\begin{table}%t1
 %\centering
\par
 \caption{\label{table_ntv} Non-thermal velocities ($\xi$) in ${\rm km~ s^{-1}}$ and their uncertainties $\Delta\xi$ for the QS and prominence data.  The last three columns list the lines used for the DEM analysis.}
\begin{tabular}{l l c c c c c c c c@{\hspace{+.05cm}} c@{\hspace{+.05cm}} c@{\hspace{+.05cm}}} 
\hline \hline
Line & &$\log~T$  & $\xi_{\rm QS}$ & $\Delta\xi_{\rm QS}$ & $\xi_{\rm A\_1}$ & $\Delta\xi_{\rm A\_1}$ & $\xi_{\rm A\_2}$ & $\Delta\xi_{\rm A\_2}$ & DEM$_{\rm QS}$& DEM$_{\rm A\_1}$& DEM$_{\rm A\_2}$\\ 
\hline     
\ion{S}{i}&      1049.83  &    4.05 &              &           & 8.0  &  5.4 &     & && &\\
\ion{S}{i}&     1181.59  &   4.05  &    14.1    &  2.6 &     & &     & & &&\\
\ion{Fe}{ii}&      1059.564 &     4.12 &     18.4  &    2.8&&&     & & &&\\
\ion{Fe}{ii}&      1183.829 &     4.12 &     18.4   &   4.5&& &     & & &&\\
\ion{Fe}{ii}&      1187.417 &    4.12 & 		&	  && 		&11.8  &   7.2 & &&\\
\ion{Si}{ii}&     1190.4156 &     4.13 &     23.4  &    2.5&10.1 & 2.1  &  13.0  &     1.8 & $\surd $& $\surd $& $\surd $ \\
\ion{Si}{ii}&       1193.291 &4.13 & & & & & & & $\surd $& $\surd $& $\surd $\\
\ion{Si}{ii}&      1194.501&4.13 & & & & & & &$\surd $&&\\
\ion{Si}{ii}&      1197.395 &     4.13 &            &           &  9.5   &   1.8& 10.8  & 1.5 &$ \surd $& $\surd $& $\surd $\\
\ion{Si}{ii}&      1251.164 &     4.13 &     14.6  &    2.4&            &&            &	&&\\
\ion{C}{i}&        1105.7321&     4.16 &     &          &    11.3 &  7.6      &&&\\  
\ion{C}{i}&     1244.535   &   4.16   &   8.4    &  2.4&&&            & &&\\
\ion{C}{i}&      1245.943   &   4.16   &   11.2    &  2.3&&&            &&&\\
\ion{C}{i}&      1246.8621   &   4.16   &   14.1    &  3.5&&&            &&&\\
\ion{C}{i}&      1249.405   &   4.16   &   12.8    &  3.0&&       &       13.9     & 4.0&&\\
\ion{O}{i}&     990.801   &   4.18   &   21.3    &  1.2&  19.7 &    1.8&            &&&\\
\ion{O}{i}&      1039.2303   &   4.18   &		&	  &   16.3 &     2.3&15.6 &   2.9 &&\\
\ion{O}{i}&      1040.9425   &   4.18   &   18.7    &  3.5&13.4    &  1.5 &9.0 &     1.2&&\\
\ion{O}{i}&      1041.6876   &   4.18   &   17.2    &  3.8& 22.1 & 2.0  &12.8  &     3.0&&\\
\ion{O}{i}&      1152.151   &   4.18   &   17.2    & 0.5 & 9.5  &   0.5 & 11.2 &    0.6&&\\
\ion{N}{i}&     953.6548   &   4.21   &   11.6     & 4.0 &		&&       & &&\\
\ion{N}{i}&      1134.4147   &   4.21   &   17.8     & 2.4&    12.6   &   2.5& 11.3 &     1.7&&\\
\ion{N}{i}&      1134.9801   &   4.21   &   15.9     & 3.5 & 10.4    &  2.0& 11.0&     0.8&&\\
\ion{N}{i}&      1199.552   &   4.21   &           &  &     9.6      &   1.6      &  11.8 &  1.0 &&\\
\ion{N}{i}&     1200.2260   &   4.21   &   18.0    & 1.5 & 9.7    &  1.6& 8.6 &     1.1 &&\\
