\begin{table}%t2(1)
%\centering
\par
\caption{SuperWASP objects showing periodic variability, coincident with {\em ROSAT} sources, newly identified as periodic variable stars.}\label{tab2}
 \begin{tabular}{lllrrrrlll}
\hline \hline
$N$ & SuperWASP ID & {\em ROSAT} ID & Period/d  & SW V & B1 & R1 & Name & Type & Sp \\
\hline
 & J001357.58+350243.4 & 1RXS J001357.7+350233 & 2.5730 & 11.66 & 12.67 & 11.35 & & &  \\ 
  & J001614.18+195144.2 & 1RXS J001614.0+195142 & 4.7901 & 11.01 & 13.08 & 7.88 & LHS 107 & double star & M4  \\ 
  & J001736.91+305119.2 & 2RXP J001737.2+305119 & 13.5338 & 12.49 & 12.91 & 11.66 & & &  \\ 
  & J001825.00+232434.2 & 1RXS J001825.5+232432 & 1.5371 & 10.16 & 10.68 & 9.68 & SAO 73880 & & G0  \\ 
  & J002001.09+275954.0 & 1RXS J002001.1+275949 & 4.6817 & 10.24 & 10.96 & 9.71 & SAO73896 & & G5  \\ 
  & J002122.99+334237.1 & 1RXS J002123.2+334236 & 8.3490 & 11.01 & 11.80 & 9.84 & & &  \\ 
  & J002334.66+201428.6 & 1RXS J002334.9+201418 & 7.9165 & 10.84 & 12.54 & 10.04 & StKM 1-34 & & K5  \\ 
  & J003408.48+252349.7 & 1RXS J003408.7+252342 & 3.1555 & 11.11 & 13.00 & 10.37 & BPM 84322 & & K5  \\ 
  & J004836.93+320859.2 & 2RXP J004836.7+320857 & 0.3054 & 12.64 & 13.23 & 11.92 & & &  \\ 
2 & J005033.00+244902.0 & 1RXS J005033.3+244901 & 1.6968 & 11.48 & 14.01 & 14.96  & LP 350-19/GJ 3060A & flare star & \\
  & J005101.78+200824.4 & 1RXS J005101.5+200827 & 0.7966 & 11.77 & 12.75 & 11.04 & & &  \\ 
  & J005515.01+301515.6 & 2RXP J005514.6+301517 & 4.0674 & 13.31 & 15.69 & 12.39 & & &  \\ 
  & J005601.22+303825.9 & 2RXP J005601.2+303825 & 3.7947 & 12.88 & 12.44 & 10.55 & & &  \\ 
  & J010705.51+190908.3 & 1RXS J010703.8+190858 & 1.3754 & 10.15 & 11.12 & 9.54 & & &  \\ 
  & J011235.03+170355.7 & 1RXS J011235.6+170401 & 1.0362 & 13.55 & 15.30 & 12.92 & & &  \\ 
  & J012139.75+253642.4 & 1RXS J012139.6+253634 & 0.5649 & 9.74 & 10.13 & 9.33 & SAO 74655 & & F8  \\ 
  & J012215.44+202130.4 & 1RXS J012215.4+202139 & 10.2318 & 9.66 & 10.39 & 9.01 & & &  \\ 
  & J012457.96+255702.4 & 1RXS J012458.8+255703 & 3.0420 & 10.75 & 11.40 & 10.29 & & &  \\ 
  & J012757.37+185924.9 & 2RXP J012757.8+185931 & 0.7859 & 9.36 & 9.97 & 9.03 & BD+18 193 & & F8  \\ 
  & J013147.20+384803.2 & 1RXS J013146.8+384757 & 8.7733 & 11.49 & 12.69 & 10.99 & & &  \\ 
  & J013514.32+211622.4 & 2RXP J013514.3+211615 & 1.8710 & 10.97 & 11.58 & 10.49 & & &  \\ 
  & J013612.29+304902.5 & 2RXP J013612.1+304901 & 0.6647 & 13.04 & 14.14 & 12.00 & & &  \\ 
  & J013626.24+404343.8 & 1RXS J013625.8+404352 & 0.4357 & 12.59 & 14.07 & 11.41 & & &  \\ 
2 & J013627.81+250835.5 & 1RXS J013628.0+250835 & 3.9346 & 11.02 & 12.53 & 10.48 & BD+24 238&emission line star&K2e\\
  & J013723.23+265712.1 & 1RXS J013723.4+265709 & 1.0852 & 10.95 & 13.02 & 9.96 & StKM 1-174 & & K5  \\ 
  & J013727.14+390008.3 & 1RXS J013727.7+390000 & 1.0616 & 10.38 & 11.04 & 9.93 & & &  \\ 
  & J014028.77+421200.8 & 1RXS J014028.6+421159 & 1.0605 & 10.61 & 11.46 & 9.81 & BD+41 324 & & K0V  \\ 
  & J014453.62+282457.6 & 1RXS J014454.5+282440 & 1.1990 & 11.04 & 12.45 & 10.22 & & &  \\ 
2 & J014633.48+331711.5 & 1RXS J014631.3+331715 & 4.9393 & 10.23 & 10.89 & 9.62 & & &  \\ 
  & J015203.00+374808.7 & 1RXS J015201.5+374804 & 1.9530 & 11.53 & 11.90 & 10.96 & & &  \\ 
  & J015548.02+242606.0 & 1RXS J015548.2+242620 & 3.2541 & 10.58 & 11.81 & 10.31 & & &  \\ 
  & J015935.57+234852.6 & 1RXS J015935.7+234848 & 5.5569 & 12.54 & 13.37 & 11.38 & & &  \\ 
  & J021208.77+270818.2 & 1RXS J021208.9+270817 & 0.3182 & 10.06 & 10.56 & 9.73 & & &  \\ 
  & J022050.85+332047.6 & 1RXS J022050.7+332049 & 0.1926 & 12.91 & 14.47 & 11.80 & & &  \\ 
  & J022133.29+340445.4 & 1RXS J022132.9+340449 & 3.6159 & 9.89 & 10.54 & 9.26 & BD+33 411 & & G0  \\ 
  & J022452.45+422653.7 & 2RXP J022452.0+422654 & 2.0452 & 15.65 & 15.52 & 14.16 & & &  \\ 
2 & J022729.25+305824.6 & 1RXS J022728.4+305828 & 13.6928 & 9.96 & 11.67 & 9.32 & AG Tri & BY Dra  &  \\ 
  & J022734.78+285830.2 & 1RXS J022733.2+285834 & 4.3104 & 9.89 & 10.51 & 9.40 & SAO 75375 & & G0  \\ 
  & J022936.37+342343.1 & 1RXS J022936.5+342334 & 2.7458 & 12.20 & 13.65 & 11.76 & & &  \\ 
  & J023503.81+313922.1 & 1RXS J023504.2+313927 & 1.2771 & 10.49 & 11.12 & 9.89 & SAO 55677 & & G0  \\ 
  & J025020.65+372902.0 & 1RXS J025020.0+372909 & 1.7330 & 12.05 & 13.56 & 10.87 & & PMS star  & K4V  \\ 
  & J025217.58+361648.1 & 1RXS J025216.9+361658 & 7.9809 & 11.18 & 12.09 & 9.89 & & PMS star  & K2IV  \\ 
