\begin{table}%T3
\caption{The table contains the results collected over years  of
planetary nebulae modelling with Torun codes. First two columns identify
the object. Next five columns contain the photoionization model
parameters: logarithm of stellar black-body temperature, logarithm of
stellar luminosity, assumed distance, nebular outer radius and ionized
mass. Columns 8 and 9 contain the derived mass-averaged expansion
velocity and turbulence. Columns 10 and 11 contain values interpolated
from evolutionary tracks: stellar luminosity and its mass. Column 12
contains the derived kinematic age. Last column lists reference to the
publication of data.}
\begin{tabular}{llccrlllrcccc}
\hline\hline
\noalign{\smallskip}
 \multicolumn{2}{c}{Object} &   \multicolumn{5}{c}{Photoionization model
 parameters}  & & &
 \multicolumn{2}{c}{Interpolated} & & \\
\noalign{\smallskip}
 PN G & Name & $\log T_{\rm b-b}$ & $\log L/L_\odot$ &
 Dist. & $R_{\rm out}$ & $M_{\rm ion}$ & $v_{\rm av}$ & $v_{\rm turb}$ &
 $\log L/L_\odot$ & $M_{\rm core}$ & $t_{\rm kin}$ & Ref. \\
\noalign{\smallskip}
 \multicolumn{2}{c}{ } & [K] &  & [kpc] & [pc] & [$M_\odot$] &
 \multicolumn{2}{c}{[km~s$^{-1}$]} &  & [$M_\odot$] & 10$^3$~yr & \\ 
 \noalign{\smallskip}\hline
\noalign{\smallskip}
000.9-04.8 & M 3-23   & 5.18  & 3.0  &  4.0  &  0.11  & 0.10   & 24.  &  13   & 3.59623 & 0.61146 & 5.06180   & 8 \\ 
001.5-06.7 & SwSt 1   & 4.52  & 4.3  &  2.0  &  0.007 & 0.011  & 17.  &  14   & 3.98030 & 0.64994 & 0.40563   & 4 \\ 
001.7-04.6 & H 1-56   & 4.95  & 3.0  & 10.0  &  0.08  & 0.12   & 17.  &   0   & 3.74856 & 0.60471 & 4.63572   & 5 \\ 
002.0-06.2 & M 2-33   & 4.74  & 3.3  &  8.0  &  0.10  & 0.27   & 12.  &   0   & 3.64800 & 0.57455 & 7.11162   & 5 \\ 
002.0-13.4 & IC 4776  & 4.60  & 3.6  &  3.5  &  0.06  & 0.18   & 22.  &   0   & 3.76774 & 0.59872 & 2.93354   & 5 \\ 
002.1-02.2 & M 3-20   & 4.88  & 3.2  &  7.0  &  0.10  & 0.27   & 32.  &   0   & 3.78154 & 0.60751 & 3.72514   & 5 \\ 
002.6-03.4 & M 1-37   & 4.40  & 3.9  &  8.0  &  0.04  & 0.08   & 27.  &   0   & 3.78642 & 0.60237 & 1.69141   & 8 \\ 
002.6+08.1 & H 1-11   & 4.81  & 3.4  &  7.0  &  0.10  & 0.21   & 19.  &   0   & 3.71811 & 0.59068 & 5.39502   & 6 \\ 
002.7-04.8 & M 1-42   & 4.92  & 3.0  &  4.0  &  0.08  & 0.16   & 13.  &   0   & 3.72295 & 0.59784 & 5.44194   & 8 \\ 
