\begin{table}%t6
%\centering
\par
\caption{Results for second night.}
\label{tab:redshifts3}
\tiny
\begin{tabular}{l c c c c c c l l}
\hline
\hline
ID$^\ddagger$ 	& RA 	& Dec	& \multicolumn{2}{c}{Det. Lines} & $z$ & $z$ & Note$^\ast$ & Class$^\dagger$\\
SWIRE	& J2000	& J2000	& em. & abs. & spec & phot & & spec\\
\hline
LH\_126754	&	164.5717500	&	57.8558810	&	0	&	0	&	--		&	2.950	&       & -- \\
LH\_125952	&	164.5667600	&	57.8352280	&	0	&	0	&	--		&	2.140	& P3L   & -- \\
LH\_125107	&	164.5657700	&	57.8102190	&	1	&	0	&	0.974		&	1.090	&       & ELG \\
LH\_126739	&	164.5884700	&	57.8456920	&	0	&	0	&	--		&	1.040	&       & -- \\
LH\_125753	&	164.5841200	&	57.8190310	&	0	&	0	&	--		&	0.910	&       & -- \\
LH\_124994	&	164.5825700	&	57.7961500	&	0	&	0	&	--		&	1.160	&       & -- \\
LH\_125213	&	164.5899700	&	57.7990530	&	5	&	0	&	0.477		&	0.210	&       & SB \\
LH\_125861	&	164.6013600	&	57.8122560	&	0	&	0	&	--		&	0.570	&       & -- \\
LH\_128120	&	164.6321100	&	57.8646160	&	0	&	0	&	--		&	0.880	&       & -- \\
LH\_127702	&	164.6326800	&	57.8511200	&	0	&	0	&	--		&	1.180	&       & -- \\
LH\_127862	&	164.6456500	&	57.8481830	&	0	&	0	&	--		&	1.240	&       & -- \\
LH\_128064	&	164.6524000	&	57.8508000	&	1	&	0	&	2.233		&	1.500	& pow   & ELG \\
LH\_127481	&	164.6514900	&	57.8335190	&	1	&	0	&	0.854		&	0.740	&       & ELG \\
LH\_127839	&	164.6627500	&	57.8373490	&	0	&	0	&	--		&	0.950	&       & -- \\
LH\_128218	&	164.6739800	&	57.8436010	&	1	&	0	&	0.932		&	1.370	&       & ELG \\
LH\_126546	&	164.6696800	&	57.7921940	&	0	&	0	&	--		&	1.920	& P3L   & -- \\
LH\_127562	&	164.6873800	&	57.8152280	&	1	&	0	&	1.200		&	1.320	&       & ELG \\
LH\_128115	&	164.6974900	&	57.8262560	&	1	&	0	&	0.741		&	0.860	&       & ELG \\
LH\_127706	&	164.7046700	&	57.8094410	&	1	&	0	&	0.965		&	0.970	&       & ELG \\
LH\_128777	&	164.7222900	&	57.8329660	&	0	&	0	&	--		&	2.140	& P3    & -- \\
LH\_129098	&	164.7355200	&	57.8357200	&	0	&	0	&	--		&	1.290	&       & -- \\
LH\_129336	&	164.7433200	&	57.8387790	&	0	&	0	&	--		&	1.190	&       & -- \\
LH\_129463	&	164.7498500	&	57.8388670	&	0	&	0	&	--		&	1.000	&       & -- \\
LH\_129057	&	164.7492200	&	57.8263590	&	1	&	0	&	1.025		&	0.970	&       & ELG \\
LH\_128839	&	164.7504400	&	57.8182180	&	3	&	0	&	0.441		&	0.230	&       & ELG \\
LH\_127252	&	164.7381900	&	57.7757530	&	0	&	0	&	--		&	0.100	&       & -- \\
LH\_129519	&	164.7719900	&	57.8275340	&	0	&	0	&	--		&	0.980	&       & -- \\
LH\_129657	&	164.7800300	&	57.8278500	&	1	&	0	&	0.903		&	0.940	&       & ELG \\
LH\_129341	&	164.7840900	&	57.8150900	&	0	&	0	&	--		&	1.090	&       & -- \\
\hline
LH\_573671	&	161.8165100	&	59.1993370	&	0	&	0	&	--		&	1.220	&       & -- \\
