\begin{table}%T9
%%\centering
\par
\caption{Fundamental parameters of targets in XEST (3): Photometry and spectroscopy.}
%\centering
\par
\begin{tabular}{llrrrrrrr}
\hline
\hline
XEST & Name & Spec$^a$  & Refs. & $A_{\rm V}^a$ & $A_{J}$  & $T_{\rm eff}^a$ &  $L_*^b$        & Refs	 \\
     &      &		  &      & (mag)	& (mag)   &  (K)	    & ($L_{\odot})$	&	 \\
\hline
27-115 &  HBC 352           & G0        &   27      &        0.87 &  0.25 &        6030 &               0.740 &   27           \\
27-000 &  HBC 353           & G5        &   27      &        0.97 &  0.28 &        5770 &               0.500 &   27           \\
06-005 &  HBC 358 AB        & M2        &   27      &        0.21 &  0.06 &        3580 &               0.280 &   27           \\
06-007 &  HBC 359           & M2        &   27      &        0.49 &  0.14 &        3580 &               0.260 &   27           \\
06-059 &  L1489 IRS         & K4        &   59      &       10.20 &   ... &        4500 &               4.900 &   10, 59       \\
20-001 &  LkCa 1            & M4        &    5      &        0.00 &  0.00 &        3270 &               0.380 &    5, 27       \\
20-005 &  Anon 1            & M0        &    5      &        1.32 &  1.03 &        3850 &               2.600 &    5, 27       \\
20-000 &  IRAS 04108+2803 A & ...       &  ...      &         ... &   ... &         ... &                 ... &   ...          \\
20-022 &  IRAS 04108+2803 B & ...       &  ...      &         ... &   ... &        3500 &               0.400 &   10           \\
20-000 &  2M J04141188+28   & M6.25     &   33      &         ... &  0.28 &        2962 &               0.015 &   33           \\
20-042 &  V773 Tau ABC      & K2/M0     &   58      &        1.39 &  0.31 &   4898/3873 &    1.89/ 1.17/ 5.60 &    5, 58       \\
20-043 &  FM Tau            & M0        &    5      &        0.69 &  0.59 &        3850 &               0.460 &    5, 27       \\
20-046 &  CW Tau            & K3        &    5      &        2.29 &  0.55 &        4730 &               1.100 &    5, 27       \\
20-047 &  CIDA 1            & M5.5      &   57      &         ... &   ... &         ... &                 ... &    ...         \\
20-056 &  MHO 2/1           & M2.5/2.5  &    5      &        4.58 &  1.85 &   3488/3488 &    0.42/ 0.14/ 0.56 &    5,  4       \\
20-058 &  MHO 3             & K7        &    5      &        6.01 &  2.15 &        4060 &               0.910 &    5,  4       \\
20-069 &  FO Tau AB         & M2        &    5      &        1.87 &  0.63 &   3556/3556 &    0.48/ 0.45/ 0.77 &    5, 58, 27   \\
20-073 &  CIDA 2            & M5.5      &    5      &        0.83 &  0.28 &        3058 &               0.320 &    5, 27       \\
23-002 &  CY Tau            & M1.5      &    5      &        0.10 &  0.23 &        3632 &               0.500 &    5, 27       \\
24-002 &  CY Tau            & M1.5      &    5      &        0.10 &  0.23 &        3632 &               0.500 &    5, 27       \\
23-004 &  LkCa 5            & M2        &   27      &        0.10 &  0.11 &        3560 &               0.370 &    5, 27       \\
24-004 &  LkCa 5            & M2        &   27      &        0.10 &  0.11 &        3560 &               0.370 &    5, 27       \\
23-008 &  CIDA 3            & M4        &    5      &         ... &  0.26 &        3270 &               0.140 &    5           \\
24-008 &  CIDA 3            & M4        &    5      &         ... &  0.26 &        3270 &               0.140 &    5           \\
23-015 &  V410 X3           & M6        &    5      &        0.54 &  0.17 &        2990 &               0.084 &    5, 58       \\
24-015 &  V410 X3           & M6        &    5      &        0.54 &  0.17 &        2990 &               0.084 &    5, 58       \\
23-018 &  V410 A13          & M5.75     &    5      &        2.78 &  0.79 &        3024 &               0.039 &    5, 4        \\
24-000 &  V410 A13          & M5.75     &    5      &        2.78 &  0.79 &        3024 &               0.039 &    5, 4        \\