003.1+02.9 & Hb 4     & 4.95  & 3.6  &  4.0  &  0.065 & 0.2    & 16.  &  14   & 3.77384 & 0.60902 & 3.91139   & 4 \\ 
003.2-06.2 & M 2-36   & 4.90  & 3.3  &  6.4  &  0.11  & 0.38   & 22.  &   0   & 3.72494 & 0.59708 & 5.37816   & 5 \\ 
003.6+03.1 & M 2-14   & 4.64  & 3.0  &  8.0  &  0.05  & 0.06   & 17.  &  10   & 3.78088 & 0.60231 & 2.89733   & 8 \\ 
003.7-04.6 & M 2-30   & 5.04  & 3.5  &  7.0  &  0.10  & 0.36   & 26.  &   0   & 3.74235 & 0.60977 & 4.34599   & 5 \\ 
003.8-17.1 & Hb 8     & 4.88  & 3.4  & 15.0  &  0.04  & 0.09   & 22.  &   0   & 3.85697 & 0.62160 & 1.95570   & 5 \\ 
003.9-02.3 & M 1-35   & 4.85  & 3.6  &  4.5  &  0.05  & 0.138  & 25.  &   0   & 3.84039 & 0.61749 & 2.23508   & 6 \\ 
004.0-03.0 & M 2-29   & 4.88  & 3.3  &  9.0  &  0.08  & 0.23   & 14.  &   0   & 3.72973 & 0.59704 & 5.21519   & 5 \\ 
004.2-04.3 & H 1-60   & 4.90  & 3.0  &  7.0  &  0.10  & 0.21   & 21.  &   0   & 3.73553 & 0.59949 & 5.04696   & 5 \\ 
004.6+06.0 & H 1-24   & 4.56  & 3.8  &  7.0  &  0.08  & 0.13   & 24.  &   0   & 3.71760 & 0.58483 & 3.68131   & 8 \\ 
004.9+04.9 & M 1-25   & 4.62  & 3.8  &  8.0  &  0.06  & 0.18   & 30.  &  12   & 3.80650 & 0.60733 & 2.34684   & 4 \\ 
005.2+05.6 & M 3-12   & 5.0   & 3.2  &  8.0  &  0.15  & 0.57   & 30.  &   0   & 3.69984 & 0.59962 & 5.86709   & 4 \\ 
005.8-06.1 & NGC 6620 & 5.04  & 3.3  &  8.0  &  0.14  & 0.45   & 27.  &   0   & 3.68710 & 0.60138 & 5.91995   & 4 \\ 
006.0-03.6 & M 2-31   & 4.86  & 3.7  &  8.0  &  0.07  & 0.26   & 30.  &  15   & 3.81865 & 0.61364 & 2.73797   & 7 \\ 
006.1+08.3 & M 1-20   & 4.90  & 3.4  &  6.0  &  0.026 & 0.045  & 12.  &   0   & 3.86600 & 0.62411 & 1.84902   & 6 \\ 
006.4+02.0 & M 1-31   & 4.76  & 3.8  &  8.0  &  0.06  & 0.29   & 19.  &   0   & 3.78944 & 0.60587 & 3.23701   & 8 \\ 
006.8+04.1 & M 3-15   & 4.90  & 3.6  &  4.0  &  0.06  & 0.19   & 16.  &  15   & 3.78549 & 0.60904 & 3.61052   & 4 \\ 
008.2+06.8 & He 2-260 & 4.80  & 3.2  & 12.0  &  0.06  & 0.13   & 17.  &   0   & 3.78478 & 0.60585 & 3.47679   & 8 \\ 
008.3-01.1 & M 1-40   & 5.15  & 3.3  &  2.5  &  0.042 & 0.067  & 27.  &   0   & 3.85805 & 0.64136 & 1.77598   & 4 \\ 
009.4-09.8 & M 3-32   & 4.95  & 3.2  &  7.0  &  0.10  & 0.26   & 23.  &   0   & 3.74476 & 0.60407 & 4.74108   & 5 \\ 