  & J025742.76+235744.5 & 1RXS J025740.5+235755 & 3.3348 & 10.11 & 9.37 & 8.19 & AP Ari & PMS star  & K0  \\ 
  & J025752.74+415135.1 & 1RXS J025755.5+415159 & 0.4854 & 12.06 & 13.16 & 10.52 & & &  \\ 
  & J025828.76+294753.7 & 1RXS J025828.0+294805 & 0.6741 & 11.61 & 12.51 & 10.70 & & PMS star  & K0IV  \\ 
  & J025953.10+380148.1 & 1RXS J025952.4+380149 & 0.3874 & 11.09 & 11.73 & 10.34 & & PMS star  & K0IV  \\ 
  & J030335.64+362631.2 & 1RXS J030335.4+362635 & 8.2516 & 8.25 & 7.35 & 6.55 & SAO 56117 & double star & F8  \\ 
  & J030349.82+250234.0 & 1RXS J030349.4+250241 & 2.6754 & 11.89 & 13.62 & 10.94 & & &  \\ 
  & J030405.14+300309.6 & 1RXS J030405.0+300312 & 1.8070 & 11.10 & 11.71 & 10.94 & & PMS star  & K0V  \\ 
2 & J031531.89+260449.9 & 1RXS J031530.7+260451 & 9.3197 & 12.31 & 14.40 & 11.48 & & &  \\ 
  & J032231.55+285319.8 & 1RXS J032231.4+285330 & 1.6648 & 10.76 & 11.48 & 10.43 & & &  \\ 
  & J032714.41+272309.1 & 1RXS J032714.9+272318 & 10.0933 & 11.47 & 12.98 & 8.64 & LP 300-3 & &  \\ 
  & J033025.95+310217.9 & 2RXP J033025.5+310215 & 2.2308 & 14.00 & 15.71 & 13.34 & & &  \\ 
  & J033040.80+313658.1 & 2RXP J033040.9+313657 & 1.6559 & 11.88 & 13.33 & 11.64 & BSD 47-661 & & K3V  \\ 
  & J033529.90+311337.4 & 2RXP J033529.9+311338 & 1.8366 & 9.21 & 9.55 & 8.59 & SAO 56567 & PMS star  & G0  \\ 
  & J034057.81+311805.8 & 2RXP J034058.1+311802 & 4.2419 & 11.28 & 12.06 & 11.10 & & & G1V  \\ 
  & J034145.61+271856.5 & 1RXS J034145.2+271855 & 2.6380 & 11.96 & 13.05 & 10.98 & Wolf 1260 & PMS star  & K2IV  \\ 
2 & J034220.86+291440.9 & 1RXS J034221.6+291443 & 2.3271 & 10.67 & 12.49 & 11.14 & & &  \\ 
  & J034348.34+250015.7 & 2RXP J034348.1+250008 & 0.4749 & 11.75 & 11.99 & 11.69 & NSV 15748 & &  \\ 
  & J034433.95+395948.0 & 1RXS J034432.1+395937 & 0.2888 & 12.31 & 14.53 & 13.07 & & PMS star  & K4V  \\ 
2 & J034450.16+321906.7 & 2RXP J034450.5+321909 & 6.0371 & 10.96 & 16.74 & 8.10 & Dust Ball & PMS star & A0  \\ 
  & J034557.94+273335.2 & 1RXS J034557.2+273331 & 6.6237 & 10.94 & 12.21 & 10.23 & HD 282932 & & K5  \\ 
  & J034630.44+330234.5 & 2RXP J034630.6+330238 & 1.1202 & 10.72 & 11.60 & 9.83 & HD 278996 & & F  \\ 
  & J034906.11+234653.0 & 2RXP J034906.2+234652 & 0.3082 & 11.08 & 11.05 & 12.00 & & & G9  \\ 
  & J034936.53+241745.8 & 2RXP J034936.3+241752 & 5.9466 & 11.97 & 12.49 & 10.88 & V468 Tau & UV Cet  & M3.7  \\ 
  & J034942.26+242746.8 & 2RXP J034942.2+242737 & 7.7479 & 12.27 & 13.48 & 11.39 & NSV 1358 & & K3  \\ 
  & J035054.31+235005.5 & 1RXS J035055.0+235016 & 5.4490 & 11.76 & 12.44 & 10.99 & V1176 Tau & BY Dra  &  \\ 
  & J035208.32+241348.5 & 2RXP J035208.5+241343 & 1.6604 & 11.05 & 11.42 & 10.14 & HD 283063 & & G5  \\ 
  & J035331.35+263141.1 & 1RXS J035330.5+263152 & 0.2835 & 12.13 & 12.71 & 11.16 & & & G7IV  \\ 
  & J035425.23+242136.2 & 1RXS J035423.8+242146 & 2.2386 & 11.38 & 10.62 & 9.60 & HD 283167 & & G5IV  \\ 
  & J035525.61+313047.9 & 2RXP J035525.1+313048 & 0.4856 & 12.98 & 14.29 & 12.11 & & &  \\ 
  & J040005.79+394137.2 & 1RXS J040005.4+394133 & 5.6162 & 12.09 & 13.21 & 11.08 & & &  \\ 
  & J040031.06+193520.8 & 1RXS J040030.7+193521 & 1.1677 & 10.44 & 11.51 & 9.74 & HD 285281 & PMS star  & K0  \\ 
  \hline
  & J040105.23+343902.9 & 2RXP J040105.2+343906 & 18.1451 & 10.73 & 11.77 & 10.23 & HD 279311 & & K0  \\ 
2 & J040519.59+200925.5 & 1RXS J040518.6+200919 & 1.4406 & 10.55 & 11.27 & 9.57 & & &  \\ 
  & J040753.30+335605.0 & 1RXS J040753.0+335555 & 3.8678 & 11.43 & 12.64 & 10.65 & & & K3  \\ 
  & J040754.31+352749.2 & 1RXS J040753.8+352730 & 9.4797 & 10.45 & 11.54 & 9.75 & HD 279444 & & G0  \\ 
  & J041327.27+281625.0 & 2RXP J041327.5+281623 & 0.8637 & 12.69 & 15.61 & 11.90 & V1096 Tau & BY Dra  & M0V  \\ 
2 & J041430.63+285129.8 & 2RXP J041431.0+285124 & 3.6916 & 11.15 & 14.17 & 11.26 & V1097 Tau & emission line star &\\
  & J041738.93+283300.7 & 2RXP J041739.1+283255 & 1.4127 & 13.26 & 15.57 & 13.12 & LkCa5 & PMS star  & M2V  \\ 
  & J041810.78+231704.7 & 1RXS J041811.1+231700 & 1.8797 & 9.72 & 10.51 & 8.93 & HD 284303 & & K0  \\ 
2 & J041831.11+281629.1 & 2RXP J041831.4+281636 & 5.7593 & 13.29 & 15.98 & 13.76 & DD Tau & PMS star  & K6V  \\ 
  & J041846.99+282008.2 & 2RXP J041847.0+282012 & 1.5483 & 12.00 & 14.31 & 11.21 & V1023 Tau & PMS star  & K7  \\ 
  & J041946.58+231748.4 & 1RXS J041946.0+231750 & 2.2176 & 10.82 & 11.68 & 10.25 & HD 284296 & & G5  \\ 
  & J041953.70+300953.7 & 1RXS J041953.5+300949 & 10.2706 & 11.26 & 12.83 & 10.13 & HD 281912 & & K0  \\ 