23-000 &  V410 A24          & G1        &    5      &         ... &  6.73 &        5945 &               2.800 &    5           \\
24-000 &  V410 A24          & G1        &    5      &         ... &  6.73 &        5945 &               2.800 &    5           \\
23-029 &  V410 A25          & M1        &    5      &         ... &  6.55 &        3705 &               1.600 &    5           \\
24-027 &  V410 A25          & M1        &    5      &         ... &  6.55 &        3705 &               1.600 &    5           \\
23-032 &  V410 Tau ABC      & K4        &   58      &        0.67 &  0.00 &   4602/3076 &    2.15/ 0.05/ 2.20 &    58          \\
24-028 &  V410 Tau ABC      & K4        &   58      &        0.67 &  0.00 &   4602/3076 &    2.15/ 0.05/ 2.20 &    58          \\
23-033 &  DD Tau AB         & M3        &    5      &  0.39/ 0.39 &  0.05 &   3412/3412 &    0.13/ 0.13/ 0.34 &    5, 58       \\
24-029 &  DD Tau AB         & M3        &    5      &  0.39/ 0.39 &  0.05 &   3412/3412 &    0.13/ 0.13/ 0.34 &    5, 58       \\
23-035 &  CZ Tau AB         & M3        &    5      &        1.32 &  0.48 &        3415 &               0.270 &    5, 27       \\
24-030 &  CZ Tau AB         & M3        &    5      &        1.32 &  0.48 &        3415 &               0.270 &    5, 27       \\
23-036 &  IRAS 04154+2823   & M2.5      &    5      &         ... &  4.26 &        3488 &               0.130 &    5           \\
24-031 &  IRAS 04154+2823   & M2.5      &    5      &         ... &  4.26 &        3488 &               0.130 &    5           \\
23-037 &  V410 X2           & M0        &    5      &         ... &  6.03 &        3850 &               3.000 &    5           \\
24-032 &  V410 X2           & M0        &    5      &         ... &  6.03 &        3850 &               3.000 &    5           \\
23-045 &  V410 X4           & M4        &    5      &         ... &  5.29 &        3270 &               1.300 &    5           \\
24-038 &  V410 X4           & M4        &    5      &         ... &  5.29 &        3270 &               1.300 &    5           \\
23-047 &  V892 Tau          & B9        &    5      &        5.93 &  2.39 &       10500 &              77.000 &    5, 27       \\
24-040 &  V892 Tau          & B9        &    5      &        5.93 &  2.39 &       10500 &              77.000 &    5, 27       \\
23-048 &  LR 1              & K4.5      &    5      &         ... &  6.40 &        4470 &               0.470 &    5           \\
24-000 &  LR 1              & K4.5      &    5      &         ... &  6.40 &        4470 &               0.470 &    5           \\
23-050 &  V410 X7           & M0.75     &    5      &        8.18 &  2.34 &        3741 &               0.500 &    5, 58       \\
24-042 &  V410 X7           & M0.75     &    5      &        8.18 &  2.34 &        3741 &               0.500 &    5, 58       \\
23-000 &  V410 A20          & K3        &    5      &         ... &  6.57 &        4730 &               0.510 &    5           \\
24-000 &  V410 A20          & K3        &    5      &         ... &  6.57 &        4730 &               0.510 &    5           \\
23-056 &  Hubble 4          & K7        &    5      &        0.76 &  0.68 &        4060 &               2.700 &    5, 27       \\
24-047 &  Hubble 4          & K7        &    5      &        0.76 &  0.68 &        4060 &               2.700 &    5, 27       \\
23-000 &  KPNO-Tau 2        & M6.75     &   18      &        0.37 &  0.00 &        2889 &               0.007 &   18, 5        \\
24-000 &  KPNO-Tau 2        & M6.75     &   18      &        0.37 &  0.00 &        2889 &               0.007 &   18, 5        \\
23-000 &  CoKu Tau 1        & K7        &   59      &        6.80 &   ... &        4000 &               0.150 &   59           \\
24-000 &  CoKu Tau 1        & K7        &   59      &        6.80 &   ... &        4000 &               0.150 &   59           \\