LH\_576445	&	161.8730800	&	59.2471200	&	1	&	0	&	2.024		&	2.150	& pow   & ELG \\
LH\_576161	&	161.8712900	&	59.2399900	&	1	&	0	&	0.988		&	0.970	&       & ELG \\
LH\_573414	&	161.8264300	&	59.1871410	&	1	&	4	&	0.749		&	0.980	& R     & SB \\
LH\_573584	&	161.8378800	&	59.1861690	&	0	&	0	&	--		&	0.290	&       & -- \\
LH\_576452	&	161.8964700	&	59.2355460	&	0	&	0	&	--		&	2.990	&       & -- \\
LH\_573395	&	161.8467400	&	59.1762120	&	0	&	0	&	--		&	1.000	&       & -- \\
LH\_577039	&	161.9206100	&	59.2402080	&	0	&	0	&	--		&	0.990	&       & -- \\
LH\_575068	&	161.8864300	&	59.2018550	&	0	&	0	&	--		&	1.690	& P3L,R & -- \\
LH\_577220	&	161.9356200	&	59.2369610	&	0	&	0	&	--		&	2.420	& P3L,R & -- \\
LH\_574211	&	161.8810300	&	59.1807750	&	0	&	0	&	--		&	0.900	&       & -- \\
LH\_577256	&	161.9487800	&	59.2319870	&	1	&	0	&	1.127		&	1.200	&       & ELG \\
LH\_576281	&	161.9357600	&	59.2106550	&	1	&	0	&	--		&	1.780	& P2    & ELG \\
LH\_574939	&	161.9175900	&	59.1818120	&	0	&	0	&	--		&	1.810	& P3L   & -- \\
LH\_574364	&	161.9098200	&	59.1693080	&	3	&	0	&	1.474		&	1.550	& P3,R  & NLAGN \\
LH\_576769	&	161.9698800	&	59.2069210	&	3	&	0	&	0.659		&	0.260	& R,pow & ELG \\
LH\_574561	&	161.9313400	&	59.1634520	&	0	&	0	&	--		&	1.130	&       & -- \\
LH\_577480	&	161.9990700	&	59.2114450	&	1	&	0	&	0.581		&	0.800	&       & ELG \\
LH\_574430 (s)	&	161.9459800	&	59.1525500	&	0	&	0	&	0.000		&	--	&       & star \\ % 19\_1, 9.2''
LH\_574491	&	161.9507600	&	59.1516720	&	0	&	0	&	--		&	0.500	& pow   & -- \\
LH\_575939	&	161.9877600	&	59.1729700	&	2	&	0	&	0.128		&	0.180	&       & ELG \\
LH\_576851	&	162.0119600	&	59.1873510	&	0	&	0	&	--		&	1.150	&       & -- \\
LH\_576029 (s)	&	162.0022400	&	59.1681800	&	1	&	0	&	1.246		&	0.650	&       & ELG \\ % 22\_1, 9.5''
LH\_575976	&	161.9977000	&	59.1693080	&	1	&	0	&	1.023		&	1.090	&       & ELG \\
LH\_577291	&	162.0328400	&	59.1889500	&	1	&	0	&	--		&	1.800	& P3    & -- \\
LH\_577043	&	162.0330000	&	59.1823390	&	0	&	0	&	--		&	0.970	&       & -- \\
\hline	
EN1\_344017	&	240.9222700	&	54.4750630	&	0	&	0	&	--		&	0.510	&       & -- \\
EN1\_341502	&	240.8081500	&	54.4725880	&	7	&	0	&	2.317		&	2.910	& pow   & BLAGN\\
EN1\_341999	&	240.8352800	&	54.4703790	&	0	&	0	&	--		&	1.220	&       & -- \\
EN1\_343159	&	240.8965600	&	54.4654690	&	0	&	0	&	--		&	0.880	&       & -- \\
EN1\_343609	&	240.9236000	&	54.4629630	&	0	&	4	&	0.547		&	0.390	&       & ALG\\
EN1\_342460	&	240.8772700	&	54.4583630	&	1	&	0	&	0.757		&	0.490	&       & ELG \\
EN1\_340789	&	240.8124200	&	54.4507180	&	1	&	0	&	1.092		&	0.480	&       & ELG \\
EN1\_341469	&	240.8508900	&	54.4476050	&	0	&	0	&	--		&	1.540	& P3    & -- \\
EN1\_343359	&	240.9443800	&	54.4448320	&	1	&	2	&	0.815		&	0.680	&       & SB \\
\hline
