\begin{table}%T11
\caption{Fundamental parameters of targets in XEST (5): Accretion and evolution [first ten entries].}
%\centerline
 {
\begin{tabular}{rlrlrllrll}
\hline
\hline\\[-3.2mm]
XEST & Name & $\dot{M}$ (min/max)$^a$  &  Refs.  &  $EW$(H$\alpha$)$^b$  & TTS    & Refs.$^c$  & IR$^d$& Refs.$^d$ & Type  \\
   &      & ($M_{\odot}$yr$^{-1}$) &        & (\AA)                   & type   &  	     & class  &          &         \\
\hline
27-115 &  HBC 352           &                 ... & ...       &          0 & W     &  29            & III     &  1, 27     & 3 \\
27-000 &  HBC 353           &                 ... & ...       &          0 & W     &  29            & III     & 27         & 3 \\
06-005 &  HBC 358 AB        & $<$8.97           &   20      &      4- 10 & W/W   &  37, 29        & III     &  1, 27     & 3 \\
06-007 &  HBC 359           &                 ... & ...       &      2-  9 & W     &  56, 37        & III     & 27         & 3 \\
06-059 &  L1489 IRS         &     -7.15           &   59      &     41- 56 & C*    &  59, 29        & I       & 1, 59, 27  & 1 \\
20-001 &  LkCa 1            & $<$-9.72           &   58      &      3-  4 & W     &  29, 45        & III     &  1, 27     & 3 \\
20-005 &  Anon 1            & $<$-8.94           &   58      &      1-  3 & W     &  37, 29        & III     &  1, 27     & 3 \\
20-000 &  IRAS 04108+2803 A &                 ... &  ...      &         37 & C     &  29            & II      & 27         & 2 \\
20-022 &  IRAS 04108+2803 B &                 ... &  ...      &        ... & ...   &  ...           & I       & 59, 27     & 1 \\
20-000 &  2M J04141188+28   &    -10.00           &   46      &        250 & C     &  46            & ...     &  ...       & 4 \\
\hline
\end{tabular}
} 
\smallskip
$^a$ Range of $\dot{M}$ reported in literature given. For multiple systems, numbers refer to primary or integrated system.\\
$^b$ Range of $EW$ reported in literature given. For multiple systems, numbers refer to primary or integrated system.\\
$^c$ For $EW$ range, first reference for minimum, second for maximum reported.\\
$^d$ Infrared classification; double entries: `/' for transition objects, `+' for components, `;' for different types, `,' for  different references. FS = flat-spectrum source. 
\end{table}