  & J042347.60+294038.2 & 1RXS J042346.8+294033 & 1.3836 & 11.51 & 12.73 & 11.52 & & & K2  \\ 
  & J042521.02+254257.0 & 2RXP J042521.4+254252 & 7.6157 & 14.15 & 16.39 & 13.07 & TAP34 & PMS star &  \\ 
  & J042637.39+384502.3 & 1RXS J042638.5+384458 & 2.0596 & 11.04 & 11.72 & 10.24 & HD 279788 & PMS star  & G5V  \\ 
  & J042937.53+232033.2 & 1RXS J042937.8+232032 & 4.5854 & 10.52 & 11.56 & 9.65 & HD 284475 & double star & K2  \\ 
  & J043049.18+211410.6 & 1RXS J043049.5+211356 & 0.7397 & 10.48 & 11.10 & 10.05 & HD 284503 & PMS star  & G8  \\ 
  & J043114.43+271017.9 & 1RXS J043114.5+271021 & 5.9087 & 12.62 & 14.33 & 11.75 & JH 56 & PMS star & M1  \\ 
2 & J043230.55+241957.6 & 2RXP J043230.9+242002 & 6.6910 & 13.49 & 18.05 & 14.17 & FY Tau & PMS star  &  \\ 
  & J043547.33+225021.4 & 2RXP J043547.3+225027 & 2.4546 & 12.02 & 14.15 & 11.18 & HQ Tau & PMS star  &  \\ 
5 & J043554.15+225413.5 & 1RXS J043553.6+225410 & 1.2072 & 11.08 & 12.60 & 10.14 & V1025 Tau & PMS star  &  \\ 
  & J043619.09+254259.0 & 1RXS J043618.5+254255 & 3.3353 & 11.89 & 13.04 & 10.81 & V1115 Tau & BY Dra  & M0V  \\ 
2 & J043925.45+333244.6 & 1RXS J043926.1+333218 & 2.4180 & 11.75 & 13.12 & 10.45 & & &  \\ 
2 & J043931.00+340744.5 & 1RXS J043931.0+340737 & 0.7333 & 9.94 & 9.22 & 8.04 & HD 282346 & double star & K2  \\ 
  & J044356.93+372303.4 & 1RXS J044357.5+372303 & 4.2878 & 12.98 & 15.35 & 12.75 & & &  \\ 
  & J044721.02+280853.1 & 1RXS J044720.6+280903 & 0.6232 & 13.04 & 15.72 & 13.20 & & &  \\ 
  & J045222.04+400634.8 & 1RXS J045222.6+400633 & 6.2542 & 12.47 & 14.03 & 12.38 & & &  \\ 
  & J045450.62+320411.8 & 1RXS J045450.5+320406 & 0.2801 & 11.43 & 12.22 & 10.59 & HD 282589 & & G0  \\ 
2 & J045730.52+223513.5 & 1RXS J045730.8+223458 & 4.6635 & 10.79 & 11.65 & 10.66 & HD 284988 & & G  \\ 
  & J045808.96+433301.1 & 1RXS J045809.3+433257 & 0.4411 & 11.98 & 12.35 & 11.12 & & &  \\ 
  & J050006.91+240834.3 & 2RXP J050006.9+240833 & 8.6789 & 13.18 & 15.79 & 13.70 & & &  \\ 
  & J050147.63+380541.9 & 1RXS J050147.7+380545 & 2.8542 & 11.01 & 11.37 & 10.54 & V526 Aur & BY Dra  & G0  \\ 
  & J050206.19+311102.2 & 1RXS J050205.8+311111 & 4.2336 & 11.07 & 11.82 & 10.59 & HD 282718 & & G5  \\ 
  & J050206.88+242739.8 & 2RXP J050206.8+242741 & 0.1394 & 14.14 & 14.87 & 12.97 & & &  \\ 
  & J050559.66+280716.8 & 1RXS J050559.4+280717 & 0.5239 & 10.18 & 9.59 & 8.60 & HD 284065 & PMS star & G0/B4  \\ 
  & J051022.34+312640.1 & 1RXS J051023.1+312648 & 2.2013 & 11.30 & 12.10 & 11.01 & & PMS star  & K2IV  \\ 
  & J051043.42+302042.7 & 1RXS J051043.5+302044 & 1.8082 & 12.01 & 13.39 & 10.39 & & &  \\ 
  & J051740.27+335355.4 & 2RXP J051740.6+335357 & 0.4549 & 12.09 & 12.93 & 11.30 & & &  \\ 
  & J051908.49+340537.5 & 1RXS J051908.2+340529 & 2.1662 & 12.30 & 13.52 & 12.48 & & PMS star  & K2IV  \\ 
  & J052037.06+244713.5 & 1RXS J052036.6+244731 & 0.6931 & 11.82 & 12.48 & 10.88 & & &  \\ 
2 & J052146.83+240044.4 & 1RXS J052146.7+240036 & 3.4547 & 10.85 & 11.70 & 9.77 & & PMS star  & G7IV  \\ 
  & J052210.33+243208.8 & 1RXS J052210.2+243200 & 2.5206 & 10.94 & 11.94 & 10.36 & HD 242903 & & G0  \\ 
  & J052247.17+243731.1 & 1RXS J052248.0+243731 & 1.3385 & 11.95 & 13.00 & 10.77 & & &  \\ 
2 & J052354.67+253047.0 & 1RXS J052355.2+253052 & 7.7241 & 12.32 & 13.49 & 11.45 & & PMS star  & G4V  \\ 
2 & J052638.31+223152.5 & 1RXS J052638.7+223151 & 4.6765 & 11.61 & 13.16 & 10.81 & & PMS star x2 & K2IV/K0IV \\ 
  & J052705.88+213525.5 & 1RXS J052706.4+213525 & 0.5477 & 11.26 & 12.34 & 10.45 & & PMS star  & G7IV  \\ 
2 & J052942.46+233411.0 & 1RXS J052943.1+233412 & 1.6347 & 13.05 & 14.45 & 12.41 & & &  \\ 
  & J053020.91+414914.0 & 1RXS J053021.2+414914 & 0.7299 & 11.48 & 11.61 & 10.72 & & &  \\ 
  & J053104.38+231234.7 & 1RXS J053103.9+231232 & 0.9426 & 9.11 & 8.87 & 7.82 & SAO 77222 & PMS star  & G0  \\ 
  & J053505.64+394631.7 & 1RXS J053506.4+394644 & 4.5055 & 10.83 & 11.48 & 9.74 & & PMS star  & K0V  \\ 
  & J053807.15+422029.1 & 1RXS J053807.4+422039 & 3.3000 & 12.12 & 12.91 & 10.99 & & &  \\ 
  & J053858.03+244257.1 & 1RXS J053858.2+244320 & 4.3542 & 12.43 & 14.35 & 11.57 & & &  \\ 
  & J060358.42+222833.4 & 2RXP J060358.3+222829 & 0.3188 & 11.80 & 12.38 & 10.87 & & & K0III  \\ 
  & J060951.04+322948.3 & 1RXS J060951.5+323011 & 7.8858 & 10.39 & 11.51 & 9.46 & & &  \\ 
  & J061015.84+211956.3 & 1RXS J061016.0+212006 & 4.0814 & 11.34 & 12.43 & 10.50 & G104-22 &  & K2  \\ 
