\begin{table}%t2
%\centering
\par
\caption{Differences between COG values of RF-predicted and calculated path 
length distributions. Values are presented for cases of waves excited by 
$p$-modes with inclinations, $\psi$, of 0\degr, 40\degr, 50\degr, and~60\degr\ 
from the vertical. Note that in the case of vertical propagation 
($\psi=0$\degr) there is no distiction between ingressing or egressing forms 
of fast-mode waves, hence only one value is provided. When sampling a low 
plasma-$\beta$ environment the Alfv\'{e}n and slow-mode waves are field 
aligned, remaining invariant to changes in the originating $p$-mode 
inclination: values are not provided for these two wave modes in the flux-tube 
reference frame due to their large magnitude and obvious incorrectness.
\label{tab:cog_dif_val}}
\begin{tabular}{lcccccccc}
\hline\hline
  Wave mode			&  \multicolumn{8}{c}{Absolute separation of COG values [km]}\\
  				&  \multicolumn{2}{c}{$\psi=0$\degr}	&  \multicolumn{2}{c}{$\psi=40$\degr}	&  \multicolumn{2}{c}{$\psi=50$\degr}	&  \multicolumn{2}{c}{$\psi=60$\degr}\\
  				&  MB		&  FT		&  MB	&  FT		&  MB	&  FT		&  MB	&  FT\\
\hline
  Alfv\'{e}nic			&  5		&  \ldots	&  5	&  \ldots	&  5	&  \ldots	&  5	&  \ldots\\
  Slow				&  9		&  \ldots	&  9	&  \ldots	&  9	&  \ldots	&  9	&  \ldots\\
  Acoustic			&  7		&  12		&  2	&  6		&  8	&  1		&  20	&  7\\
  Fast (ingressing)		&  10		&  16		&  5	&  9		&  0	&  4		&  12	&  5\\
  Fast (egressing)		&  \ldots	&  \ldots	&  1	&  8		&  5	&  2		&  16	&  6\\
\hline
\end{tabular}
\end{table}