009.6-10.6 & M 3-33   & 4.95  & 3.3  &  8.0  &  0.12  & 0.40   & 25.  &   0   & 3.72404 & 0.60009 & 5.36420   & 5 \\ 
010.7-06.4 & IC 4732  & 4.82  & 3.6  &  8.0  &  0.08  & 0.29   & 25.  &   0   & 3.78307 & 0.60601 & 3.57613   & 5 \\ 
027.6+04.2 & M 2-43   & 4.81  & 3.6  &  5.0  &  0.02  & 0.039  & 20.  &  10   & 3.93608 & 0.63867 & 1.04304   & 4 \\ 
029.2-05.9 & NGC 6751 & 4.90  & 3.0  &  2.0  &  0.1   & 0.15   & 41.  &  15   & 3.80594 & 0.61265 & 3.06776   & 4 \\ 
064.7+05.0 & BD+30    & 4.41  & 4.1  &  2.6  &  0.035 & 0.08   & 27.  &  15   & 3.81013 & 0.60724 & 1.47999   & 4 \\ 
096.4+29.9 & NGC 6543 & 4.70  & 3.6  &  1.1  &  0.05  & 0.12   & 17.  &  12   & 3.79443 & 0.60585 & 2.89733   & 4 \\ 
120.0+09.8 & NGC 40   & 4.52  & 3.3  &  1.2  &  0.14  & 0.25   & 25.  &   8   & 3.57745 & 0.56427 & 6.25823   & 4 \\ 
123.6+34.5 & IC 3568  & 4.68  & 3.9  &  2.0  &  0.1   & 0.13   & 29.  &   0   & 3.74033 & 0.59264 & 4.01168   & 4 \\ 
144.5+06.5 & NGC 1501 & 5.15  & 3.8  &  1.2  &  0.16  & 0.18   & 40.  &  10   & 3.64436 & 0.61050 & 5.00658   & 4 \\ 
146.7+07.6 & M 4-18   & 4.4   & 3.8  &  6.8  &  0.06  & 0.1    & 15.  &  15   & 3.61432 & 0.56699 & 3.75494   & 4 \\ 
211.2-03.5 & M 1-6    & 4.60  & 3.5  &  4.0  &  0.03  & 0.05   & 24.  &   0   & 3.85947 & 0.61760 & 1.38049   & 8 \\ 
215.2-24.2 & IC 418   & 4.57  & 3.9  &  1.0  &  0.036 & 0.05   & 15.  &   0   & 3.79977 & 0.60566 & 2.25296   & 4 \\ 
217.4+02.0 & St 3-1   & 4.96  & 2.5  &  4.0  &  0.14  & 0.20   & 26.  &   0   & 3.70056 & 0.59589 & 6.08439   & 8 \\ 
221.3-12.3 & IC 2165  & 5.19  & 3.2  &  2.5  &  0.057 & 0.076  & 25.  &  14   & 3.76072 & 0.63015 & 2.54799   & 4 \\ 
232.0+05.7 & SaSt 2-3 & 4.80  & 2.5  &  4.0  &  0.02  & 0.01   & 19.  &   0   & 3.93049 & 0.63679 & 1.07900   & 8 \\ 
232.4-01.8 & M 1-13   & 5.04  & 2.9  &  4.0  &  0.10  & 0.19   & 14.  &   0   & 3.66755 & 0.59792 & 6.51899   & 8 \\ 
253.9+05.7 & M 3-6    & 4.72  & 4.0  &  1.5  &  0.036 & 0.03   & 18.  &   0   & 3.83991 & 0.61485 & 2.01157   & 8 \\ 
258.1-00.3 & He 2-9   & 4.73  & 2.9  &  1.5  &  0.015 & 0.01   & 25.  &   0   & 3.96926 & 0.64835 & 0.67052   & 8 \\ 
261.0+32.0 & NGC 3242 & 4.9   & 3.3  &  1.0  &  0.1   & 0.15   & 31.  &   0   & 3.77838 & 0.60772 & 3.81599   & 4 \\ 
