\begin{table}%t20
\caption{\label{tab20}Continuum points for the spectral base.}
\tiny%\centering
\par
\begin{tabular} {c|c c c c c c c c}
\hline
\hline
\multicolumn{9}{c}{{$C_{\lambda}/C_{5870}$}} \\
\hline
 & $\lambda$4475 & $\lambda$4800 & $\lambda$5100 & $\lambda$5300
 & $\lambda$5546 & $\lambda$5800 & $\lambda$5822 & $\lambda$6200 \\
\hline
G1   & 0.67 & 0.78 & 0.79 & 0.91 & 0.97 & 1.01 & 1.01 & 0.94 \\
G2   & 0.83 & 0.92 & 0.91 & 0.97 & 0.98 & 0.99 & 1.01 & 0.94 \\
G3   & 0.90 & 0.96 & 0.95 & 0.97 & 0.99 & 0.99 & 0.99 & 0.93 \\
Y1   & 1.16 & 1.06 & 1.04 & 1.04 & 1.12 & 1.01 & 1.03 & 0.90 \\
Y2   & 1.52 & 1.34 & 1.22 & 1.17 & 1.04 & 1.04 & 1.03 & 0.90 \\
Y3   & 1.37 & 1.29 & 1.23 & 1.08 & 1.06 & 1.00 & 0.99 & 0.81 \\
RHII & 1.87 & 1.66 & 1.45 & 1.33 & 1.21 & 1.03 & 1.00 & 0.92 \\
\hline
\end{tabular}
\label{contbase1052}
\end{table}