23-061 &  V410 X6           & M5.5      &    5      &         ... &  0.17 &        3058 &               0.200 &    5           \\
\hline
24-054 &  V410 X6           & M5.5      &    5      &         ... &  0.17 &        3058 &               0.200 &    5           \\
23-063 &  V410 X5           & M5.5      &    5      &        3.36 &  0.72 &        3058 &               0.083 &    5, 58       \\
24-055 &  V410 X5           & M5.5      &    5      &        3.36 &  0.72 &        3058 &               0.083 &    5, 58       \\
23-067 &  FQ Tau AB         & M3/M3.5   &   20      &  1.95/ 1.80 &  0.16 &   3416/3345 &    0.20/ 0.28/ 0.21 &    5, 20       \\
24-058 &  FQ Tau AB         & M3/M3.5   &   20      &  1.95/ 1.80 &  0.16 &   3416/3345 &    0.20/ 0.28/ 0.21 &    5, 20       \\
28-100 &  BP Tau            & K7        &   27      &        0.49 &  0.14 &        4060 &               0.950 &   27           \\
23-074 &  V819 Tau AB       & K7        &    5      &        1.35 &  0.48 &        4060 &               0.910 &    5, 27       \\
24-061 &  V819 Tau AB       & K7        &    5      &        1.35 &  0.48 &        4060 &               0.910 &    5, 27       \\
16-000 &  IRAS 04166+2706   & $<$M0     &   66      &         ... &   ... &         ... &                 ... &   ...          \\
16-000 &  IRAS 04169+2702   & ...       &   ...     &         ... &   ... &         ... &               0.800 &   13           \\
11-000 &  CFHT-Tau 19       & M5.25     &   18      &        7.30 &   ... &        3100 &               0.072 &   18           \\
11-000 &  IRAS 04181+2655   & ...       &   ...     &         ... &   ... &        4000 &               1.800 &   10           \\
11-000 &  IRAS 04181+2654AB & ...       &   ...     &         ... &   ... &         ... &    0.25/ 0.25/ 0.50 &   13           \\
11-023 &  2M J04213459      & M5.5      &   33      &         ... &  0.49 &        3058 &               0.065 &   33           \\
01-028 &  IRAS 04187+1927   & M0        &   27      &         ... &   ... &        3850 &                 ... &   27           \\
11-037 &  CFHT-Tau 10       & M5.75     &   66      &        3.59 &   ... &        3030 &               0.021 &   18, 19       \\
11-000 &  2M J04215450+2652 & M8.5      &   66      &        2.97 &   ... &        2642 &               0.003 &   19           \\
21-038 &  RY Tau            & K1        &   27      &        1.84 &  0.53 &        5080 &               7.600 &   27           \\
21-039 &  HD 283572         & G5        &   27      &        0.38 &  0.11 &        5770 &               6.500 &   27           \\
01-045 &  T Tau N(+Sab)     & K0        &   27      &        1.39 &  0.40 &        5250 &               8.910 &   27           \\
11-054 &  Haro 6-5 B        & K5        &   59      &        9.96 &   ... &        4395 &               0.047 &   59           \\
11-057 &  FS Tau AC         & M0/M3.5   &   20      &  4.95/ 5.15 &  0.53 &   3876/3345 &    0.15/ 0.17/ 0.32 &   27, 20       \\
21-044 &  LkCa 21           & M3        &   27      &        0.73 &  0.21 &        3470 &               0.620 &   27           \\
01-054 &  RX J0422.1+1934   & ...       &   ...     &         ... &   ... &         ... &                 ... &   ...          \\
01-062 &  2M J04221332+1934 & M8        &   66      &        1.02 &   ... &        2713 &               0.017 &   19           \\
11-079 &  CFHT-Tau 21       & M1.25     &   18      &        6.60 &   ... &        3665 &               0.381 &   18           \\
02-013 &  FV Tau AB         & K5/K6     &   58      &  5.33/ 5.33 &  1.15 &   4395/4130 &    0.98/ 0.44/ 1.20 &    5, 58       \\
02-000 &  FV Tau/c AB       & M2.5/3.5  &   20      &  3.25/ 7.00 &  0.49 &   3412/3155 &    0.18/ 0.06/ 0.21 &    5, 20, 58   \\
02-016 &  KPNO-Tau 13       & M5        &   34      &         ... &  0.70 &        3125 &               0.150 &   34           \\