EN1\_342445	&	240.9084200	&	54.4407810	&	2	&	0	&	1.917		&	1.850	& P3L   & ELG \\
EN1\_340451	&	240.8265700	&	54.4344670	&	3	&	0	&	2.866		&	2.320	& P3    & nc,NLAGN \\
EN1\_340460	&	240.8344100	&	54.4303400	&	7	&	2	&	0.308		&	0.230	&       & SB-LINER \\
EN1\_341175	&	240.8745300	&	54.4267350	&	0	&	0	&	--		&	0.400	&       & -- \\
EN1\_340982 (s)	&	240.8745000	&	54.4215800	&	0	&	0	&	--		&	--	&       & -- \\ % 13\_3, 19''
EN1\_340391	&	240.8643600	&	54.4120520	&	0	&	0	&	--		&	1.470	&       & -- \\
EN1\_341090	&	240.9015500	&	54.4095340	&	1	&	6	&	0.586		&	0.470	&       & SB \\
EN1\_339716	&	240.8470200	&	54.4039960	&	4	&	4	&	0.637		&	0.940	&       & SB \\
EN1\_339960	&	240.8671700	&	54.3996240	&	2	&	0	&	1.475		&	1.590	& P3    & BLAGN\\
EN1\_341304	&	240.9407700	&	54.3936770	&	--	&	--	&	0.000		&	--	&       & star \\
EN1\_339023	&	240.8445700	&	54.3869970	&	6	&	0	&	1.695		&	0.910	&       & BLAGN \\
EN1\_338063	&	240.8043800	&	54.3835910	&	0	&	0	&	--		&	0.990	&       & -- \\
EN1\_339817	&	240.8988300	&	54.3781200	&	0	&	0	&	--		&	0.600	&       & -- \\
EN1\_337826	&	240.8112900	&	54.3739470	&	7	&	0	&	1.756		&	1.760	& pow   & BLAGN\\
EN1\_337232	&	240.8093400	&	54.3592490	&	2	&	4	&	0.796		&	0.730	&       & SB \\
EN1\_336978	&	240.8049600	&	54.3552630	&	1	&	0	&	1.221		&	0.230	& pow   & ELG \\\hline
EN2\_13210	&	250.416110	&	40.816822	&	1	&	0	&	0.198		&	0.450	& pow   & ELG \\
EN2\_11561	&	250.406220	&	40.777615	&	0	&	0	&	--		&	0.950	&       & -- \\
EN2\_12428	&	250.419310	&	40.801735	&	1	&	0	&	2.338		&	2.430	&       & ELG \\
EN2\_11247 (s)	&	250.416850	&	40.774560	&	4	&	0	&	0.442		&	0.410	&       & SB \\ % 04\_1, 9.2''
EN2\_11160	&	250.420200	&	40.774158	&	0	&	0	&	--		&	1.210	&       & -- \\
EN2\_11438	&	250.426320	&	40.783157	&	2	&	3	&	0.439		&	0.510	&       & SB \\
EN2\_11745	&	250.440830	&	40.796204	&	0	&	2	&	1.561		&	1.010	&       & ALG\\
EN2\_12554	&	250.451480	&	40.817425	&	1	&	4	&	1.886		&	0.970	&       & SB \\
EN2\_10334	&	250.438280	&	40.763359	&	--	&	--	&	--		&	2.010	& P3    & -- \\
EN2\_11850	&	250.456920	&	40.805145	&	0	&	0	&	--		&	1.270	&       & -- \\
EN2\_11775 (s)	&	250.460020	&	40.805050	&	--	&	--	&	0.000		&	--	&       & star \\ % 09\_2, 9.2''
EN2\_9745	&	250.448960	&	40.7555730	&	1	&	0	&	1.086		&	1.190	&       & ELG \\
EN2\_11091	&	250.464570	&	40.791348	&	1	&	0	&	1.946		&	2.140	& P3L   & ELG \\
EN2\_11749	&	250.480210	&	40.812843	&	1	&	7	&	0.776		&	1.150	&       & SB \\
EN2\_10010	&	250.480990	&	40.773952	&	1	&	3	&	0.673		&	0.960	&       & SB \\
EN2\_10278	&	3250.493590	&	40.785378	&	5	&	0	&	1.720		&	1.020	& pow   & BLAGN\\
EN2\_8495	&	250.4924500	&	40.7474290	&	6	&	7	&	0.362		&	0.110	&       & SB\\
