\begin{table}%t6
\caption{Best-fit line fluxes for the two~\ion{He}{ii}~lines in  10$^{-16}$~erg~s$^{-1}$~cm$^{-2}$.}\label{Heiifit}
\small%\centerline
{
\begin{tabular}[htbp]{cccccc}
\hline\hline
%&&&&& \\[-8pt]
 No. & 3203 \AA & 4685 \AA\ 1st & 4685 \AA\ 2nd & ratio 1$^1$ & ratio 2$^2$\\
\hline
 11 & 2.4 $\pm$ 0.4 & 1.6 $\pm$ 0.7 & 15.8 $\pm$ 1.6 & 0.10 $\pm$ 0.04 & 0.14 $\pm$ 0.03\\
 12 & 4.3 $\pm$ 0.5 & 5.6 $\pm$ 1.2 & 25.1 $\pm$ 1.6 & 0.22 $\pm$ 0.05 & 0.14 $\pm$ 0.02\\
\hline
\end{tabular}}
\medskip
$^1$ Flux ratio between the two components of the line at 4685~\AA; $^2$~flux ratio between both components of the 4685~\AA\ line and the 3203~\AA\ line.
\end{table}