02-000 &  DG Tau B          & ...       &  ...      &         ... &   ... &        4000 &               5.500 &   10           \\
02-022 &  DG Tau A          & K6        &    5      &        1.41 &  0.36 &        4205 &               1.700 &    5, 58       \\
02-000 &  KPNO-Tau 4        & M9.5      &    5, 18  &        2.45 &  0.00 &        2500 &               0.004 &    5, 18       \\
02-000 &  IRAS 04248+2612AB & M2-5.5    &    5, 59  &        7.02 &  1.51 &        2845 &               0.270 &    5, 59       \\
15-020 &  JH 507            & M4        &    5      &        0.76 &  0.29 &        3270 &               0.420 &    5, 27       \\
13-004 &  GV Tau AB         & K3-7      &   27, 59  &       12.10 &   ... &        4000 &               1.820 &   59           \\
13-000 &  IRAS 04264+2433   & M1        &   59      &       10.40 &   ... &        3605 &               0.140 &   59           \\
15-040 &  DH Tau AB         & M1        &    5      &        1.25 &  0.32 &        3705 &               0.560 &    5, 27       \\
15-042 &  DI Tau AB         & M0        &    5      &        0.76 &  0.43 &        3850 &               0.990 &    5, 27       \\
15-044 &  KPNO-Tau 5        & M7.5      &    5, 19  &        0.00 &  0.00 &        2783 &               0.023 &   19           \\
14-006 &  IQ Tau A          & M0.5      &    5      &        1.25 &  0.45 &        3778 &               0.880 &    5, 27       \\
13-000 &  CFHT-Tau 20       & M5.5      &   18      &        3.60 &   ... &        3065 &               0.138 &   18           \\
14-000 &  KPNO-Tau 6        & M9.0      &   18      &        0.88 &  0.00 &        2571 &               0.003 &    5, 18       \\
13-035 &  FX Tau AB         & M1        &   27      &        1.08 &  0.31 &        3720 &               1.020 &   27           \\
14-057 &  DK Tau AB         & K7        &    5      &        0.76 &  0.28 &        4060 &               1.300 &    5, 27       \\
14-000 &  KPNO-Tau 7        & M8.25     &    5      &         ... &  0.00 &        2632 &               0.003 &    5           \\
22-013 &  MHO 9             & M4.25     &    5      &        1.73 &  0.56 &        3234 &               0.220 &    5,  4       \\
22-021 &  MHO 4             & M7.1      &    5, 18  &        1.10 &  0.14 &        2880 &               0.048 &    5, 58       \\
22-040 &  L1551 IRS5        & ...       &  ...      &         ... &   ... &        4800 &               2.600 &   10           \\
22-042 &  LkHa 358          & M5.5      &    5      &       13.60 &  3.84 &        3058 &               0.590 &    5, 45       \\
22-000 &  HH 30             & M0        &   59      &        2.96 &   ... &        3800 &               0.006 &   59           \\
22-043 &  HL Tau            & K5        &   59      &        7.43 &   ... &        4395 &               1.530 &   59           \\
22-047 &  XZ Tau AB         & M2/M3.5   &   20      &  1.40/ 1.35 &  0.11 &   3561/3345 &    0.17/ 0.31/ 0.33 &    5, 20       \\
22-056 &  L1551 NE          & ...       &  ...      &         ... &   ... &         ... &                 ... &   ...          \\
03-005 &  HK Tau AB         & M0.5/M2   &    5      &        2.32 &  0.97 &   3778/3560 &               0.560 &    5, 27       \\
22-070 &  V710 Tau BA       & M0.5/M2   &    5      &  1.80/ 1.82 &  0.62 &   3778/3560 &    0.58/ 0.52/ 1.10 &    5, 58       \\
19-009 &  JH 665            & M5.5      &    5      &        0.97 &  0.54 &        3058 &               0.260 &    5, 27       \\
22-089 &  L1551 51          & K7        &    5      &        0.00 &  0.00 &        4060 &               0.470 &    5, 27       \\
22-097 &  V827 Tau          & K7        &    5      &        0.28 &  0.31 &        4060 &               1.100 &    5, 27       \\
03-016 &  Haro 6-13         & M0        &   59      &       11.90 &   ... &        3800 &               2.110 &   59           \\
\hline
22-100 &  V826 Tau          & K7        &    5      &        0.28 &  0.19 &        4060 &               0.940 &    5, 27       \\
