\begin{table}%Ta1
\caption{List of spectral lines and equivalent widths measured 
in the UVES 2004 spectra of the following twelve stars:
(1)~\object{CD~$-24\degr17504$},
(2)~\object{CD~$-71\degr1234$},
(3) \object{CS~22943-095},
(4) \object{G~04-37},
(5) \object{G~48-29},
(6) \object{G~59-27},
(7) \object{G~126-52},
(8) \object{G~166-54},
(9) \object{HD~84937},
(10) \object{HD~338529},
(11)~\mbox{\object{LP~635-14}},
(12) \object{LP~651-4}.}
\label{tab:A.1}
\small%\centering
\par
\begin{tabular}{lccrrrrrrrrrrrrr}
\hline\hline
\noalign{\smallskip}
      &             &          &         &                        \multicolumn{12}{c}{Equivalent width}                        \\
  ID  &  Wavlength  & Exc. pot  & log~$gf$ & (1) &  (2) &  (3) &  (4) &  (5) &  (6) &  (7) &  (8) &  (9) &  (10) &  (11) &  (12) \\
      &    \AA      &   eV     &         &                        \multicolumn{12}{c}{m\AA }                                   \\
\hline
\SI   &  8694.64 &  7.87 &     0.03 &       &       &       &       &       &       &       &       &   1.6 &       &       &       \\
\SI   &  9212.87 &  6.52 &     0.38 &   5.7 &  21.0 &  31.3 &  17.6 &  15.2 &  40.6 &  24.7 &  17.5 &  38.3 &  33.5 &  21.9 &  12.3 \\
\SI   &  9237.54 &  6.52 &     0.01 &       &  10.9 &  14.5 &   6.7 &   7.8 &  21.6 &       &   8.1 &  16.9 &  15.5 &   9.0 &       \\
\noalign{\smallskip}
\FeI  &  4199.10 &  3.05 &     0.16 &  10.3 &  36.9 &  41.8 &  34.7 &  23.4 &  55.2 &  41.3 &  26.2 &  46.9 &  42.1 &  36.3 &  25.4 \\
\FeI  &  4233.60 &  2.48 &  $-$0.58 &   6.5 &  28.4 &  33.2 &  26.1 &  14.4 &  49.4 &  32.9 &  18.2 &  38.7 &  33.0 &  26.6 &  17.2 \\
\FeI  &  4250.12 &  2.47 &  $-$0.38 &   9.8 &  37.8 &  42.6 &  34.4 &  22.4 &  58.7 &  42.2 &  25.3 &  48.3 &  43.2 &  36.3 &  24.9 \\
\FeI  &  4271.15 &  2.45 &  $-$0.34 &  11.5 &  41.3 &  45.6 &  39.0 &  26.0 &  63.6 &  46.0 &  28.8 &  52.7 &  46.6 &  39.6 &  26.9 \\
\FeI  &  4282.40 &  2.18 &  $-$0.78 &   7.5 &  30.2 &  35.7 &  27.9 &  17.7 &  51.7 &  35.3 &  20.1 &  41.5 &  35.7 &  29.4 &  18.4 \\
\FeI  &  4918.99 &  2.86 &  $-$0.34 &   5.5 &  25.3 &  29.9 &  22.8 &  13.0 &  45.9 &  30.1 &  15.4 &  35.1 &  30.0 &  24.0 &  14.9 \\
\FeI  &  4920.50 &  2.83 &     0.07 &  12.8 &  44.6 &  49.7 &  42.4 &  28.9 &  66.9 &  50.5 &  31.5 &  56.1 &  50.3 &  43.0 &  31.2 \\
\noalign{\smallskip}
\FeII &  4178.86 &  2.58 &  $-$2.61 &   1.9 &  11.2 &  14.6 &   9.0 &   6.6 &  25.7 &  14.5 &   7.9 &  19.9 &  15.8 &  11.5 &   6.1 \\
\FeII &  4233.17 &  2.58 &  $-$2.01 &   6.0 &  32.3 &  37.6 &  28.4 &  20.1 &  51.5 &  39.0 &  19.9 &  45.8 &  40.1 &  33.0 &  19.4 \\
\FeII &  4416.83 &  2.78 &  $-$2.65 &       &   7.1 &   9.4 &   6.0 &   4.2 &  16.8 &   9.7 &   4.5 &  13.4 &  10.0 &   7.7 &   4.3 \\
\FeII &  4489.18 &  2.83 &  $-$2.96 &       &   3.3 &   4.6 &   3.0 &       &   9.1 &   4.7 &   2.1 &       &   4.8 &   3.2 &   1.5 \\
\FeII &  4491.41 &  2.85 &  $-$2.80 &       &   4.3 &   6.1 &   3.6 &   2.4 &  11.2 &   6.3 &   2.8 &   8.6 &   6.3 &   4.9 &   2.9 \\
\FeII &  4508.29 &  2.85 &  $-$2.41 &       &  11.1 &  13.8 &   9.2 &   5.4 &  23.7 &  13.9 &   6.7 &  18.6 &  15.0 &   9.7 &   6.2 \\
\FeII &  4515.34 &  2.84 &  $-$2.56 &       &   7.7 &  10.3 &   6.7 &   5.3 &  18.2 &  11.2 &   4.8 &  14.1 &  11.7 &   7.7 &   4.6 \\
\FeII &  4520.23 &  2.81 &  $-$2.66 &       &   7.4 &   9.7 &   5.8 &   3.8 &  16.2 &   9.6 &   4.2 &  12.3 &  10.1 &   7.3 &   3.6 \\
\FeII &  4522.63 &  2.84 &  $-$2.22 &   2.4 &  16.1 &  19.8 &  12.6 &   9.0 &  32.6 &  21.1 &   9.0 &  26.7 &  21.4 &  16.3 &   8.7 \\
\FeII &  4541.52 &  2.85 &  $-$3.04 &       &   3.4 &   3.7 &       &       &   7.2 &   3.7 &   1.5 &   5.6 &   4.6 &   2.7 &   1.5 \\
\FeII &  4555.89 &  2.83 &  $-$2.43 &       &  10.4 &  13.6 &   9.2 &   6.2 &  23.4 &  14.8 &   5.5 &  18.6 &  15.0 &  11.0 &       \\
\FeII &  4576.34 &  2.84 &  $-$3.01 &       &   3.4 &   4.0 &   1.9 &       &   7.3 &   4.1 &   1.7 &   5.7 &   4.5 &   2.6 &   3.0 \\
\FeII &  4583.84 &  2.81 &  $-$1.91 &   4.9 &  27.8 &  33.4 &  23.8 &  17.8 &  47.5 &  34.3 &  17.5 &  41.5 &  35.9 &  29.0 &  17.2 \\
\FeII &  4923.93 &  2.89 &  $-$1.45 &  12.2 &  46.9 &  52.4 &  42.5 &  33.4 &  67.5 &  54.8 &  33.2 &  61.9 &  56.0 &  47.8 &  33.7 \\
\noalign{\smallskip}
\ZnI  &  4722.15 &  4.03 &  $-$0.39 &   0.9 &   2.8 &   2.8 &   2.0 &   1.2 &   5.9 &   3.1 &   1.1 &   3.3 &   3.2 &   2.4 &   0.9 \\
\ZnI  &  4810.53 &  4.08 &  $-$0.17 &   1.4 &   3.0 &   4.9 &   3.1 &   1.7 &   7.5 &   4.2 &   1.9 &   5.5 &   4.3 &   3.3 &   2.0 \\
\hline
\end{tabular}
\end{table}