  & J061128.82+202149.5 & 1RXS J061128.8+202151 & 8.6016 & 10.18 & 11.14 & 9.51 & & &  \\ 
5 & J061510.08+252248.1 & 1RXS J061509.9+252250 & 0.9610 & 11.58 & 12.05 & 10.82 & & &  \\ 
  & J062403.09+225336.2 & 1RXS J062402.8+225334 & 0.7696 & 10.61 & 11.51 & 9.79 & & &  \\ 
  & J065341.90+424219.4 & 1RXS J065341.6+424217 & 3.5416 & 11.28 & 12.38 & 10.90 & & & K  \\   & J065948.41+274158.7 & 1RXS J065948.1+274200 & 0.1965 & 10.15 & 10.71 & 9.39 & & &  \\ 
2 & J070818.57+310508.1 & 1RXS J070818.1+310520 & 1.1200 & 11.14 & 11.59 & 10.87 & & &  \\ 
  & J071341.07+273103.7 & 1RXS J071340.5+273109 & 4.2860 & 11.50 & 12.37 & 10.61 & & &  \\ 
  & J072343.59+202458.6 & 1RXS J072343.6+202500 & 2.7835 & 10.07 & 11.31 & 9.43 & BD+20 1790 &  & K3  \\ 
2 & J114608.99+400151.9 & 1RXS J114608.2+400156 & 1.3672 & 12.15 & 13.89 & 11.68 & & &  \\ 
  & J114823.63+350421.2 & 1RXS J114824.5+350435 & 14.7895 & 11.64 & 12.38 & 10.97 & & &  \\ 
  & J114839.23+231138.6 & 1RXS J114839.6+231136 & 4.7245 & 10.44 & 11.19 & 9.60 & & &  \\ 
  & J114903.63+380031.4 & 1RXS J114904.2+380038 & 8.7540 & 11.00 & 11.82 & 10.06 & BD+38 2281 & & G7III  \\ 
  & J121911.62+291201.3 & 2RXP J121912.2+291150 & 2.1677 & 10.28 & 10.58 & 9.88 & BD+30 2254 & & F6  \\ 
  & J122224.73+334614.5 & 2RXP J122224.5+334616 & 0.1794 & 12.41 & 12.33 & 12.41 & & & F8  \\ 
  & J122354.88+224546.0 & 2RXP J122354.8+224547 & 1.8163 & 12.12 & 13.29 & 11.38 & & &  \\ 
  & J122557.80+334651.1 & 2RXP J122557.6+334650 & 1.3636 & 11.97 & 12.59 & 10.85 & & & G0V  \\ 
  \hline
  & J122751.20+333843.4 & 2RXP J122751.2+333848 & 12.5865 & 11.90 & 13.57 & 11.20 & & &  \\ 
  & J123013.72+215810.5 & 1RXS J123013.7+215812 & 1.1489 & 10.23 & 9.76 & 9.08 & BD+22 2477 & & G0  \\ 
  & J123036.52+343027.9 & 1RXS J123034.0+343033 & 0.2491 & 9.42 & 9.53 & 8.42 & & & K4V  \\ 
  & J123240.68+234804.8 & 2RXP J123240.8+234806 & 7.5566 & 10.19 & 10.99 & 9.83 & & &  \\ 
  & J123703.97+374456.5 & 2RXP J123704.4+374502 & 0.7941 & 13.61 & 14.75 & 12.86 & & &  \\ 
  & J124408.46+402329.8 & 1RXS J124409.3+402328 & 2.6454 & 11.28 & 11.96 & 11.13 & BD+41 2326 & & G5  \\ 
  & J124705.32+362844.1 & 1RXS J124706.0+362854 & 7.0385 & 11.75 & 12.83 & 11.83 & & & G8III  \\ 
  & J125147.23+223239.4 & 1RXS J125146.8+223240 & 3.4046 & 10.48 & 9.70 & 7.99 & BD+23 2508 & & M0  \\ 
  & J125532.88+301110.7 & 1RXS J125532.4+301108 & 2.5903 & 11.23 & 12.28 & 10.37 & & & K8V  \\ 
  & J125535.36+270349.3 & 1RXS J125534.6+270355 & 4.4552 & 10.97 & 12.14 & 10.68 & BD+27 2192 & & K0IV  \\ 
  & J130345.95+283720.6 & 1RXS J130346.2+283729 & 3.2035 & 10.76 & 11.59 & 10.25 & & &  \\ 
  & J131308.01+294052.4 & 2RXP J131309.0+294059 & 9.1128 & 11.08 & 11.80 & 10.63 & & & G7V  \\ 
  & J132117.60+210124.9 & 1RXS J132117.1+210116 & 1.3456 & 11.82 & 12.71 & 11.27 & & &  \\ 
  & J132426.35+303314.2 & 2RXP J132426.4+303316 & 3.3479 & 9.83 & 9.87 & 9.52 & HD 116635 & & F2  \\ 
  & J132712.10+455826.4 & 1RXS J132713.0+455826 & 2.1838 & 11.38 & 12.62 & 10.50 & & &  \\ 
  & J132745.35+474546.7 & 1RXS J132747.0+474549 & 5.7176 & 8.89 & 10.64 & 8.50 & HD 117174 & double star & K0/K0 \\ 
  & J132837.25+353311.6 & 2RXP J132838.0+353303 & 0.1670 & 12.09 & 12.82 & 11.43 & & &  \\ 
  & J132931.19+293616.2 & 2RXP J132931.3+293622 & 7.9604 & 10.38 & 11.22 & 9.81 & & &  \\ 
  & J133240.48+284758.1 & 1RXS J133240.3+284747 & 2.4849 & 10.98 & 11.63 & 10.50 & & &  \\ 
3 & J133319.04+230050.9 & 1RXS J133318.7+230110 & 0.3525 & 9.41 & 10.62 & 9.37 & SAO 82877 & double star & G5/G5 \\ 
  & J133538.39+491406.1 & 2RXP J133538.3+491406 & 0.2938 & 11.02 & 11.70 & 10.45 & & &  \\ 
  & J133924.66+400904.8 & 2RXP J133923.4+400904 & 16.2579 & 11.04 & 11.94 & 10.22 & & &  \\ 
  & J134328.21+391132.7 & 1RXS J134327.7+391131 & 3.0543 & 11.36 & 12.06 & 11.12 & & &  \\ 
  & J134330.73+332951.2 & 1RXS J134330.5+332946 & 5.9383 & 11.25 & 12.03 & 11.23 & & &  \\ 
  & J135418.84+404542.3 & 1RXS J135418.6+404533 & 0.3454 & 9.25 & 9.94 & 8.95 & SAO 44739 & &  G0 \\	
  & J142004.68+390301.5 & 1RXS J142004.8+390309 & 0.3693 & 11.79 & 14.26 & 11.17 & GJ3842 & flare star & M2.5  \\ 
  & J142056.95+345952.4 & 1RXS J142057.2+345958 & 2.0295 & 9.94 & 11.34 & 9.83 & BD+35 2550 & double star & K2  \\ 
  & J142643.20+315216.0 & 1RXS J142643.5+315221 & 21.3193 & 10.25 & 11.48 & 9.64 & & &  \\ 
  & J142656.60+233652.8 & 2RXP J142656.3+233657 & 6.4131 & 10.90 & 11.37 & 10.37 & & &  \\ 
  & J142902.52+335038.8 & 1RXS J142903.2+335033 & 3.8028 & 9.32 & 10.03 & 8.80 & SAO 64168 & & G  \\ 
