\begin{table}%T8
\caption{\label{tab8}Equivalent widths of [O III]$\lambda$4958 {\AA} line,
measured in the blue continuum windows of Mg$_1$ and Mg$_2$
(that are the same),
and [N~I]$\lambda$5199~{\AA} line,
measured either in the red continuum of Mg~b and Mg$_2$ bandpass,
for the aperture spectra of the more central regions of NGC~1052
along both axes.} 
\small%\centering
\par
\begin{tabular} {l|c c c }
\hline
\hline\noalign{\smallskip}
\multicolumn{4}{c}{$EW$ ~(\AA)} \\
\hline
$R$ (arcsec)
& [O III]$\lambda$4958$_{\lambda\lambda 4895.125-4957.625}$
& [N I]$\lambda$5199$_{\lambda\lambda 5191.375-5206.375}$
& [N I]$\lambda$5199$_{\lambda\lambda 5154.125-5196.625}$ \\ 
\hline
major axis &            &              &               \\
\hline
0.00     & --5.0~$\pm$~0.3 & --1.4~$\pm$~0.1 & --1.2~$\pm$~0.1  \\
\hline
1.10~SE & --5.5~$\pm$~0.5 & --1.0~$\pm$~0.1 & --0.9~$\pm$~0.1  \\
3.56~SE & --4.1~$\pm$~0.6 & --0.8~$\pm$~0.1 & --0.7~$\pm$~0.1  \\
\hline
1.08~NW & --4.5~$\pm$~0.2 & --0.9~$\pm$~0.1 & --0.8~$\pm$~0.1  \\
3.54~NW & --2.1~$\pm$~0.7 & --0.4~$\pm$~0.1 & --0.4~$\pm$~0.1  \\
\hline
minor axis &            &              &               \\
\hline
0.00     & --4.1~$\pm$~0.2 & --0.70~$\pm$~0.05 & --  \\
\hline
2.17~SW & --3.1~$\pm$~1.5 & --0.88~$\pm$~0.09 & --  \\
4.90~SW & --          & --0.81~$\pm$~0.10 & --  \\
\hline
2.19~NE & --3.2~$\pm$~0.6 & --0.82~$\pm$~0.05 & --  \\
4.92~NE & --          & --0.15~$\pm$~0.10 & --3.1~$\pm$~0.2  \\
\hline
\end{tabular}
\label{emissions1}
\end{table}