\begin{table}%T7
\caption{\label{tab7}The errors of the Lick indices for
two spectra with different $S/N$ ratios:
the Poisson error plus the $cz_{\rm helio}$ uncertainty
and the Lick System calibration errors.}
\small%\centering
\par
\begin{tabular}{l|r r r}
\hline
\hline
\multicolumn{4}{c}{{Lick ~index ~errors}} \\
\hline
Index   & Poisson+$cz$      & linear corr.  & $\sigma_v$ corr.  \\
\hline
$S/N=83$ {\AA}$^{-1}$  &   &               &         \\
$EW$    & ({\AA})         & ({\AA})       & ({\AA})  \\
Fe4383  & 0.128           & 0.170         & 0.173   \\
Ca4455  & 0.065           & 0.088         & 0.385   \\
Fe4531  & 0.091           & 0.292         & 0.165   \\
Fe4668  & 0.137           & 0.258         & 0.178   \\
H$\beta$& 0.060           & 0.151         & 0.187   \\
Fe5015  & 0.114           & 0.466         & 0.047   \\
Mg~b    & 0.049           & 0.159         & 0.208   \\
Fe5270  & 0.054           & 0.145         & 0.088   \\
Fe5335  & 0.065           & 0.122         & 0.173   \\
Fe5406  & 0.048           & 0.070         & 0.125   \\
Fe5709  & 0.037           & 0.180         & 0.067   \\
Fe5782  & 0.036           & 0.153         & 0.115   \\
Na~D    & 0.038           & 0.063         & 0.095   \\
$MAG$   & (mag)           & (mag)         & (mag)    \\
Mg$_1$  & 0.0011          & 0.0038        & 0.0047  \\
Mg$_2$  & 0.0013          & 0.0044        & 0.0024  \\
\hline
$S/N=26$ {\AA}$^{-1}$  &   &               &         \\
$EW$    & ({\AA})         & ({\AA})       & ({\AA})  \\
Fe4383  & 0.424           & 0.140         & 0.340   \\
Ca4455  & 0.196           & 0.010         & 0.728   \\
Fe4531  & 0.266           & 0.372         & 0.302   \\
Fe4668  & 0.409           & 0.313         & 0.314   \\
H$\beta$& 0.155           & 0.175         & 0.068   \\
Fe5015  & 0.306           & 0.537         & 0.512   \\
Mg~b    & 0.157           & 0.181         & 0.320   \\
Fe5270  & 0.158           & 0.201         & 0.230   \\
Fe5335  & 0.194           & 0.172         & 0.535   \\
Fe5406  & 0.147           & 0.114         & 0.245   \\
Fe5709  & 0.120           & 0.207         & 0.092   \\
Fe5782  & 0.112           & 0.188         & 0.219   \\
Na~D    & 0.134           & 0.058         & 0.132   \\
$MAG$   & (mag)           & (mag)         & (mag)    \\
Mg$_1$  & 0.0034          & 0.0037        & 0.0035  \\
Mg$_2$  & 0.0039          & 0.0049        & 0.0025  \\
\hline
\end{tabular}
\label{lick2}
\end{table}