22-101 &  MHO 5             & M6        &    5      &        0.23 &  0.17 &        2990 &               0.110 &    5, 58       \\
03-017 &  CFHT-Tau 7        & M5.75     &   66      &        0.00 &   ... &        3030 &               0.061 &   18, 19       \\
03-019 &  V928 Tau AB       & M0.5      &    5      &        1.87 &  1.04 &        3778 &               1.400 &    5, 27       \\
03-022 &  FY Tau            & K5        &    5      &        3.47 &  1.07 &        4350 &               1.000 &    5, 27       \\
03-023 &  FZ Tau            & M0        &    5      &        2.72 &  0.99 &        3850 &               0.980 &    5, 58       \\
17-002 &  IRAS 04295+2251   & ...       &  ...      &         ... &   ... &        3400 &               1.200 &   10           \\
19-049 &  UZ Tau E+W(AB)    & M1/2/3    &   27, 20  &  1.49/ 0.83 &  0.26 &   3705/3560 &    0.40/ 0.49/ 0.89 &    5, 27       \\
17-009 &  JH 112            & K6        &   27      &        3.23 &  0.93 &        4205 &               0.740 &   27           \\
03-031 &  CFHT-Tau 5        & M7.5      &   18      &        9.22 &   ... &        2783 &               0.075 &   18           \\
04-003 &  CFHT-Tau 5        & M7.5      &   18      &        9.22 &   ... &        2783 &               0.075 &   18           \\
03-035 &  MHO 8             & M6        &    5      &        0.19 &  0.28 &        2990 &               0.170 &    5, 4        \\
04-009 &  MHO 8             & M6        &    5      &        0.19 &  0.28 &        2990 &               0.170 &    5, 4        \\
04-010 &  GH Tau AB         & M1.5/M2   &   58      &  0.69/ 0.64 &  0.11 &   3631/3556 &    0.38/ 0.34/ 0.81 &    5, 58       \\
04-012 &  V807 Tau  SNab    & K7/M3     &   58      &  0.36/ 0.36 &  0.04 &   3999/3388 &    1.07/ 0.32/ 2.10 &    5, 58       \\
18-004 &  KPNO-Tau 14       & M6        &   34      &         ... &  0.85 &        2990 &               0.110 &   34           \\
17-000 &  CFHT-Tau 12       & M6        &   66      &        3.44 &   ... &        2995 &               0.036 &   18, 19       \\
04-016 &  V830 Tau          & K7        &    5      &        0.28 &  0.13 &        4060 &               0.780 &    5, 27       \\
18-000 &  IRAS S04301+261   & M0        &    5      &         ... &  1.76 &        3850 &               0.025 &    5           \\
17-000 &  IRAS 04302+2247   & ...       & ...       &         ... &   ... &         ... &               0.300 &   13           \\
17-027 &  IRAS 04303+2240   & M0.5      &   59      &       11.70 &   ... &        3700 &               2.200 &   59           \\
04-034 &  GI Tau            & K7        &    5      &        0.87 &  0.43 &        4060 &               1.000 &    5, 27       \\
04-035 &  GK Tau AB         & K7        &    5      &        0.87 &  0.46 &        4060 &               1.400 &    5, 27       \\
18-019 &  IS Tau AB         & K7/M4.5   &   58      &  3.67/ 3.67 &  0.95 &   3999/3221 &    0.50/ 0.19/ 0.66 &    5, 58       \\
17-058 &  CI Tau            & K7        &   27      &        1.77 &  0.51 &        4060 &               0.870 &   27           \\
18-030 &  IT Tau AB         & K2        &    5      &        4.09 &  1.86 &        4900 &               2.400 &    5, 27       \\
17-066 &  JH 108            & M1        &   27      &        1.46 &  0.42 &        3720 &               0.300 &   27           \\
17-068 &  CFHT-BD Tau 1     & M7.1      &   39, 19  &        3.10 &   ... &        2853 &               0.017 &   39, 19       \\
25-026 &  AA Tau            & K7        &    5      &        0.49 &  0.27 &        4060 &               0.800 &    5, 27       \\
09-010 &  HO Tau AB         & M0.5      &    5      &        1.11 &  0.46 &        3778 &               0.170 &    5, 27       \\
08-019 &  FF Tau AB         & K7        &    5      &        2.22 &  0.51 &        4060 &               0.690 &    5, 27       \\
