\begin{table}%t2
%\centering
\par
\caption{IRAC and MIPS 24 \micron\ photometry of the EROs listed in Table \ref{tab1}
taken from Paper~I.
All fluxes are given in $\mu$Jy.
Upper limits are 1-sigma noise values at the position of the sources.
Due to source blending the data is uncomplete, i.e.\ not available for
objects A1835-\#3, A1835-\#10, and A1835-\#11, and partially for A1835-\#1.
\label{tobs2}}
\begin{tabular}{lrllcr}
\hline
\hline
       & \multicolumn{4}{c}{IRAC/Spitzer} & MIPS \\
Object & 3.6 & 4.5 & 5.8 & 8.0 & 24.0 \\
\hline
A1835-\#1  &  2.9 $\pm$ 0.2 &  4.0 $\pm$ 0.2 & \multicolumn{2}{c}{blended}     & $<$10 \\
A1835-\#2  & 14.4 $\pm$ 0.2 & 23.3 $\pm$ 0.3 & 37.6 $\pm$ 1.5 & 50.9 $\pm$ 1.6 & 320 $\pm$ 11 \\
A1835-\#4  &  1.9 $\pm$ 0.2 &  1.0 $\pm$ 0.3 & $<$1.2	 & $<$1.5        & $<$10 \\
A1835-\#17 &  2.4 $\pm$ 0.2 &  1.6 $\pm$ 0.2 & $<$1.2	 & $<$1.5        & $<$10 \\
%A1835-\#4  &  1.9 $\pm$ 0.2 &  1.0 $\pm$ 0.3 & $<$ 0.7        & $<$ 0.6        & $<$ 10 \\
%A1835-\#17 &  2.4 $\pm$ 0.2 &  1.6 $\pm$ 0.2 & $<$ 0.6        & $<$ 0.5        & $<$ 10 \\
\\
% AC114-\#1  & 53.2 $\pm$ 0.5 & 53.3 $\pm$ 0.5 & 42.3 $\pm$ 1.2 & 36.6 $\pm$ 1.7 & 153 $\pm$ 7\\
% ds-update 17 jan 07: using Eiichi's data from nov 2007
AC114-\#1  & 67.3 $\pm$ 0.5 & 64.4 $\pm$ 0.5 & 50.3 $\pm$ 1.5 & 44.9 $\pm$ 2.2 & 189.0 $\pm$ 8.9\\
\hline
\end{tabular}
\end{table}