  & J143729.47+412835.1 & 1RXS J143729.6+412842 & 2.0896 & 13.15 & 15.50 & 12.83 & & & M  \\ 
  & J143854.57+330019.9 & 1RXS J143854.8+330022 & 5.0682 & 11.12 & 12.23 & 10.84 & & &  \\ 
  & J144145.29+423121.1 & 1RXS J144145.0+423124 & 0.5940 & 11.39 & 12.29 & 11.30 & & & \\	
  & J144831.00+350318.0 & 1RXS J144831.7+350329 & 3.4828 & 10.84 & 11.42 & 10.15 & & &  \\ 
  & J144952.59+420626.7 & 1RXS J144952.3+420615 & 13.7134 & 11.17 & 12.20 & 10.27 & & &  \\ 
  & J150018.89+335206.6 & 1RXS J150019.4+335152 & 2.4429 & 11.81 & 12.52 & 11.02 & & &  \\ 
  & J152152.93+205839.9 & 1RXS J152153.0+205830 & 3.3829 & 9.78 & 9.29 & 6.61 & OT Ser & BY Dra  & M9  \\ 
  & J153352.71+311801.4 & 2RXP J153352.7+311802 & 1.5262 & 12.14 & 13.29 & 11.31 & & &  \\ 
  & J153440.64+265442.7 & 2RXP J153440.6+265442 & 0.3322 & 9.04 & 9.49 & 8.47 & SAO 83894 & & G0  \\ 
  & J153511.33+384358.7 & 1RXS J153511.5+384344 & 2.1942 & 12.09 & 12.99 & 11.65 &  \\ 
  & J153633.39+271029.2 & 2RXP J153633.5+271037 & 1.3393 & 10.00 & 9.75 & 9.37 & SAO 83906 & & A0  \\ 
  & J153650.34+373449.4 & 1RXS J153651.3+373446 & 4.3950 & 11.30 & 10.26 & 8.40 & G 179-40 &  & M2  \\ 
  & J153704.08+374827.8 & 1RXS J153704.2+374830 & 1.2452 & 13.30 & 15.26 & 12.73 & & & K  \\ 
  & J154058.90+402700.2 & 1RXS J154058.3+402657 & 1.9775 & 10.50 & 11.59 & 10.27 & & &  \\ 
  & J154535.07+420506.6 & 1RXS J154532.3+420500 & 5.7211 & 13.67 & 15.97 & 13.77 & & &  \\ 
  & J155307.49+202838.8 & 2RXP J155307.6+202846 & 9.2291 & 12.03 & 13.33 & 11.19 & & &  \\ 
  & J155431.35+295652.1 & 1RXS J155430.9+295637 & 0.2328 & 11.46 & 12.46 & 11.35 & & &  \\ 
  & J155842.13+323046.0 & 1RXS J155842.6+323047 & 6.2612 & 11.86 & 13.71 & 10.74 & & &  \\ 
3 & J155850.50+272327.1 & 2RXP J155851.6+272333 & 34.2257 & 13.07 & 14.18 & 11.90 & & &  \\ 
  & J160248.22+252038.2 & 1RXS J160248.3+252031 & 0.4955 & 10.71 & 11.55 & 10.16 & & &  \\ 
  & J160351.74+423654.4 & 2RXP J160351.6+423650 & 0.7880 & 12.89 & 14.33 & 11.68 & & &  \\ 
  & J160713.97+340136.0 & 1RXS J160714.4+340123 & 0.7418 & 10.91 & 12.11 & 10.46 & & &  \\ 
  & J161213.07+341416.2 & 2RXP J161212.6+341411 & 0.6031 & 13.92 & 15.29 & 13.09 & & &  \\ 
  & J162013.71+243611.0 & 1RXS J162013.2+243606 & 18.5948 & 9.74 & 10.76 & 8.95 & SAO 84309 & & K0  \\ 
  & J162201.18+225021.6 & 1RXS J162200.9+225009 & 1.3728 & 11.83 & 13.70 & 11.10 & & &  \\ 
  & J162255.30+224604.1 & 1RXS J162255.0+224559 & 1.7387 & 10.86 & 11.59 & 10.18 & & & K  \\ 
  & J162641.33+335041.8 & 1RXS J162640.6+335033 & 23.1808 & 9.40 & 9.18 & 7.71 & SAO 65302 & & G0  \\ 
  & J162946.59+281038.0 & 1RXS J162946.1+281034 & 1.4639 & 10.68 & 11.28 & 10.01 & & &  \\ 
  & J163052.87+241224.3 & 2RXP J163052.5+241219 & 53.4764 & 10.80 & 11.79 & 10.00 & & &  \\ 
  & J163420.90+424433.4 & 2RXP J163420.4+424426 & 0.3636 & 10.86 & 11.42 & 10.54 & & &  \\ 
2 & J163527.45+350057.7 & 1RXS J163527.5+350046 & 0.9166 & 12.23 & 14.35 & 11.80 & GJ 3966 & flare star & M4  \\ 
  & J163739.45+221112.8 & 1RXS J163739.5+221104 & 2.0912 & 10.84 & 11.78 & 10.55 & & &  \\ 
  & J163741.35+291950.4 & 1RXS J163741.2+291946 & 0.8246 & 11.43 & 12.70 & 10.82 & & &  \\ 
  & J164159.14+363818.5 & 2RXP J164159.7+363819 & 12.2277 & 12.20 & 13.04 & 11.34 & & &  \\ 
3 & J164732.08+251938.5 & 1RXS J164732.3+251931 & 0.9048 & 11.50 & 13.27 & 10.78 & & &  \\ 
  & J164942.92+222003.7 & 1RXS J164943.4+222009 & 22.9494 & 10.34 & 11.83 & 9.37 & & &  \\ 
  & J164956.83+325235.6 & 1RXS J164955.5+325232 & 1.0396 & 11.98 & 13.61 & 11.23 & & &  \\ 
  & J164959.95+412225.9 & 1RXS J165000.2+412217 & 1.8137 & 11.24 & 12.43 & 10.50 & AG+41 1420 & & K0  \\ 
  & J165025.84+272817.2 & 1RXS J165027.1+272812 & 2.2815 & 11.32 & 11.95 & 11.12 & & &  \\ 
  & J165107.29+283601.0 & 1RXS J165107.2+283601 & 16.1973 & 11.44 & 13.83 & 10.87 & StKM 1-1407 & & K7  \\ 
2 & J165211.93+202138.7 & 1RXS J165212.4+202148 & 3.6987 & 12.43 & 14.67 & 11.25 & & &  \\ 
  & J165445.06+423227.5 & 1RXS J165445.3+423237 & 0.6912 & 13.02 & 14.57 & 12.82 & & &  \\ 
  & J165820.66+333353.2 & 1RXS J165819.2+333411 & 4.5302 & 9.81 & 10.52 & 9.35 & & &  \\ 
  & J165909.65+205816.4 & 1RXS J165909.5+205807 & 4.1037 & 11.90 & 14.26 & 10.89 & & &  \\ 
  \hline
  & J165921.89+342822.4 & 2RXP J165921.7+342822 & 1.5636 & 10.79 & 11.17 & 10.29 & & &  \\ 
  & J170033.82+200134.1 & 1RXS J170032.9+200137 & 4.2298 & 9.95 & 11.37 & 9.56 & SAO 84750 & double star & G5  \\ 
  & J170303.06+320325.8 & 1RXS J170303.1+320320 & 2.7718 & 11.48 & 12.07 & 10.87 & BD+32 2836 & & F8  \\ 
