\begin{table}%t19
\caption{\label{tab19}Equivalent widths for the spectral base.}
\tiny
%\centering
\par
\begin{tabular} {l|c|c c c c c c c c}
\hline
\hline\noalign{\smallskip}
\multicolumn{10}{c}{$EW$ (\AA)} \\
\hline
 & Metallicity & & & & & & & & \\
& [Z/Z$_{\odot}$] & Fe4383 & Ca4455 & Fe4531
& Fe5270 & Fe5335 & Fe5406
& Fe5709 & Fe5782  \\
\hline
G1 & 0.00  & 6.00 & 2.76 & 4.06
& 2.77 & 1.65 & 1.50
& 1.36 & 1.14 \\
G2 & --0.4  & 3.28 & 0.94 & 2.94
& 2.99 & 1.70 & 1.46
& 1.30 & 0.80 \\
G3 & --1.1  & 2.42 & 0.40 & 2.10
& 1.59 & 0.95 & 0.77
& 0.57 & 0.52 \\
Y1 & --0.25 & 2.73 & 1.08 & 1.10
& 1.95 & 0.70 & 1.36
& 1.22 & 0.87 \\
Y2 & --0.4  & 2.58 & 0.49 & 0.78
& 1.06 & 0.71 & 0.89
& 0.70 & 0.28 \\
Y3 & --0.5  & 1.78 & 0.57 & 1.13
& 0.88 & 0.76 & 0.53
& 0.43 & 0.33 \\
RHII& 0.00 & 0.00 & 0.00 & 0.00
& 0.00 & 0.00 & 0.00
& 0.00 & 0.00 \\
\hline
\end{tabular}
\label{largbase1052}
\end{table}