261.6+03.0 & He 2-15  & 5.17  & 3.0  &  2.2  &  0.13  & 0.32   & 22.  &   0   & 3.54221 & 0.60566 & 6.35601   & 8 \\ 
278.1-05.9 & NGC 2867 & 5.08  & 3.1  &  2.0  &  0.07  & 0.15   & 28.  &  12   & 3.78876 & 0.62018 & 2.88208   & 6 \\ 
278.8+04.9 & PB 6     & 5.04  & 2.7  &  4.0  &  0.1   & 0.18   & 34.  &  16   & 3.77138 & 0.61423 & 3.55581   & 6 \\ 
283.3+03.9 & He 2-50  & 5.12  & 2.9  &  5.1  &  0.14  & 0.32   & 17.  &   0   & 3.54669 & 0.59451 & 8.11252   & 8 \\ 
285.4+01.5 & Pe 1-1   & 4.93  & 3.3  &  3.5  &  0.05  & 0.038  & 24.  &  10   & 3.83898 & 0.61981 & 2.30082   & 4 \\ 
292.4+04.1 & PB 8     & 4.76  & 3.6  &  5.0  &  0.06  & 0.18   & 22.  &  09   & 3.80234 & 0.60832 & 2.93354   & 8 \\ 
296.3-03.0 & He 2-73  & 5.00  & 3.7  &  4.0  &  0.04  & 0.11   & 19.  &   0   & 3.84716 & 0.62464 & 2.15801   & 5 \\ 
300.7-02.0 & He 2-86  & 4.83  & 3.4  &  3.0  &  0.03  & 0.05   & 14.  &  11   & 3.85377 & 0.61958 & 1.95570   & 8 \\ 
304.8+05.1 & He 2-88  & 4.72  & 2.8  &  4.0  &  0.03  & 0.03   & 23.  &   0   & 3.87629 & 0.62213 & 1.42232   & 8 \\ 
307.2-09.0 & He 2-97  & 4.81  & 3.3  &  4.5  &  0.03  & 0.05   & 19.  &   0   & 3.87420 & 0.62326 & 1.61851   & 5 \\ 
309.0-04.2 & He 2-99  & 4.49  & 2.7  &  4.0  &  0.16  & 0.25   & 45.  &  10   & 3.63538 & 0.57008 & 4.55144   & 8 \\ 
316.1+08.4 & He 2-108 & 4.51  & 3.8  &  4.0  &  0.10  & 0.14   & 21.  &  09   & 3.62192 & 0.56865 & 5.04696   & 8 \\ 
321.0+03.9 & He 2-113 & 4.48  & 2.8  &  2.0  &  0.01  & 0.003  & 18.  &  15   & 3.94205 & 0.63638 & 0.55877   & 8 \\ 
325.0+03.2 & He 2-129 & 4.87  & 3.8  &  7.0  &  0.03  & 0.08   & 18.  &  13   & 3.87817 & 0.62570 & 1.67631   & 8 \\ 
325.8+04.5 & He 2-128 & 4.70  & 3.3  &  5.0  &  0.06  & 0.13   & 12.  &  10   & 3.73533 & 0.59173 & 4.26697   & 8 \\ 
327.1-02.2 & He 2-142 & 4.41  & 3.7  &  3.5  &  0.03  & 0.03   & 20.  &   7   & 3.80232 & 0.60571 & 1.56456   & 4 \\ 
327.5+13.3 & He 2-118 & 4.90  & 3.0  &  7.0  &  0.03  & 0.03   & 13.  &   0   & 3.85268 & 0.62141 & 2.04073   & 5 \\ 
345.0-04.9 & Cn 1-3   & 4.65  & 3.6  &  7.5  &  0.05  & 0.12   & 16.  &   0   & 3.77769 & 0.60171 & 3.00876   & 5 \\ 
345.2-08.8 & Tc 1     & 4.5   & 3.5  &  2.0  &  0.05  & 0.05   & 20.  &   0   & 3.75304 & 0.59402 & 2.60759   & 4 \\ 
346.3-06.8 & Fg 2     & 5.08  & 3.2  &  8.7  &  0.10  & 0.22   & 30.  &   0   & 3.74337 & 0.61349 & 3.91139   & 5 \\ 