  & J170313.51+245321.0 & 1RXS J170313.2+245332 & 5.8417 & 10.14 & 10.67 & 9.50 & & &  \\ 
  & J170352.84+321145.7 & 1RXS J170352.9+321147 & 15.4221 & 11.27 & 13.01 & 11.43 & NLTT 44114 & & M3 \\
  & J171733.62+495515.7 & 2RXP J171733.8+495513 & 2.0939 & 13.87 & 14.76 & 14.04 & & &  \\ 
  & J171800.30+212809.4 & 1RXS J171800.1+212816 & 0.7904 & 10.08 & 10.55 & 9.66 & & &  \\ 
2 & J171808.56+250612.0 & 1RXS J171807.5+250610 & 2.4103 & 10.71 & 11.97 & 10.21 & BD+25 3238 & & M0  \\ 
  & J171921.10+480342.8 & 2RXP J171921.7+480338 & 5.9483 & 9.75 & 10.39 & 9.28 & SAO 46635 & & G5  \\ 
2 & J171954.21+263003.0 & 1RXS J171953.4+262958 & 19.8077 & 10.65 & 13.05 & 10.49 & V647 Her & UV Cet  & M4eV  \\ 
  & J171959.47+241205.6 & 1RXS J171959.4+241202 & 0.7129 & 13.35 & 15.65 & 13.43 & V475 Her & UV Cet  &  \\ 
  & J172011.53+495456.0 & 2RXP J172011.4+495454 & 0.9353 & 11.57 & 12.09 & 11.15 & & &  \\ 
  & J172158.32+574922.2 & 1RXS J172157.8+574913 & 6.4272 & 11.11 & 11.74 & 10.78 & & &  \\ 
  & J172228.64+365842.1 & 1RXS J172228.5+365843 & 1.2283 & 10.63 & 11.99 & 10.15 & StKM 1-1466 & & K5  \\ 
  & J172314.19+283650.3 & 1RXS J172314.4+283641 & 3.8881 & 10.85 & 11.66 & 10.62 & & &  \\ 
  & J172413.67+402617.2 & 1RXS J172413.5+402616 & 0.2890 & 11.38 & 12.27 & 10.55 & & &  \\ 
  & J172524.34+504212.2 & 2RXP J172522.4+504216 & 0.5137 & 14.65 & 16.03 & 14.80 & & &  \\ 
  & J173004.97+184339.3 & 1RXS J173004.9+184340 & 12.6078 & 10.69 & 11.37 & 10.09 & BD+18 3387 & & K0  \\ 
  & J173103.32+281506.5 & 1RXS J173103.4+281510 & 1.2653 & 10.27 & 11.07 & 9.72 & & &  \\ 
  & J173216.05+484750.1 & 1RXS J173216.5+484754 & 12.7178 & 12.39 & 13.83 & 12.48 & & &  \\ 
3 & J173335.83+204847.4 & 1RXS J173336.7+204847 & 7.0610 & 10.29 & 11.45 & 9.68 & & &  \\ 
  & J173353.14+165512.8 & 1RXS J173353.5+165515 & 0.2659 & 13.04 & 16.14 & 13.93 & & &  \\ 
  & J173636.82+151508.3 & 1RXS J173637.6+151511 & 2.6726 & 10.34 & 10.90 & 9.91 & & &  \\ 
  & J173658.21+300947.5 & 1RXS J173657.6+300943 & 5.1781 & 11.00 & 11.88 & 10.61 & & &  \\ 
  & J173659.28+485946.1 & 1RXS J173658.9+485931 & 2.6143 & 12.72 & 14.72 & 12.49 & StKM 1-1501 & & K4  \\ 
  & J173733.44+414619.9 & 1RXS J173734.1+414618 & 1.5480 & 11.16 & 12.25 & 10.86 & & &  \\ 
  & J174431.65+131257.5 & 1RXS J174432.1+131259 & 2.7015 & 11.44 & 12.77 & 10.34 & & &  \\ 
2 & J174625.25+222859.5 & 1RXS J174624.9+222851 & 3.5384 & 11.08 & 11.75 & 10.52 & & &  \\ 
  & J174705.04+332129.1 & 1RXS J174704.1+332126 & 3.2041 & 11.60 & 12.53 & 10.94 & & &  \\ 
2 & J174746.93+521340.2 & 1RXS J174745.8+521355 & 2.9532 & 11.42 & 12.26 & 11.18 & & &  \\ 
  & J174903.15+230745.5 & 2RXP J174903.8+230744 & 16.9438 & 11.73 & 12.64 & 10.55 & & &  \\ 
  & J174947.04+335059.1 & 1RXS J174947.6+335056 & 1.3479 & 10.90 & 11.49 & 10.05 & & &  \\ 
  & J174951.66+232807.3 & 2RXP J174951.9+232759 & 2.1447 & 9.95 & 10.39 & 9.53 & SAO 85451 & & F8  \\ 
  & J175133.95+414127.4 & 1RXS J175133.3+414121 & 9.3576 & 9.97 & 11.22 & 9.29 & BD+41 2912 & & K0  \\ 
  & J175141.38+281901.2 & 1RXS J175140.9+281855 & 2.6946 & 13.02 & 14.67 & 12.92 & & & K  \\ 
  & J175152.94+093751.8 & 2RXP J175153.4+093753 & 9.1586 & 10.86 & 11.89 & 10.73 & & &  \\ 
  & J175216.36+093757.5 & 2RXP J175216.1+093748 & 7.2957 & 10.02 & 10.59 & 9.36 & & &  \\ 
  & J175242.72+232728.9 & 1RXS J175242.3+232724 & 3.0911 & 10.22 & 11.28 & 9.74 & BD+23 3201 & double star &  \\ 
  & J175319.15+213029.5 & 1RXS J175318.5+213028 & 10.7768 & 10.89 & 12.31 & 10.54 & & &  \\ 
2 & J175540.63+372516.0 & 2RXP J175539.5+372516 & 3.1203 & 12.94 & 13.57 & 12.72 & & &  \\ 
2 & J175711.41+224706.3 & 1RXS J175711.2+224712 & 1.8139 & 11.74 & 12.65 & 11.19 & StKM 1-1560 & & K7  \\ 
  & J175718.89+313315.9 & 1RXS J175718.5+313314 & 0.6981 & 10.79 & 11.33 & 10.12 & & &  \\ 
  & J175734.12+584414.2 & 1RXS J175733.7+584414 & 3.2408 & 11.96 & 13.76 & 10.86 & & &  \\ 
  & J175758.92+550607.7 & 1RXS J175758.9+550608 & 0.6374 & 11.20 & 11.85 & 10.60 & & &  \\ 
2 & J175809.40+092240.8 & 1RXS J175809.3+092241 & 0.4885 & 10.90 & 11.79 & 10.38 & & &  \\ 
  & J175910.35+584259.4 & 1RXS J175910.1+584300 & 1.2314 & 11.00 & 11.68 & 10.63 & & &  \\ 
2 & J175954.36+104418.9 & 1RXS J175953.7+104402 & 5.8737 & 10.91 & 11.97 & 10.20 & & &  \\ 
  & J180029.35+510008.8 & 2RXP J180028.5+510002 & 1.1913 & 10.04 & 10.41 & 9.56 & SAO 30688 & & F8  \\ 
  & J180100.51+233945.4 & 1RXS J180100.0+233936 & 14.8666 & 10.77 & 11.72 & 10.09 & HD341448 & & K0  \\ 
