\begin{table}%t3
\caption{\label{machoeventtable}The 17 microlensing candidates of the MACHO collaboration \citep{macho57}.
Candidates 20, 22 and 27 (marked B)
are low signal-to-noise candidates  not satisfying the 
MACHO "A'' requirements.
Candidate 9 is due to a binary lens and does not satisfy their A requirements. 
The values of $\te$ and maximum amplification
$A_{\rm max}$ are from the MACHO fit assuming no blending, and $t_0$ is given
as JD-2~450~000.
Candidates 18 and 25 are each within $1~{\rm arcsec}$ of an object of similar
magnitude that is resolved by the MACHO analysis but blended in the EROS
analysis.
Candidates 14 and 20 occurred during EROS-2 observations, and the
EROS-2 values of $\te$ and $A_{\rm max}$ are shown in parentheses
(averages of $\reros$ and $\beros$ measurements).
}
\small%\centering
\par
\begin{tabular}{l l l l l l l l   } 
\hline\hline
MACHO candidate       & EROS-2 star & $\reros$ & $(B-R)_{\rm eros}$ & $t_0$ & $\te$ & $A_{\rm max}$    & Comments \\
\hline
  MACHO-LMC-1      & lm019-6k-14879 &      18.97 &       0.61 &     --942.9 &      17.20 &       7.15 &          \\
   MACHO-LMC-4     & lm057-0l-27696 &      19.85 &       0.24 &    --353.1 &      22.70 &       2.92 &          \\
   MACHO-LMC-5     & lm057-0k-27469 &      19.97 &       1.52 &    --976.1 &      37.80 &      47.28 &          \\
   MACHO-LMC-6     & too faint     &            &            &     --802.9 &      45.80 &       2.43 &          \\
   MACHO-LMC-7     & lm010-2k-21383 &      20.47 &       0.52 &    --536.5 &      51.45 &       5.91 &          \\
   MACHO-LMC-8     & too faint &                 &            &     --612.2 &      33.20 &       2.19 &        \\
   MACHO-LMC-9 B-binary & lm001-0l-6864 &      20.92 &       0.83 &  --400.1 &      89.60 &       1.95 &       \\
  MACHO-LMC-13     & lm020-6m-19733 &      21.03 &      --0.07 &    134.0 &      50.05 &       2.36 &          \\
  MACHO-LMC-14     & lm002-7n-24616 &      18.84 &            &    391.3 &      50.05 (38.2) &       3.37 (2.77) &          \\
  MACHO-LMC-15     & too faint     &            &            &    472.4&      18.40 &       2.83 &          \\
  MACHO-LMC-18     & lm060-2n-16057 &      18.35 &       0.47 &    --217.2&      37.10 &       1.54 & Bright Sample   \\
  MACHO-LMC-20 B   & lm012-5n-23157 &      20.09 &       1.03 &    774.7 &      36.35 (23.2) &       2.95 (3.1) &          \\
  MACHO-LMC-21     & dead zone      &            &            &   --786.8 &      46.60 &       5.64 &          \\
  MACHO-LMC-22 B   & dead zone      &            &            &    --43.3 &     114.65 &       2.70 &          \\
  MACHO-LMC-23     & lm055-3n-4994 &      19.82 &       0.37 &    --237.7 &      42.60 &       2.41 & variable (Fig. \ref{macho23fig}) \\
  MACHO-LMC-25     & lm017-2m-2056 &      17.95 &            &    --265.7 &      42.60 &       1.50 & Bright Sample   \\
  MACHO-LMC-27 B   & lm010-0n-23830 &      19.00 &       0.14 &   --485.9&      25.25 &       1.45 &          \\
\hline
\end{tabular}
\end{table}