\begin{table}%t1
  %\centering
\par
    \caption{Bolometer model parameters as described in  Eqs.~(\ref{eq:resist}) and~(\ref{eq:conduct}) for each of the Archeops bolometers.}\label{tableboloparam}
\begin{tabular}{cccccc}
\hline \hline
 Bolometer & $R_{\infty } (\Omega)$ & $T_{r} {\rm (K)}$ &
$G {\rm (pW/K)}$ & $\beta$ & $C {\rm (pJ/K)}$ \\
\hline
    143K01 &     11.27 &     21.16 &     57.96 &      2.80 &      0.40 \\
    143K03 &     44.23 &     16.60 &     70.62 &      2.30 &      0.42 \\
    143K04 &     52.91 &     16.85 &     63.83 &      2.30 &      0.47 \\
    143K05 &     53.41 &     16.85 &     50.94 &      2.30 &      0.35 \\
    143K07 &     21.55 &     18.79 &     60.30 &      2.55 &      0.38 \\
    143T01 &     21.47 &     20.03 &    116.29 &      2.85 &      0.57 \\
%\hline
    217K01 &    299.42 &     16.73 &     28.93 &      2.10 &      0.18 \\
    217K02 &    189.54 &     13.21 &     65.15 &      2.00 &      0.36 \\
    217K03 &    242.93 &     13.10 &     62.87 &      2.00 &      0.03 \\
    217K04 &    159.03 &     13.76 &     69.45 &      2.20 &      0.39 \\
    217K05 &   1172.80 &      9.72 &     59.31 &      1.65 &      0.34 \\
    217K06 &    120.92 &     14.18 &     65.11 &      2.10 &      0.46 \\
    217T04 &     52.38 &     14.79 &    161.00 &      2.30 &      1.06 \\
    217T06 &    136.69 &     13.67 &    182.16 &      2.30 &      0.00 \\
%\hline
    353K01 &     99.45 &     14.39 &     90.50 &      2.20 &      0.21 \\
    353K02 &     94.59 &     15.01 &     98.47 &      2.20 &      0.12 \\
    353K03 &     85.27 &     14.86 &     99.09 &      2.20 &      0.22 \\
    353K04 &     68.05 &     15.18 &    106.59 &      2.20 &      0.23 \\
    353K05 &     77.21 &     14.67 &    103.89 &      2.20 &      0.39 \\
    353K06 &     50.70 &     18.49 &    116.00 &      2.20 &      0.38 \\
%\hline
    545K01 &     34.94 &     18.48 &    136.70 &      2.20 &      0.04 \\
\hline
\end{tabular}
\end{table}