\ion{S}{ii} &        937.422 &  4.25 & & & & & & & &$\surd$&\\
\ion{S}{ii} &     996.0  &    4.25  &    21.4    &  2.7	&	&&	&& $\surd$ &&\\
\ion{S }{ii}&       1000.488  &   4.25 & & & & & & & $\surd$&& $\surd $\\
\ion{S}{ii}  &       1014.42  &    4.25  &    19.6    &  3.5	&	&&	& &$\surd$& $\surd $&\\
\ion{S}{ii}  &        1102.362 &   4.25 & & & & && &$\surd$& $\surd $&\\
\ion{S}{ii} &       1131.65  &    4.25  &    12.5    &  2.1	&	&&	& &$\surd$&&\\
\ion{S}{ii} &       1253.79  &    4.25 &    16.7    &  1.4 & 10.7 &     3.2&11.7 &     2.7 & $\surd$& & $\surd $\\
\ion{S}{ii} &        1259.521 &4.25 & & & & & & &$\surd$&&\\
\ion{C}{ii}&      858.0918  &    4.37 &    26.3    &  5.7 &		&&	& &&&\\
\ion{C}{ii} &      858.559  &    4.37  &    30.2    &  3.9 &		&&	&&&&\\
\ion{C}{ii} &       903.6235  &    4.37  &    26.7    &  4.1 &		&&	&&&&\\
\ion{C}{ii} &       1009.860 &     4.37  & & & & & & & $\surd$&&\\
\ion{C}{ii} &       1010.373&     4.37  & & & & & & & &$\surd$&\\
\ion{C}{ii}  &      1036.3367  &    4.37  &    27.4    & 0.6 & 18.1 &     1.8& 16.9 &      1.5&$\surd$&$\surd$ & $\surd $\\
\ion{C}{ii}&      1037.0182  &    4.37  &    28.6    & 0.6 & 17.8 &     1.5 & 16.6 &      1.2&$\surd$&$\surd$& $\surd $\\
\ion{C}{ii} &        1092.726  &      4.37 &   17.1 &   1.4 &		&&	&&&&\\
\ion{N}{ii}&       916.703  &    4.38  && & & & & & &$\surd$& $\surd $\\
\ion{N}{ii} &      1083.99  &    4.38  &   23.0    &  2.3   & 15.7 &     1.7 &15.9 &      1.7&$\surd$&$\surd$& $\surd $\\
\ion{N}{ii} &     1084.58  &    4.38  &    25.2    &  1.1 &	17.1	&  0.9 &15.7 & 0.9&$\surd$&& $\surd $\\
\ion{N}{ii}&  1085.703 &   4.38  &  & & & && & $\surd$&$\surd$& $\surd $\\
\ion{Fe}{iii} &      983.909&      4.42 &     31.6  &    2.7 &		&&&\\
\ion{Fe}{iii} &      995.151   &   4.42 &		&               &  13.4 &     4.9 &&&\\
\ion{Fe}{iii} &      997.431   &   4.42 &		&               &  12.2 &     5.5&& &&&\\
\ion{Fe}{iii}  &     1063.309&      4.42 &     15.9  &    5.4 &		&&	&&&&\\
\ion{Fe}{iii} &      1124.8831&      4.42 &     30.2  &     2.4 &		&	&17.3 & 2.4 &&&\\
\ion{Fe}{iii}&      1131.9139&      4.42 &     30.0  &    5.3 &		&&	&&&&\\
\ion{O}{ii}  &     833.332   &   4.47   &   29.9    &  1.1 &  11.9   &   2.4 & 14.7 &      2.7&&&\\
\ion{O}{ii}  &      834.462   &   4.47   &   30.1    & 0.7 &		&	&19.2   &     1.7&&& \\
\ion{S}{iii} &       1015.498  &4.66  & & & & & & & $\surd$&$\surd$&\\
\ion{S}{iii} &      1015.6 & 4.66  & & & & & & &$\surd$&$\surd$&\\
\ion{S}{iii} &     1021.323 & 4.66  & & & & & & &$\surd$&$\surd$& $\surd $\\
\ion{S}{iii}  &      1077.13  &    4.66  &    28.4   &   1.7 & 16.1  &    2.3 & 18.9  &    3.4&$\surd$&$\surd$& $\surd $\\
\ion{S}{iii} &       1194.049 &    4.66  &  & & & & & &&$\surd$&\\
