$&--&--& 60~$\pm$~600 & !400! & !30! & 285/276\\
\hline
 & & \multicolumn{2}{c}{cov. fraction}& \multicolumn{2}{c}{$N_{\rm{H}}$ in 10$^{22}$ cm$^{-2}$}&  & \\ 
wabs(zpcfabs(power))& 1.97~$\pm$~0.02& \multicolumn{2}{c}{0.37~$\pm$~0.09}& \multicolumn{2}{c}{38~$\pm$~16}&  &  293/278\\ 
\hline
\end{tabular}
\end{table}