EN2\_10015	&	250.508500	&	40.786121	&	0	&	7	&	0.737		&	0.710	&       & ALG\\
EN2\_9634	&	250.5140400	&	40.7809330	&	0	&	0	&	--		&	1.200	&       & -- \\
EN2\_8917	&	250.5139000	&	40.7654500	&	0	&	2	&	0.802		&	0.710	&       & ALG\\
EN2\_8175	&	250.5173800	&	40.7505040	&	2	&	0	&	0.479		&	0.330	&       & ELG \\
EN2\_9885	&	250.5391700	&	40.7966540	&	1	&	8	&	0.875		&	0.780	&       & SB \\
EN2\_9757	&	250.5478500	&	40.7976260	&	0	&	0	&	--		&	0.100	&       & -- \\
EN2\_8936	&	250.5501900	&	40.7812420	&	1	&	3	&	0.718		&	0.880	&       & SB \\
EN2\_6835	&	250.5366800	&	40.7290000	&	1	&	0	&	1.400		&	1.320	&       & ELG \\
EN2\_6702	&	250.5427900	&	40.7288020	&	1	&	3	&	0.916		&	0.980	&       & SB \\
EN2\_9202	&	250.5687000	&	40.7944600	&	1	&	7	&	0.671		&	0.590	&       & SB \\
\hline	
EN2\_172324	&	248.6213800	&	41.0597310	&	4	&	0	&	1.739		&	2.070	& P3    & NLAGN  \\
EN2\_172031	&	248.6326600	&	41.0595360	&	4	&	7	&	0.558		&	0.780	&       & SB   \\
EN2\_170417	&	248.6353800	&	41.0304950	&	0	&	0	&	--		&	1.150	&       & -- \\
EN2\_170393	&	248.6875600	&	41.0532300	&	1	&	0	&	0.912		&	1.070	&       & ELG \\
EN2\_169884	&	248.6255800	&	41.0156140	&	1	&	8	&	0.581		&	0.580	&       & SB \\
EN2\_169626	&	248.6974500	&	41.0424770	&	0	&	0	&	--		&	0.300	&       & -- \\
EN2\_168961	&	248.6883400	&	41.0261760	&	0	&	0	&	--		&	0.490	&       & -- \\
EN2\_168666	&	248.6705200	&	41.0127720	&	1	&	0	&	1.205		&	0.990	&	& ELG \\
EN2\_168355	&	248.6358200	&	40.9916650	&	1	&	0	&	0.952		&	0.490	&       & ELG \\
EN2\_167372	&	248.6506800	&	40.9797590	&	1	&	0	&	1.445		&	2.120	& P2L   & ELG   \\ % detected in theoptica image but not in the SWIRE catalog!
EN2\_167270 (s)	&	248.6517500	&	40.9784900	&	0	&	0	&	--		&	1.270	&       & -- \\ % 10\_3, 6''
EN2\_167232	&	248.6960300	&	40.9974060	&	5	&	8	&	0.522		&	0.290	&       & SB \\
EN2\_166853	&	248.6574900	&	40.9735030	&	1	&	4	&	0.909		&	0.890	&       & SB \\
EN2\_166134	&	248.6786000	&	40.9687960	&	1	&	0	&	1.337		&	1.470	& P2    & ELG \\
EN2\_165986	&	248.7120400	&	40.9809680	&	4	&		&	2.163		&	0.430	& P3,pow& BLAGN \\
EN2\_165843	&	248.7228500	&	40.9832570	&	0	&	0	&	--		&	0.990	&       & -- \\
EN2\_165571 (s)	&	248.7258800	&	40.9798900	&	1	&	5	&	0.797		&	0.100	&	& SB \\
\hline
\end{tabular}
\medskip
 {$^\ddagger$: (s) indicates serendipitous sources; }\\
 {$^\ast$: pow $=$ IRAC power-law SED; P3 $=$ 5.8~$\mu$m peaker; P2 $=$ 4.5~$\mu$m peaker; }\\
{L $=$ upper limit at 8.0~$\mu$m; R $=$ radio source; X $=$ X-ray source.}\\
{$^\dagger$: ELG $=$ emission lines; SB $=$ starburst diagnostics; BLAGN $=$ broad line AGN; NLAGN $=$}\\
 {narrow-line AGN; star $=$ star; ALG $=$ absorption lines only; nc $=$ no continuum detected}\\
{(but emission lines yes).} 
\end{table}