\begin{table}%t9
%\centering
\par
\caption{Summary of results.}
\label{tab:summary}
\begin{tabular}{l r r}
\hline
\hline
  & No. & \% \\
\hline
Observed slits		& 235	& -- \\
Original targets	& 233	& -- \\
Serendip. targets	& 68	& -- \\
Total targets		& 301	& -- \\
Tot. measured redshifts	& 174/301 & 58\% \\
Serendip. redshifts	& 35/68	& 52\% \\
SWIRE redshifts		& 150	& -- \\
\hline
Absorption line glxs	& 7/150 & 5\% \\
Emission line glxs	& 122/150 & 81\% \\
Starbursts		& 39/150 & 26\% \\
Type-2 AGNs		& 5/150 & 3\% \\
Type-1 AGNs		& 17/150 & 11\% \\
$z>2.5$ QSOs		& 3/150 & 2\% \\
\hline
Obs. IR-peakers		& 35	& -- \\
Obs. 4.5~$\mu$m-peakers	& 8/35	& 23\% \\
Obs. 5.8~$\mu$m-peakers	& 27/35	& 77\% \\
IR-p. with redshift	& 16/35	& 46\% \\
4.5~$\mu$m-p. with redshift & 6/8 & 75\% \\
5.8~$\mu$m-p. with redshift & 10/27 & 37\% \\
AGN IR-peakers		& 11/16	& 69\% \\
Type-1 AGN IR-peakers	& 7/11	& 64\% \\
Type-2 AGN IR-peakers	& 4/11	& 36\% \\
Type-1 AGN 4.5~$\mu$m-peakers	& 2/7	& 29\% \\
Type-1 AGN 5.8~$\mu$m-peakers	& 5/7	& 71\% \\
Type-2 AGN 4.5~$\mu$m-peakers	& 1/4	& 25\% \\
Type-2 AGN 5.8~$\mu$m-peakers	& 3/4	& 75\% \\
\hline
\end{tabular}
\end{table}