12-040 &  DN Tau            & M0        &    5      &        0.49 &  0.34 &        3850 &               1.000 &    5, 27       \\
12-000 &  IRAS 04325+2402AB & ...       &  ...      &         ... &   ... &         ... &               0.720 &   28           \\
12-059 &  CoKu Tau 3 AB     & M1        &    5      &        3.26 &  2.15 &        3705 &               0.980 &    5, 27       \\
09-022 &  KPNO-Tau 8        & M5.75     &    5      &         ... &  0.14 &        3024 &               0.021 &    5           \\
08-037 &  HQ Tau AB         & ...       &  ...      &         ... &   ... &         ... &                 ... &  ...           \\
09-026 &  HQ Tau AB         & ...       &  ...      &         ... &   ... &         ... &                 ... &  ...           \\
08-043 &  KPNO-Tau 15       & M2.75     &   34      &         ... &  0.56 &        3451 &               0.140 &   34           \\
09-031 &  KPNO-Tau 15       & M2.75     &   34      &         ... &  0.56 &        3451 &               0.140 &   34           \\
08-000 &  KPNO-Tau 9        & M8.5      &    5      &         ... &  0.00 &        2555 &               0.001 &    5           \\
09-000 &  KPNO-Tau 9        & M8.5      &    5      &         ... &  0.00 &        2555 &               0.001 &    5           \\
08-048 &  HP Tau AB         & K3        &    5      &        2.26 &  0.91 &        4730 &               1.400 &    5, 27       \\
08-051a&  HP Tau/G3 AB      & K7        &    5      &        2.32 &  0.77 &        4060 &               0.710 &    5, 27       \\
08-051 &  HP Tau/G2         & G0        &    5      &        2.08 &  0.66 &        6030 &               6.500 &    5, 27       \\
08-058 &  Haro 6-28 AB      & M2/M3.5   &   20      &  2.30/ 1.90 &  1.34 &   3556/3342 &    0.09/ 0.03/ 0.12 &    5, 20       \\
08-000 &  CFHT-BD Tau 2     & M7.5      &    5      &        0.00 &  0.56 &        2795 &               0.011 &    5, 39       \\
08-080 &  CFHT-BD Tau 3     & M7.75     &    5      &        0.00 &  0.28 &        2747 &               0.007 &    5, 39       \\
05-005 &  CFHT-Tau 6        & M7.25     &   33, 18  &        0.41 &  0.07 &        2818 &               0.024 &   33, 18       \\
05-000 &  IRAS 04361+2547   & ...       &  ...      &         ... &   ... &         ... &               3.700 &   13           \\
05-013 &  GN Tau AB         & M2.5      &   33      &         ... &  1.17 &        3488 &               0.720 &   33           \\
05-017 &  IRAS 04365+2535   & ...       &  ...      &         ... &   ... &         ... &               2.200 &   27(Lb)$^c$   \\
05-024 &  IRAS 04369+2539   & K4        &   59      &       18.10 &   ... &        4580 &              20.700 &   59           \\
07-011 &  JH 223            & M2        &   27      &         ... &  0.14 &        3560 &               0.180 &   33           \\
07-022 &  Haro 6-32         & M5        &   33      &         ... &  0.17 &        3125 &               0.120 &   33           \\
07-000 &  ITG 33 A          & M3        &   33      &        3.50 &  1.89 &        3415 &               0.051 &   33, 35       \\
07-000 &  CFHT-Tau 8        & M5.5      &   33      &        1.77 &  0.70 &        3058 &               0.024 &   33, 18, 19   \\
07-000 &  IRAS 04381+2540   & ...       &  ...      &         ... &   ... &         ... &               0.700 &   13           \\
07-041 &  IRAS 04385+2550AB & M0        &   33      &       10.20 &  1.13 &        3850 &               0.180 &   33, 59       \\
10-017 &  CoKuLk332/G2 AB   & M0.5/2.5  &   20      &  2.00/ 3.30 &  0.99 &   3778/3485 &    0.24/ 0.15/ 1.10 &   33, 20       \\
\hline
10-018 &  CoKuLk332/G1 AB   & K7/M1     &   58      &  4.13/ 4.13 &  1.33 &   3707/3945 &    0.85/ 0.58/ 1.70 &   33, 58       \\
10-020 &  V955 Tau AB       & K5/M1     &   58      &  3.72/ 3.72 &  0.90 &   4395/3715 &    0.32/ 0.18/ 1.00 &   33, 58       \\