\ion{S}{iii} &        1200.961 &4.66  & & & & & & &$\surd$&$\surd$& $\surd $\\
\ion{Si}{iii} &        997.389 &  4.67 &  & & & & & &$\surd$&&\\
\ion{Si}{iii}&         1109.972 &  4.67 &  & & & & & &$\surd$&$\surd$&\\
\hline
\ion{Si}{iii}  &        1113.232&  4.67 &  & & & & & &$\surd$&&\\
\ion{Si}{iii} &       1206.502 &     4.67 &     28.6  &   0.5 & 15.2 &    0.8 & 10.1 &    0.3&$\surd$&& $\surd $\\
\ion{C}{iii} &      977.02  &    4.85  &    25.6   &  0.6 & 16.1   &  0.4 & 14.9 &     0.4& $\surd$&$\surd$& $\surd $\\
\ion{C}{iii}  &    1174.933 &     4.85 &   &   		&		& &11.9  &     2.3 & $\surd$&$\surd$& $\surd $\\
\ion{C}{iii} &     1175.25 &     4.85  &   		&		& 16.5 &    2.4 & 15.4&  2.7& $\surd$&& $\surd $\\
\ion{C}{iii} &       1175.713  &     4.85  &     & & & & & &$\surd$&$\surd$& $\surd $\\
\ion{C}{iii}  &     1175.97  &    4.85 &		&		&  16.8 & 3.2 & 14.0 &  3.1&&&\\
\ion{C}{iii}&      1176.37  &    4.85  &   		& 		&17.4  &    2.3 & 15.6 & 2.1&&$\surd$& $\surd $\\
\ion{C}{iii}&        1247.385  &    4.85    & & & & & &&$\surd$&\\
\ion{Si}{iv}  &     818.1290  &    4.87  &    27.2  &   4.1&		&& 		&&&&\\
\ion{Si}{iv} &     1066.629  &    4.87  &    18.1   &   2.7 &  7.0  &    2.3& 12.5 &    4.4 &&& $\surd $\\
\ion{Si}{iv} &     1128.37  &  4.87  &		&      		& 17.5   &   1.4& 16.1 & 1.4&& $\surd $& $\surd $\\
\ion{N}{iii} &      989.79  &    4.88  &    27.0  &  0.6 &  20.8   &  0.7 &24.0 &     0.6& $\surd$&$\surd$& $\surd $\\
\ion{N}{iii} &      991.571  &    4.88  &    26.9   &  0.3 & 20.0   &  0.3& 20.0 &    0.33& $\surd$&$\surd$& $\surd $\\
\ion{O}{iii} &       525.808  &  4.93  &  & & & & & &$\surd$&$\surd$& $\surd $\\
\ion{O}{iii}  &    833.742  &    4.93  &    30.8   &  0.7 & 23.4  &    4.6 & 11.2 &     5.1&&&\\
\ion{O}{iii} &     835.292   &      4.93&   &   		& 		&&   19.0 &   2.8&&&\\
\ion{S}{iv}  &     1062.671   &   4.99   &   32.4    &  3.4&  26.3  &    3.2 & 17.8 &    2.1& $\surd$&$\surd$& $\surd $\\
\ion{S}{iv} &     1072.99   &   4.99   &   31.3    &  3.1& 15.4   &   4.0 & 12.4 &  1.3& $\surd$&$\surd$& $\surd $\\
\ion{S}{iv} &        1073.520 &  4.99 &  & & & && & $\surd$&$\surd$& $\surd $\\
\ion{S}{iv}  &        1099.482  &  4.99 &  & & & & & &$\surd$&$\surd$\\
\ion{N}{iv} &       924.286 &5.18  & & & & & &&&$\surd$&\\
\ion{N}{iv}&         955.336 &5.18  & & & & & &&&$\surd$& $\surd $\\
\ion{N}{v} &     1238.821    &  5.27   &  24.7     & 2.2 & 19.7   &  0.9 & 15.3 &     0.7& $\surd$&$\surd$& $\surd $\\
\ion{N}{v}&    1242.806    &  5.27    &  24.4     & 1.7 & 20.2   &   1.8 &15.2 &      1.35& $\surd$&$\surd$& $\surd $\\
\ion{S}{vi} &     933.38   &   5.30   &   26.4    &  1.7 & 23.1    &  1.7 & 20.4 &     1.8& $\surd$&$\surd$\\
\ion{S}{vi} &   944.524 &      5.30&  & & & & & &$\surd$&\\