  & J180207.45+183044.2 & 1RXS J180208.6+183043 & 0.5477 & 11.66 & 13.44 & 11.41 & & &  \\ 
  & J180238.80+335634.6 & 1RXS J180239.2+335639 & 7.4245 & 9.62 & 10.24 & 9.13 & SAO 66576 & & G5  \\ 
  & J180331.30+080836.3 & 2RXP J180331.2+080832 & 2.0523 & 12.07 & 12.17 & 11.45 & & &  \\ 
  & J180426.56+393047.1 & 1RXS J180426.3+393044 & 1.5451 & 11.84 & 13.25 & 10.98 & & &  \\ 
  & J180500.38+111013.9 & 2RXP J180500.8+111021 & 0.6070 & 11.02 & 11.32 & 10.57 & & &  \\ 
  & J180514.38+113148.6 & 2RXP J180514.3+113143 & 2.7255 & 13.08 & 13.89 & 11.88 & & &  \\ 
  & J180525.04+175729.7 & 2RXP J180525.1+175725 & 27.1661 & 11.45 & 12.19 & 11.06 & & &  \\ 
  & J180859.30+454910.7 & 2RXP J180859.1+454927 & 6.0582 & 14.37 & 15.40 & 14.01 & & &  \\ 
  & J181004.20+090620.8 & 2RXP J181004.1+090622 & 0.8470 & 14.11 & 15.76 & 13.55 & & &  \\ 
  & J181306.46+260151.9 & 1RXS J181306.1+260145 & 2.2838 & 12.77 & 14.93 & 12.64 & GJ 4044 & flare star & M4  \\ 
  & J181350.48+134936.6 & 2RXP J181350.4+134937 & 2.6248 & 13.68 & 15.55 & 13.24 & & &  \\ 
3 & J181538.78+381949.9 & 1RXS J181537.9+381927 & 3.1452 & 9.79 & 10.68 & 9.47 & & &  \\ 
  & J181725.16+482201.8 & 1RXS J181725.6+482202 & 16.2578 & 10.91 & 13.89 & 10.77 & & &  \\ 
  & J181938.10+364059.2 & 1RXS J181937.8+364057 & 1.0536 & 11.40 & 12.77 & 10.83 & & &  \\ 
  & J182131.56+233430.7 & 1RXS J182130.8+233434 & 1.0945 & 11.51 & 12.42 & 10.76 & HD 342009 & & K0  \\ 
  & J182247.09+443442.9 & 1RXS J182247.1+443442 & 5.7509 & 11.52 & 12.92 & 10.57 & & &  \\ 
  & J182850.26+350634.3 & 1RXS J182849.7+350637 & 2.6940 & 9.18 & 9.57 & 8.66 & SAO 67013 & & G5  \\ 
  & J182934.89+295804.5 & 1RXS J182935.0+295807 & 0.8610 & 8.92 & 8.74 & 7.86 & SAO 86121 & double star & F8/F5  \\ 
  & J183018.86+344656.4 & 1RXS J183018.1+344633 & 3.0479 & 10.78 & 11.28 & 10.12 & & &  \\ 
  & J183037.25+433553.2 & 1RXS J183037.6+433555 & 23.1356 & 11.39 & 12.62 & 11.82 & & &  \\ 
  & J183544.62+300814.7 & 1RXS J183544.4+300808 & 0.6175 & 11.06 & 11.57 & 10.29 & & &  \\ 
  & J183956.25+510534.0 & 1RXS J183956.7+510532 & 6.8528 & 9.01 & 8.49 & 7.52 & SAO31094 & double star & G5  \\ 
  & J202823.91+113110.9 & 1RXS J202823.9+113115 & 1.0209 & 10.02 & 10.40 & 9.47 & & &  \\ 
  & J202932.83+122730.8 & 1RXS J202932.3+122735 & 3.7553 & 9.95 & 10.42 & 9.40 & & &  \\ 
2 & J203553.02+100611.9 & 1RXS J203552.3+100555 & 0.9644 & 12.44 & 14.09 & 12.68 & & &  \\ 
  \hline
& J203621.99+121539.4 & 1RXS J203622.0+121519 & 12.3366 & 9.77 & 10.89 & 8.91 & & &  \\ 
2 & J203904.65+233847.2 & 1RXS J203905.4+233845 & 0.7145 & 12.28 & 13.65 & 11.35 & & &  \\ 
& J204017.10+143035.6 & 1RXS J204018.3+143030 & 0.9378 & 9.86 & 10.12 & 9.38 & & &  \\ 
2 & J204404.76+131412.1 & 1RXS J204404.5+131413 & 2.1510 & 10.71 & 11.34 & 10.09 & & &  \\ 
&J204853.35+122230.3 & 1RXS J204853.6+122219 & 6.2897 & 10.77 & 11.71 & 10.32 & BD+11 4390 & & G5  \\ 
&J204922.85+064739.2 & 1RXS J204924.0+064737 & 9.1662 & 10.33 & 10.84 & 9.57 & BD+06 4654 & & F  \\ 
&J205428.00+090606.6 & 1RXS J205428.0+090615 & 2.2374 & 11.73 & 12.80 & 10.58 & & &  \\ 
&J210124.59+054212.8 & 1RXS J210124.1+054207 & 0.9801 & 11.71 & 12.50 & 11.07 & & &  \\ 
2&J210144.82+100840.7&1RXS J210145.1+100843 & 13.0611 & 9.85 & 10.77 & 9.18 & SAO 126476 & & K2  \\ 
  & J210707.11+063232.1 & 1RXS J210707.1+063247 & 7.1371 & 10.04 & 10.70 & 9.54 & & &  \\ 
  & J211044.78+162323.7 & 1RXS J211044.8+162312 & 10.5750 & 12.34 & 13.62 & 11.26 & & &  \\ 
  & J211436.75+195255.7 & 1RXS J211437.1+195257 & 1.1520 & 11.87 & 13.50 & 11.13 & & &  \\ 
  & J212135.86+094835.3 & 1RXS J212136.2+094834 & 3.6237 & 10.55 & 11.24 & 9.76 & & &  \\ 
  & J212341.65+152148.1 & 1RXS J212342.2+152151 & 6.6225 & 10.37 & 11.42 & 10.10 & & &  \\ 
2 & J212519.57+265653.8 & 1RXS J212519.7+265657 & 2.8246 & 11.26 & 12.20 & 11.11 & & &  \\ 
  & J212812.94+075227.2 & 1RXS J212813.2+075229 & 29.7822 & 12.72 & 13.90 & 11.49 & & &  \\ 
&J212846.86+232012.5 &1RXS J212846.4+232009 &4.5407 & 11.15 &12.69 & 10.38 & StKM 1-1900 & & K4  \\ 
2 & J212934.76+093530.3 & 1RXS J212935.1+093522 & 2.7362 & 11.71 & 12.71 & 10.51 & & &  \\ 
  & J213004.12+120428.8 & 2RXP J213005.4+120426 & 0.5837 & 15.23 & 15.49 & 14.61 & & &  \\ 
  & J213116.74+225357.1 & 2RXP J213116.9+225402 & 1.1268 & 10.05 & 10.67 & 9.71 & & &  \\ 
  & J213221.70+243342.4 & 1RXS J213220.8+243337 & 4.7358 & 11.99 & 13.98 & 11.22 & GJ 4201 & flare star & M3.5  \\ 
