\begin{table}%t8
\caption{Results of SED fitting for IR-peakers requiring an AGN component. The fit consists in the 
combination of a simple stellar population and a torus model \citep{fritz2006}. The 3$\sigma$ ranges for 
the main geometrical and dust properties of the torus are reported, as well as stellar population ages, extinctions and masses.}
\label{tab:fit_agn}
\tiny
%\centerline
{\begin{tabular}{l l l c | c c c c c c | c c c | c | c c}
\hline
\hline
ID 	& Type	& Class  & $z$   & \multicolumn{6}{|c|}{Torus} & \multicolumn{3}{|c| }{Stellar population} & Total & \multicolumn{2}{c}{\% AGN} \\
SWIRE 	& phot.	& spec.  & spec. & $\frac{R_{\rm out}}{R_{\rm in}}$ & $\Theta^\dagger$ & $\tau_{9.7}$ & $\Psi^\ddagger$ & $L_{\rm BH}$ & $\alpha$ & age & $E$($B$--$V$) & Mass & $L_{\rm IR}$ & 8.0~$\mu$m & IR \\
& & & & & $[$deg$]$ & & $[$deg$]$ & $[10^{45}~L_\odot]$ & index$^\ast$ & $[10^6$ yr$]$ & $[$mag$]$ & $[10^{10}~M_\odot]$ & $[10^{11}$~$L_\odot]$ & & \\
\hline
EN1\_202260	& P2,X     & BLAGN &  1.545 & 100--300 & 100--140 & 0.6--2.0  & 0--30 & 0.79--1.58 & --1.0 & 50--300 & 0.2--0.4 & 3.98--10.0 & 4.23--7.05 & 53--71\% & 10--62\% \\   % pow 		perc AGN @24um	66\% & 
EN1\_282078	& P3	   & BLAGN &  1.685 & 20--100  & 60--100  & 6.0--10.0 & 0--60 & 1.58--3.16 & --1.0 & 50--100  & 0.6--0.8 & 3.98--6.31 & 10.4--23.7 & 53--65\% &  2--40\% \\   % pow 		perc AGN @24um	11\% & 
EN1\_279954	& P3,pow   & BLAGN &  2.409 & 30--100  & 60--140 & 0.6--3.0  & 0--50 & 1.58--3.16 & --0.5 & 10--100  & 0.6--1.0 & 2.51--15.8 & 15.4--27.1 & 49--63\% &  5--31\% \\   % pow 		perc AGN @24um	19\% & 
EN1\_339960	& P3	   & BLAGN &  1.475 & 30--100  & 60--140 & 0.6--1.0  & 0--50  & 0.20--0.32 & --1.0 & 50--500 & 0.2--0.6 & 3.98--25.1 & 3.83--5.50 & 39--49\% & 10--48\% \\   % pow 		perc AGN @24um	58\% & 
\hline
EN2\_275226	& P2	   & BLAGN &  1.710 & 30--100  & 100--140 & 1.0--6.0  & 0--20  & 0.32--1.58 & --0.5 & 10--50  & 0.6--0.8 & 1.58--2.51 & 15.3--26.1 & 37--54\% &  1--20\% \\   % t_corr 	perc AGN @24um	 4\% & 
EN2\_273717	& P3	   & BLAGN &  1.800 & 30--100  & 100--140 & 0.3--3.0  & 0--20  & 1.00--2.51 & --0.5 & 10--50  & 0.6--0.8 & 1.00--2.51 & 26.4--38.2 & 48--62\% &  2--24\% \\   % pow 		perc AGN @24um	14\% & 
EN2\_172324	& P3	   & NLAGN &  1.739 & 30--100  & 60--140  & 0.3--2.0  & 40--90 & 1.00--3.16 & --1.0 & 50--100 & 0.4--0.6 & 15.8--25.1 & 16.4--23.4 & 32--45\% &  3--39\% \\   % pow 		perc AGN @24um	21\% & 
EN2\_165986	& P3,pow   & BLAGN &  2.163 & 20--100  & 80--140  & 3.0--10.0 & 30--50 & 3.16--10.0 & --1.0 & 10--100  & 0.2--0.6 & 1.00--10.0 & 11.5--18.6 & 64--80\% & 20--53\% \\   % t_corr 	perc AGN @24um	47\% & 
\hline
LH\_574364	& P3,R     & NLAGN &  1.474 & 100--300 & 100--140 & 0.3--3.0  & 30--70 & 1.58--1.99 & --0.5 & 50--100 & 0.4--0.8 & 2.51--6.31 & 7.42--9.01 & 55--63\% & 30--77\% \\ 
\hline
\end {tabular}}
\medskip
{$^\dagger$ The aperture angle $\Theta$ is computed starting from the equatorial plane,
and it is doubled, accounting for equatorial symmetry.}\\
{$^\ddagger$ The viewing angle $\Psi$ is computed starting from the polar axis.}\\
{$^\ast$ Source power law slope in UV-optical-IR range ($\lambda~ L[\lambda]\propto\lambda^\alpha$).}
\end{table}