\begin{table}%t2
\caption{\label{pateventtable}Events found in the analysis of the full sample of 
EROS-2 stars \citep{tis04}.
Only event EROS2-SMC-1 
is in the Bright-Star Sample and passes the cuts $C1$$-$$C12$ and therefore
is used for limits on the optical depth.
All fits assume zero blending and no intrinsic variability.
The two values of the fitted parameters $t_0$, $\te$ and $u_0$ are
for $\beros$ (first line) and $\reros$ (second line).  (There are no
$\reros$ points during the event for EROS2-LMC-12.)
The time of maximum, $t_0$ is given as JD$-$2450000.
}
\small%\centering
\par
 \begin{tabular}{l l l l l l l l l l  }
  \hline\hline\noalign{\smallskip}
Candidate & EROS-2 star & RA (deg) & Dec (deg) & $\reros$  & $(B-R)_{\rm eros}$ & $t_0$ & $\te$ & $u_0$ & $\chi^2$/d.o.f. \\
\hline
EROS2-SMC-1  & sm005-4m-5761  &   15.0233 &  --72.2507 &   18.14 &   --0.13 &   459.0 &   105.8 &     0.53 &   972.4/873 \\
             &                &            &            &         &         &   460.5 &   101.6 &     0.52 &   862.4/748 \\
EROS2-SMC-5  & sm006-6k-19475 &   12.6625 &  --72.6983 &   17.83 &    0.34 &  1414.8 &    29.5 &     0.90 &   485.1/875 \\
             &                &            &            &         &         &  1432.0 &    15.1 &     1.12 &   560.0/573 \\
EROS2-LMC-8  & lm055-7m-23303 &   76.6396 &  --71.6624 &   20.34 &    1.16 &  1594.1 &    15.3 &     0.01 &   344.0/572 \\
             &                &            &            &         &         &  1594.1 &     8.0 &     0.03 &   540.9/510 \\
EROS2-LMC-9  & lm042-1l-2622  &   75.3717 &  --65.0486 &   20.93 &    0.23 &  2204.1 &    57.8 &     0.36 &   640.8/369 \\
             &                &            &            &         &         &  2215.3 &    52.7 &     0.30 &   292.1/228 \\
EROS2-LMC-10 & lm045-5n-26323 &   80.9925 &  --65.8733 &   20.55 &    0.81 &  1600.3 &    37.1 &     0.33 &   580.0/505 \\
             &                &            &            &         &         &  1602.2 &    35.9 &     0.51 &   649.1/447 \\
EROS2-LMC-11 & lm061-4m-15782 &   88.4392 &  --71.2536 &   20.55 &    0.55 &   451.9 &    51.3 &     0.36 &   456.5/444 \\
             &                &            &            &         &         &   446.6 &    46.1 &     0.37 &   458.7/394 \\
EROS2-LMC-12 & lm085-6l-14234 &   89.8750 &  --74.5676 &   20.19 &    0.34 &  2664.0 &    49.6 &     0.27 &   580.4/391 \\
\hline
\end{tabular}
\end{table}