10-034 &  CIDA 7            & M4.75     &   66      &         ... &   ... &         ... &               0.050 &   27(Lb)$^c$   \\
10-045 &  DP Tau            & M0.5      &   27      &        1.46 &  0.41 &        3778 &               0.200 &   33, 27       \\
10-060 &  GO Tau            & M0        &   27      &        1.18 &  0.77 &        3850 &               0.370 &   33, 27       \\
26-012 &  2M J04552333+30   & M6.25     &   33, 19  &        0.00 &  0.00 &        2959 &               0.015 &   33, 19       \\
26-034 &  2M J04554046+30   & M5.25     &   33      &         ... &  0.07 &        3091 &               0.021 &   33           \\
26-043 &  AB Aur            & B9.5-A0   &   27, 7   &        0.25 &  0.24 &       10050 &              49.000 &   33, 27, 8, 9 \\
26-050 &  2MJ04554757/801   & M4.75/5.6 &   33      &         ... &  0.00 &   3161/3044 &    0.10/ 0.01/ 0.11 &   33           \\
26-067 &  SU Aur            & G2        &   27      &        0.90 &  0.21 &        5860 &               9.900 &   33, 27       \\
26-072 &  HBC 427           & K7        &   27      &        0.00 &  0.17 &        4350 &               1.100 &   33, 27       \\
\hline
\multicolumn{9}{l}{Additional sources from Chandra}\\
\hline
C1-0   &  KPNO-Tau 10       & M5        &   34      &         ... &  0.14 &        3125 &               0.052 &   34           \\
C1-1   &  IRAS 04158+2805   & M3        &    5      &        8.63 &   ... &        2760 &               0.050 &   59           \\
C2-1   &  Haro 6-5 B        & K5        &   59      &        9.96 &   ... &        4395 &               0.047 &   59           \\
C2-2   &  FS Tau AC         & M0/M3.5   &   20      &  4.95/ 5.15 &  0.53 &   3876/3345 &    0.15/ 0.17/ 0.32 &   27, 20       \\
C3-1   &  FV Tau/c AB       & M2.5/3.5  &   20      &  3.25/ 7.00 &  0.49 &   3412/3155 &    0.18/ 0.06/ 0.21 &    5, 20, 58   \\
C3-2   &  DG Tau B          & ...       &  ...      &         ... &   ... &        4000 &               5.500 &   10           \\
C4-1   &  GV Tau AB         & K3-7      &   27, 59  &       12.10 &   ... &        4000 &               1.820 &   59           \\
C5-2   &  HN Tau AB         & K5/M4     &    5      &  1.18/ 0.91 &  0.12 &   4395/3273 &    0.22/ 0.03/ 0.25 &    5, 58       \\
C5-1   &  L1551 55          & K7        &    5      &        0.69 &  0.20 &        4060 &               0.370 &    5, 27       \\
C5-4   &  HD 28867          & B9IVn     &   65      &        0.25 &   ... &       10500 &  64.90/62.10/127.00 &   65           \\
C5-3   &  DM Tau            & M1        &    5      &        0.59 &  0.31 &        3705 &               0.300 &    5, 58       \\
C6-1   &  CFHT-BD Tau 4     & M7        &   33      &        2.60 &  0.70 &        2853 &               0.062 &   33, 39, 19   \\
C6-0   &  L1527 IRS         & ...       &  ...      &         ... &   ... &         ... &               1.300 &   27(Lb)$^c$   \\
C6-0   &  CFHT-Tau 17       & M5.5      &   66      &        6.50 &   ... &        3030 &               0.068 &   18           \\
C6-2   &  IRAS 04370+2559   & ...       & ...       &         ... &   ... &         ... &               0.210 &   27(Lb)$^c$   \\
\hline
\end{tabular}
$^a$ For multiples, first number or spectral type refers to primary, second to secondary component.\\
$^b$ For multiples, three numbers give primary/secondary/total system luminosity.\\
$^c$ Referring to $L_{\rm bol}$ as derived from integration of the optical and infrared spectrum.\\
Notes on individual objects: 
\begin{itemize}
\item V773 Tau = XEST-20-042: Multiple entries refer to A and C, respectively
\item HD~28867 = C5-4: total $L_*$ \citep{berghoefer96} scaled to $d=$ 140~pc, split to components according to $V$ mag \citep{walter03}. 
\item FQ Tau = XEST-23-067 = XEST-24-058, FS Tau = XEST-11-057, XZ Tau = XEST-22-047, CoKuLk332/G2 = XEST-10-017: $T_{\rm eff}$ of components read from Fig.~10 in Ref.~20. 
\end{itemize}
\label{tab9}
\normalsize
\end{table}