  & J214537.36+271110.8 & 1RXS J214539.0+271124 & 1.3729 & 11.30 & 12.25 & 11.00 & & &  \\ 
&J214742.17+304210.5&1RXS J214741.8+304204 & 34.7828 & 10.25 & 11.62 & 9.37 & BD+30 4528 & & K2  \\ 
2 & J214809.40+191012.9 & 1RXS J214810.6+191013 & 1.1598 & 10.64 & 11.83 & 10.04 & & &  \\ 
  & J214916.06+312502.5 & 1RXS J214916.6+312500 & 6.4128 & 10.82 & 11.54 & 10.49 & & &  \\ 
  & J215323.65+173020.3 & 2RXP J215323.6+173019 & 5.2761 & 13.00 & 13.50 & 12.04 & & &  \\ 
  & J220041.59+271513.5 & 1RXS J220042.0+271520 & 0.5235 & 11.37 & 13.06 & 10.57 & & & K  \\ 
  & J220213.95+152014.2 & 1RXS J220212.8+152012 & 1.4751 & 9.74 & 10.72 & 9.37 & & &  \\ 
2 & J220406.39+343305.3 & 1RXS J220407.2+343309 & 0.3717 & 9.90 & 10.26 & 9.63 & BD+33 4417 & double star & F5  \\ 
  & J221844.11+142130.2 & 2RXP J221844.4+142132 & 4.7004 & 13.13 & 13.59 & 11.89 & & &  \\ 
2 & J222228.81+292212.4 & 1RXS J222228.4+292216 & 0.2779 & 10.44 & 11.43 & 10.12 & & &  \\ 
4 & J222229.09+281439.1 & 1RXS J222229.1+281432 & 2.2761 & 9.34 & 10.66 & 9.46 & SAO 90449/SAO 90450 &double star & G0/F8  \\ 
&J222558.19+210842.0 & 2RXP J222558.7+210837 & 5.0987 & 13.23 & 14.16 & 12.61 & & &  \\ 
&J222614.44+213209.6 & 2RXP J222613.9+213219 & 2.8894 & 9.94 & 9.36 & 8.33 & BD+20 5152 & & K0  \\ 
&J222629.93+212314.5 & 2RXP J222629.8+212318 & 1.0101 & 12.77 & 14.25 & 12.20 & & &  \\ 
&J222803.99+183606.5 & 1RXS J222804.5+183607 & 0.3232 & 9.97 & 10.35 & 9.72 & BD+17 4751 & & F8  \\ 
  & J222820.71+173959.3 & 1RXS J222819.9+174025 & 2.3142 & 12.02 & 13.38 & 11.92 & & &  \\ 
  & J222829.08+203637.0 & 1RXS J222834.4+203647 & 0.1247 & 13.27 & 13.99 & 12.49 & & &  \\ 
  & J223616.76+331856.7 & 1RXS J223616.0+331909 & 0.3230 & 10.66 & 11.20 & 10.21 & & &  \\ 
  & J223655.17+401027.8 & 2RXP J223655.4+401024 & 15.2555 & 11.42 & 12.18 & 10.87 & & &  \\
  & J224355.18+293647.6 & 1RXS J224353.3+293633 & 0.4443 & 12.54 & 14.15 & 11.42 & & &  \\
  & J224446.13+302933.6 & 1RXS J224446.2+302927 & 3.5533 & 10.40 & 11.07 & 9.80 & & &  \\
2 & J225155.50+353915.2 & 1RXS J225155.6+353911 & 5.2276 & 11.03 & 12.24 & 10.69 & & &  \\
  & J225338.13+291305.0 & 2RXP J225337.7+291310 & 0.8252 & 12.33 & 12.74 & 11.28 & & &  \\
  & J225454.99+241445.2 & 1RXS J225453.7+241449 & 0.1994 & 12.70 & 15.68 & 12.91 & & &  \\
2 & J225538.93+281035.2 & 1RXS J225537.7+281051 & 0.8442 & 11.77 & 12.60 & 11.44 & & &  \\
  & J225617.59+205236.2 & 2RXP J225617.9+205236 & 1.0999 & 11.60 & 12.84 & 10.95 & & &  \\
2 & J225849.98+405611.4 & 1RXS J225850.4+405610 & 6.3266 & 10.86 & 11.66 & 10.34 & & &  \\
  & J225923.53+325133.3 & 1RXS J225923.2+325127 & 2.3833 & 11.90 & 12.98 & 11.24 & & &  \\
  & J230147.77+352848.3 & 1RXS J230147.6+352854 & 14.1358 & 9.74 & 10.86 & 9.03 & SAO 72938 & & K2  \\
2 & J230209.26+351539.4 & 1RXS J230209.2+351538 & 9.1534 & 10.05 & 11.01 & 9.51 & & &  \\
  & J230724.88+315014.1 & 1RXS J230725.0+315012 & 7.7129 & 10.67 & 12.08 & 9.73 & & &  \\
  & J230843.02+213717.7 & 1RXS J230842.4+213716 & 7.5465 & 9.40 & 10.11 & 8.80 & SAO 91038 & & G5  \\
  & J231036.91+205526.2 & 1RXS J231037.8+205531 & 0.9198 & 10.16 & 10.87 & 9.37 & HD 218782 & & K2  \\
  & J231059.54+214243.2 & 1RXS J231100.1+214254 & 0.2582 & 11.22 & 12.51 & 11.01 & & &  \\
2 & J231206.52+265545.7 & 1RXS J231206.8+265552 & 0.1563 & 9.37 & 13.10 & 7.39 & HDS 3305 & double star & K3  \\
  & J231455.84+273958.5 & 1RXS J231456.5+273957 & 11.7668 & 11.59 & 12.62 & 10.52 & & &  \\
  & J232048.10+292155.6 & 1RXS J232048.8+292151 & 1.3710 & 11.52 & 11.97 & 10.86 & & &  \\
2 & J232153.08+231656.2 & 1RXS J232153.8+231703 & 18.8148 & 10.90 & 11.59 & 10.43 & & &  \\
  & J232617.06+275203.5 & 1RXS J232617.4+275200 & 1.2530 & 11.72 & 13.67 & 11.11 & & &  \\
4 & J233152.17+195614.2 & 1RXS J233152.6+195735 & 1.0664 & 9.63 & 12.12 & 9.55 & EQ Peg & UV Cet  & M3.5  \\
&J233906.78+220412.4 & 1RXS J233907.3+220355 & 4.0623 & 10.55 & 11.42 & 9.79 & BD+21 4966 & & K2  \\
  & J234028.98+295911.8 & 1RXS J234027.8+295912 & 1.1648 & 11.16 & 10.48 & 8.90 & & &  \\
  & J234106.15+270643.2 & 2RXP J234106.2+270638 & 9.8987 & 11.95 & 12.79 & 10.77 & & &  \\
  & J234720.80+300510.8 & 1RXS J234721.7+300505 & 2.3252 & 10.81 & 11.49 & 10.41 & & &  \\
  & J234945.36+312627.4 & 1RXS J234944.9+312629 & 1.3808 & 12.77 & 13.56 & 11.60 & & &  \\
  & J235750.15+334348.5 & 1RXS J235750.3+334401 & 1.4194 & 11.21 & 12.66 & 10.96 & & &  \\
  & J235952.73+294947.3 & 2RXP J235952.7+294949 & 0.5657 & 13.22 & 13.70 & 12.15 & & &  \\ \hline
\end{tabular}
\end{table}