347.4+05.8 & H 1-2    & 4.96  & 3.9  &  7.0  &  0.02  & 0.06   & 13.  &  10   & 3.91769 & 0.63917 & 1.36048   & 8 \\ 
349.8+04.4 & M 2-4    & 4.74  & 3.8  &  6.0  &  0.05  & 0.16   & 17.  &   0   & 3.80114 & 0.60774 & 2.89733   & 5 \\ 
350.9+04.4 & H 2-1    & 4.52  & 3.9  &  5.0  &  0.03  & 0.06   & 36.  &   0   & 3.87450 & 0.62022 & 1.02036   & 5 \\ 
351.1+04.8 & M 1-19   & 4.72  & 3.2  & 11.0  &  0.10  & 0.20   & 26.  &   0   & 3.73705 & 0.59269 & 4.34599   & 8 \\ 
351.9+09.0 & PC 13    & 4.95  & 3.9  &  6.0  &  0.10  & 0.15   & 29.  &   0   & 3.77032 & 0.60842 & 4.01168   & 5 \\ 
352.1+05.1 & M 2-8    & 5.11  & 3.2  &  7.0  &  0.06  & 0.16   & 14.  &  14   & 3.72721 & 0.61451 & 3.91139   & 8 \\ 
352.9-07.5 & Fg 3     & 4.67  & 4.0  &  7.0  &  0.03  & 0.09   & 10.  &   0   & 3.81592 & 0.60964 & 2.34684   & 5 \\ 
352.9+11.4 & K 2-16   & 4.46  & 3.3  &  1.0  &  0.05  & 0.002  & 34.  &  12   & 3.80036 & 0.60541 & 1.77791   & 4 \\ 
353.3+06.3 & M 2-6    & 4.74  & 3.7  &  8.4  &  0.04  & 0.103  & 22.  &   0   & 3.84523 & 0.61616 & 1.95570   & 6 \\ 
353.5-04.9 & H 1-36   & 5.08  & 3.5  &  7.0  &  0.03  & 0.061  & 32.  &   0   & 3.93679 & 0.65433 & 1.11754   & 6 \\ 
355.1-06.9 & M 3-21   & 4.95  & 3.2  &  5.0  &  0.06  & 0.11   & 18.  &   0   & 3.85873 & 0.62963 & 2.01878   & 5 \\ 
355.1-02.9 & H 1-31   & 5.04  & 3.7  & 12.0  &  0.04  & 0.11   & 21.  &   0   & 3.79399 & 0.61248 & 3.35262   & 5 \\ 
355.4-02.4 & M 3-14   & 4.90  & 3.8  &  6.0  &  0.08  & 0.35   & 23.  &   0   & 3.77925 & 0.60787 & 3.79287   & 5 \\ 
355.7-03.5 & H 1-35   & 4.65  & 4.0  &  8.0  &  0.04  & 0.14   & 10.  &   0   & 3.77165 & 0.60030 & 3.12911   & 5 \\ 
355.9-04.2 & M 1-30   & 4.60  & 3.8  &  8.0  &  0.07  & 0.22   & 22.  &   0   & 3.74277 & 0.59194 & 3.42247   & 4 \\ 
355.9+03.6 & H 1-9    & 4.58  & 4.0  &  9.0  &  0.04  & 0.09   & 20.  &   0   & 3.81243 & 0.60821 & 2.08608   & 8 \\ 
356.1+02.7 & Th 3-13  & 5.05  & 3.3  &  8.0  &  0.03  & 0.05   & 32.  &   0   & 3.94019 & 0.65232 & 1.11754   & 8 \\ 
356.2-04.4 & Cn 2-1   & 4.90  & 3.6  &  6.0  &  0.04  & 0.087  & 25.  &   0   & 3.87156 & 0.62528 & 1.78807   & 6 \\ 
356.5-02.3 & M 1-27   & 4.41  & 3.6  &  3.0  &  0.04  & 0.05   & 21.  &   0   & 3.76041 & 0.59577 & 2.01878   & 8 \\ 