\ion{O}{v} &    1218.39    &  5.37    &        &		&		& &13.7   &   3.7& $\surd$&$\surd$& $\surd $\\ 
\ion{Ar}{vi} &     1000.20 &     5.46 &  28.4     &  3.2 &   28.1  &     7.4 &&&& \\
\ion{Ne}{v} &     1136.508 &     5.46 & & & & & &&$\surd$&\\
\ion{Ne}{v}  &    1145.60   &   5.47   &        &		&	& &    12.1  &    3.0& $\surd$&$\surd$& $\surd $\\
\ion{Ne}{v/2}&      572.350 &     5.47 &		&		&     28.9 &     4.7& 	& & $\surd$&$\surd$& $\surd $\\
\ion{O}{vi}  &    1031.924   &   5.48   &   34.9    & 0.3 & 32.1   &  0.3&32.3 &     0.33& $\surd$&$\surd$& $\surd $\\
\ion{O}{vi}  &   1037.614   &   5.48   &   33.0    & 0.3& 30.3  &   0.3 &31.7 &    0.3& $\surd$&$\surd$& $\surd $\\
\ion{Si}{vi}  &    1148.63  &    5.54  &    27.5   &   4.4 & 		&& 		&& &&\\
\ion{Ne}{vi} &   999.182  &    5.61 &  & & & & && $\surd$& $\surd$\\
\ion{Ne}{vi}&      1005.81  &    5.61   & 27.5  & 5.0  &		&		&  25.0 & 2.6& $\surd$& $\surd$\\
\ion{Ne}{vii}&     895.179  &    5.71   &  32.2   &   2.4  &		&		&   &  &  &&\\
\ion{Ne}{vii}  &   561.728 &    5.71   & & & & & && $\surd$&$\surd$&\\
\ion{Mg}{vi} &        1190.124 &5.68&& & & & &&$\surd$&&\\
\ion{Mg}{vi}   &       1191.670 &5.68&& & & & & &$\surd$&$\surd$&\\
\ion{Mg}{vii} &        1189.841& 5.71& & & & & &&$\surd$&&\\
\ion{Si}{vii}  &     1049.199 & 5.75 & & & & & &&$\surd$&$\surd$&\\
\ion{Al}{vii} &    1053.998 & 5.79 & & & & & &&&&$\surd$\\
\ion{Al}{viii}  &    1057.890 & 5.94 & & & & & &&&&$\surd$\\
\ion{Ca}{x/2}  &    557.765  &    5.9   & &   &		&		&     23.6  &    4.6 &&$\surd$&\\
\ion{Si}{viii} &       983.576  &     5.92& & & & & &&&$\surd$&$\surd$\\
\ion{Si}{viii} &      944.467 &     5.92 &  &   &		&		&   29.0  &   6.8& $\surd$&$\surd$&\\
\ion{Si}{viii}  &        994.581 &     5.92& & & & & &&&$\surd$&\\
\ion{Si}{viii}   &        1182.455  &     5.92& & & & & &&&$\surd$&\\
\ion{Si}{viii} &         1183.995 &     5.92& & & & & &&&&$\surd$\\
\ion{Fe}{x}  &      1028.03    &   6.0    &  &   &		&		&   25.3 &  1.4 &&\\
\ion{Mg}{x/2} &   609.794 &  6.06 &  & & & & &&&$\surd$&\\
\ion{Mg}{x/2}  &     624.943 &     6.06 &     29.6  &    2.6 & 22.9 &     3.0& 24.3 &     3.7& $\surd$& $\surd$&$\surd$\\
\ion{Fe}{xii}  &    1242.03 &     6.13 &     20.0  &    5.5& 22.6 &     2.6 & 24.3 &     2.2& $\surd$& $\surd$&$\surd$\\
\ion{S}{x}    &  1196.25   &   6.15  &		&		&   22.2  &  4.7& 15.3 & 10.7&& $\surd$&$\surd$\\
\ion{Al}{xi/2}  &   550.032 & 6.28  & & & && &&$\surd$& $\surd$&$\surd$\\
\ion{Al}{xi/2}  &  568.122  & 6.28  & & & && &&& $\surd$&$\surd$\\
\ion{Si}{xii/2}  &   499.407  &6.28  & & & && &&$\surd$&&\\
\ion{Si}{xii/2}  &  520.666 & 6.28  & & & && &&$\surd$&$\surd$&$\surd$\\
\ion{Ar}{xii} & 1018.726 & 6.37  & & & && &&&&$\surd$\\
\ion{Ar}{xii}  &  1054.687& 6.37  & & & && &&&&$\surd$\\
\hline 
\end{tabular}
\end{table}