356.9+04.5 & M 2-11   & 5.15  & 2.7  &  7.0  &  0.05  & 0.06   & 20.  &   0   & 3.77884 & 0.62664 & 2.60759   & 5 \\ 
357.1+03.6 & M 3-7    & 4.72  & 3.2  &  4.0  &  0.05  & 0.07   & 23.  &   0   & 3.82222 & 0.61146 & 2.37054   & 8 \\ 
357.2+07.4 & M 4-3    & 4.80  & 3.6  &  8.0  &  0.033 & 0.075  & 20.  &   0   & 3.86542 & 0.62123 & 1.72101   & 6 \\ 
357.4-03.5 & M 2-18   & 4.64  & 3.5  &  7.0  &  0.06  & 0.09   & 24.  &   0   & 3.75162 & 0.60526 & 4.54226   & 8 \\ 
357.4-03.2 & M 2-16   & 4.95  & 3.3  &  7.0  &  0.09  & 0.25   & 21.  &  14   & 3.78822 & 0.60388 & 2.76098   & 8 \\ 
358.2+03.6 & M 3-10   & 4.97  & 3.0  &  5.0  &  0.04  & 0.048  & 27.  &   0   & 3.88764 & 0.63182 & 1.69141   & 6 \\ 
358.5-04.2 & H 1-46   & 4.70  & 3.9  &  7.0  &  0.02  & 0.045  & 17.  &   0   & 3.90050 & 0.62728 & 1.15893   & 6 \\ 
358.7-05.2 & M 3-40   & 5.00  & 3.3  &  7.6  &  0.03  & 0.05   & 26.  &   0   & 3.92420 & 0.64333 & 1.30380   & 5 \\ 
359.1-02.3 & M 3-16   & 4.57  & 3.8  &  7.0  &  0.08  & 0.14   & 30.  &   0   & 3.74833 & 0.59317 & 3.12911   & 8 \\ 
359.1-01.7 & M 1-29   & 5.08  & 3.5  &  3.0  &  0.05  & 0.128  & 24.  &   0   & 3.82983 & 0.62709 & 2.30082   & 6 \\ 
359.2-33.5 & CRBB 1   & 4.43  & 3.8  &  3.5  &  0.08  & 0.18   & 13.  &   0   & 3.57111 & 0.56316 & 5.44194   & 4 \\ 
359.3-00.9 & Hb 5     & 5.08  & 3.5  &  1.3  &  0.02  & 0.03   & 25.  &   0   & 3.95924 & 0.66284 & 0.89403   & 5 \\ 
359.7-02.6 & H 1-40   & 4.85  & 3.6  &  7.80 &  0.02  & 0.04   & 21.  &   0   & 3.94494 & 0.64258 & 1.00939   & 5 \\ 
359.8-07.2 & M 2-32   & 4.90  & 3.6  &  7.00 &  0.06  & 0.19   & 29.  &   0   & 3.83374 & 0.61773 & 2.40701   & 5 \\ 
359.9-04.5 & M 2-27   & 4.78  & 3.7  &  5.50 &  0.03  & 0.069  & 26.  &   0   & 3.90137 & 0.62872 & 1.30380   & 6 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\multicolumn{13}{l}{References:}\\
\multicolumn{1}{r}{4:} & \multicolumn{12}{l}{Acker et al. 2002, A\&A 384, 620.}\\
\multicolumn{1}{r}{5:} & \multicolumn{12}{l}{Gesicki \& Zijlstra 2000, A\&A 358, 1058.}\\
\multicolumn{1}{r}{6:} & \multicolumn{12}{l}{Gesicki et al. 2003, A\&A 400, 957.}\\
\multicolumn{1}{r}{7:} & \multicolumn{12}{l}{Gesicki \& Zijlstra 2003, MNRAS 338, 347.}\\
\multicolumn{1}{r}{8:} & \multicolumn{12}{l}{Gesicki et al. 2006, A\&A 451, 925.}\\
\hline
\end{tabular}
\end{table}